Table 2. L Dwarf Data

Name CrH-a Rb-b/TiO-b Cs-a/VO-b K I fit Type

2MASSW J1108307+683017 1.27(0-1) 0.88(1) 0.84(1) (0) L1 V 2MASSW J1300425+191235 1.53(2) 0.81(1) 0.81(0-1) (1) L1 V 2MASSW J1506544+132106 1.44(1-2) 1.18(3) 1.13(3) (3) L3 V 2MASSW J1658037+702701 1.26(0-1) 0.79(1) 0.81(0-1) (2) L1 V