0 1 2 3 4 5 6 7 3.2

3.3

3.4

3.5

3.6

3.7

log Temperature

NextGen Extended Base Brett Mould Auman

-6 -5 -4 -3 -2 -1 0 1 2 3.2

3.3

3.4

3.5

3.6

3.7

log Temperature

TiO, CO CaH FeH