270:23:58:00  271:00:13:00      900 BRIGHT       STIS G230L         0.000   -2.516    -1.05   5  12     52X0.2 - -             FULL-ACQ PAR 14-17 with 12
271:00:01:00  271:00:13:00      700 BRIGHT       WFPC F300W         0.000   -2.516    -1.05   5  14  WFALL-FIX - - CR-SPLIT=NO
270:23:58:00  271:00:12:00      831 BRIGHT     NICMOS F222M         0.000   -2.516    -1.05   5  15       NIC3 - - NSAMP=15
271:00:22:00  271:00:55:00     1980 DARK         STIS G230L         0.000   -2.516    -1.05   5  20     52X0.2 O S                      PAR 22-28 with 20
271:00:25:00  271:00:55:00     1800 DARK         WFPC F450W         0.000   -2.516    -1.05   5  22  WFALL-FIX O S CR-SPLIT=NO
271:00:22:00  271:00:31:00      511 DARK       NICMOS F110W         0.000   -2.516    -1.05   5  23       NIC3 O S NSAMP=10
271:00:32:00  271:00:51:00     1152 DARK       NICMOS F110W         0.000   -2.516    -1.05   5  24       NIC3 O S NSAMP=20
271:01:03:00  271:01:22:00     1195 OCC          STIS DARK          0.000    0.000    -1.05   5  30     F25QTZ - S             RE-ACQ   PAR 32-35 with 30
271:01:06:00  271:01:22:00     1000 OCC          WFPC DARK          0.000    0.000    -1.05   5  32  WFALL-FIX - S CR-SPLIT=NO
271:01:03:00  271:01:22:00     1152 OCC        NICMOS DARK          0.000    0.000    -1.05   5  33       NIC3 - S NSAMP=20
271:01:28:00  271:01:50:00     1320 BRIGHT       STIS G230L         0.000   -2.516    -1.05   5  40     52X0.2 - S                      PAR 42-45 with 40
271:01:32:00  271:01:50:00     1100 BRIGHT       WFPC F300W         0.000   -2.516    -1.05   5  42  WFALL-FIX - S CR-SPLIT=NO
271:01:28:00  271:01:47:00     1152 BRIGHT     NICMOS F222M         0.000   -2.516    -1.05   5  43       NIC3 - S NSAMP=20
271:02:00:00  271:02:32:00     1946 DARK         STIS G230L         0.000    0.000    -1.05   5  50     52X0.2 O S                      PAR 52-58 with 50
271:02:04:00  271:02:32:00     1700 DARK         WFPC F450W         0.000    0.000    -1.05   5  52  WFALL-FIX O S CR-SPLIT=NO
271:02:00:00  271:02:08:00      511 DARK       NICMOS F110W         0.000    0.000    -1.05   5  53       NIC3 O S NSAMP=10
271:02:09:00  271:02:28:00     1152 DARK       NICMOS F110W         0.000    0.000    -1.05   5  54       NIC3 O S NSAMP=20
271:02:39:00  271:02:59:00     1208 OCC          STIS DARK          0.000    0.000    -1.05   5  60     F25QTZ - S             RE-ACQ   PAR 62-65 with 60
271:02:42:00  271:02:59:00     1000 OCC          WFPC DARK          0.000    0.000    -1.05   5  62  WFALL-FIX - S CR-SPLIT=NO
271:02:39:00  271:02:58:00     1152 OCC        NICMOS DARK          0.000    0.000    -1.05   5  63       NIC3 - S NSAMP=20
271:03:05:00  271:03:27:00     1320 BRIGHT       STIS G230L         0.000    0.000    -1.05   5  70     52X0.2 - S                      PAR 72-75 with 70
271:03:09:00  271:03:27:00     1100 BRIGHT       WFPC F300W         0.000    0.000    -1.05   5  72  WFALL-FIX - S CR-SPLIT=NO
271:03:05:00  271:03:24:00     1152 BRIGHT     NICMOS F222M         0.000    0.000    -1.05   5  73       NIC3 - S NSAMP=20
271:03:36:00  271:04:09:00     1970 DARK         STIS G230L         0.000    0.000    -1.05   5  80     52X0.2 O S                      PAR 82-88 with 80
271:03:41:00  271:04:09:00     1700 DARK         WFPC F450W         0.000    0.000    -1.05   5  82  WFALL-FIX O S CR-SPLIT=NO
