-2 0 2

-200

-100

0

100 d

U

-2 0 2

-150

-100

-50

0

50 e

V

-2 0 2

-150

-100

-50

0

50 f

W

-200 -100 0 100 200 0

20

40

60 a

U

No.

-200 -100 0 100 200 0

20

40

60

80

100

b

V

No.

-200 -100 0 100 200 0

20

40

60

80

100

c

W

No.