2 2.1 2.2 2.3 2.4 2.5 2.6 .2

.4

.6

.8

1

1.2

1.4

1.6

1.8

2

2.2

2.4

HR 5123, M2 III

CO Gl 411, M2 V

RT Vir, M8 III

CO Gl 406, M8 V