271:03:36:00  271:03:45:00      511 DARK       NICMOS F110W         0.000    0.000    -1.05   5  83       NIC3 O S NSAMP=10
271:03:46:00  271:04:05:00     1152 DARK       NICMOS F110W         0.000    0.000    -1.05   5  84       NIC3 O S NSAMP=20
271:04:16:00  271:04:36:00     1194 OCC          STIS DARK          0.000    0.000    -1.05   5  90     F25QTZ - S             RE-ACQ   PAR 92-95 with 90
271:04:19:00  271:04:36:00     1000 OCC          WFPC DARK          0.000    0.000    -1.05   5  92  WFALL-FIX - S CR-SPLIT=NO
271:04:16:00  271:04:35:00     1152 OCC        NICMOS DARK          0.000    0.000    -1.05   5  93       NIC3 - S NSAMP=20
271:04:42:00  271:05:04:00     1320 BRIGHT       STIS G230L         0.000    2.516    -1.05   5 100     52X0.2 - S                      PAR 102-105 with 100
271:04:46:00  271:05:04:00     1100 BRIGHT       WFPC F300W         0.000    2.516    -1.05   5 102  WFALL-FIX - S CR-SPLIT=NO
271:04:42:00  271:05:01:00     1152 BRIGHT     NICMOS F222M         0.000    2.516    -1.05   5 103       NIC3 - S NSAMP=20
271:05:13:00  271:05:46:00     1967 DARK         STIS G230L         0.000    2.516    -1.05   5 110     52X0.2 O S                      PAR 112-118 with 110
271:05:17:00  271:05:46:00     1700 DARK         WFPC F450W         0.000    2.516    -1.05   5 112  WFALL-FIX O S CR-SPLIT=NO
271:05:13:00  271:05:22:00      511 DARK       NICMOS F110W         0.000    2.516    -1.05   5 113       NIC3 O S NSAMP=10
271:05:23:00  271:05:42:00     1152 DARK       NICMOS F110W         0.000    2.516    -1.05   5 114       NIC3 O S NSAMP=20
271:05:53:00  271:06:12:00     1147 OCC          STIS DARK          0.000    0.000    -1.05   5 120     F25QTZ - S             RE-ACQ   PAR 122-125 with 120
271:05:57:00  271:06:12:00      900 OCC          WFPC DARK          0.000    0.000    -1.05   5 122  WFALL-FIX - S CR-SPLIT=NO
271:05:53:00  271:06:07:00      831 OCC        NICMOS DARK          0.000    0.000    -1.05   5 123       NIC3 - S NSAMP=15
271:06:18:00  271:06:41:00     1380 BRIGHT       STIS G230L         0.000    2.516    -1.05   5 130     52X0.2 - S                      PAR 132-135 with 130
271:06:21:00  271:06:41:00     1200 BRIGHT       WFPC F300W         0.000    2.516    -1.05   5 132  WFALL-FIX - S CR-SPLIT=NO
271:06:18:00  271:06:37:00     1152 BRIGHT     NICMOS F222M         0.000    2.516    -1.05   5 133       NIC3 - S NSAMP=20
271:06:51:00  271:07:23:00     1934 DARK         STIS G230L         0.000   -2.516    -1.05   5 140     52X0.2 O S                      PAR 142-148 with 140
271:06:54:00  271:07:23:00     1700 DARK         WFPC F606W         0.000   -2.516    -1.05   5 142  WFALL-FIX O S CR-SPLIT=NO
271:06:51:00  271:06:59:00      511 DARK       NICMOS F160W         0.000   -2.516    -1.05   5 143       NIC3 O S NSAMP=10
271:07:00:00  271:07:19:00     1152 DARK       NICMOS F160W         0.000   -2.516    -1.05   5 144       NIC3 O S NSAMP=20
271:08:05:00  271:08:18:00      780 BRIGHT_SAA   STIS G430M-3165    0.000   -2.516     1.05   6  12     52X0.2 - -             FULL-ACQ PAR 14-17 with 12
271:08:08:00  271:08:18:00      600 BRIGHT_SAA   WFPC F300W         0.000   -2.516     1.05   6  14  WFALL-FIX - - CR-SPLIT=NO
271:08:05:00  271:08:14:00      511 BRIGHT_SAA NICMOS F222M         0.000   -2.516     1.05   6  15       NIC3 - - NSAMP=10
271:08:24:00  271:09:00:00     2171 DARK_SAA     STIS CCD-CLEAR    -2.516   -2.516     1.05   6  20      50CCD O S CR-SPLIT=3           PAR 22-28 with 20
271:08:28:00  271:09:00:00     1900 DARK_SAA     WFPC F606W        -2.516   -2.516     1.05   6  22  WFALL-FIX O S CR-SPLIT=NO
271:08:24:00  271:08:37:00      831 DARK_SAA   NICMOS F160W        -2.516   -2.516     1.05   6  23       NIC3 O S NSAMP=15
271:08:38:00  271:08:58:00     1152 DARK_SAA   NICMOS F160W        -2.516   -2.516     1.05   6  24       NIC3 O S NSAMP=20
271:09:43:00  271:09:54:00      660 BRIGHT_SAA   STIS G430M-3165    0.000   -2.516     1.05   6  30     52X0.2 - -             RE-ACQ   PAR 32-35 with 30
271:09:47:00  271:09:54:00      400 BRIGHT_SAA   WFPC F300W         0.000   -2.516     1.05   6  32  WFALL-FIX - - CR-SPLIT=NO
271:09:43:00  271:09:52:00      511 BRIGHT_SAA NICMOS F222M         0.000   -2.516     1.05   6  33       NIC3 - - NSAMP=10
271:10:00:00  271:10:37:00     2229 DARK_SAA     STIS CCD-CLEAR    -2.516   -2.516     1.05   6  40      50CCD O S CR-SPLIT=3           PAR 42-48 with 40
271:10:03:00  271:10:37:00     2000 DARK_SAA     WFPC F606W        -2.516   -2.516     1.05   6  42  WFALL-FIX O S CR-SPLIT=NO
271:10:00:00  271:10:13:00      832 DARK_SAA   NICMOS F160W        -2.516   -2.516     1.05   6  43       NIC3 O S NSAMP=15
271:10:14:00  271:10:34:00     1151 DARK_SAA   NICMOS F160W        -2.516   -2.516     1.05   6  44       NIC3 O S NSAMP=20
271:11:31:00  271:12:14:00     2557 DARK_SAA     STIS CCD-CLEAR     0.000   -2.516     1.05   6  50      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 52-58 with 50
271:11:35:00  271:12:14:00     2300 DARK_SAA     WFPC F606W         0.000   -2.516     1.05   6  52  WFALL-FIX - - CR-SPLIT=NO
271:11:31:00  271:11:45:00      832 DARK_SAA   NICMOS F160W         0.000   -2.516     1.05   6  53       NIC3 - - NSAMP=15
271:11:46:00  271:12:10:00     1471 DARK_SAA   NICMOS F160W         0.000   -2.516     1.05   6  54       NIC3 - - NSAMP=25
271:13:08:00  271:13:51:00     2557 DARK_SAA     STIS CCD-CLEAR     0.000   -2.516     1.05   6  60      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 62-68 with 60

Jul 16, 98 16:03 Page 1/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 1/18 draft5b.oh

271:13:12:00  271:13:51:00     2300 DARK_SAA     WFPC F814W         0.000   -2.516     1.05   6  62  WFALL-FIX - - CR-SPLIT=NO
271:13:08:00  271:13:22:00      832 DARK_SAA   NICMOS F110W         0.000   -2.516     1.05   6  63       NIC3 - - NSAMP=15
271:13:23:00  271:13:47:00     1471 DARK_SAA   NICMOS F110W         0.000   -2.516     1.05   6  64       NIC3 - - NSAMP=25
271:14:53:00  271:15:28:00     2077 DARK_SAA     STIS CCD-CLEAR     2.516   -2.516    -1.05   7  12      50CCD - - CR-SPLIT=3  FULL-ACQ PAR 14-20 with 12
271:14:58:00  271:15:28:00     1800 DARK_SAA     WFPC F814W         2.516   -2.516    -1.05   7  14  WFALL-FIX - - CR-SPLIT=NO
271:14:53:00  271:15:07:00      832 DARK_SAA   NICMOS F110W         2.516   -2.516    -1.05   7  15       NIC3 - - NSAMP=15
271:15:08:00  271:15:27:00     1151 DARK_SAA   NICMOS F110W         2.516   -2.516    -1.05   7  16       NIC3 - - NSAMP=20
271:15:35:00  271:15:58:00     1393 OCC          STIS DARK          0.000    0.000    -1.05   7  30      50CCD - S             RE-ACQ   PAR 32-35 with 30
271:15:38:00  271:15:58:00     1200 OCC          WFPC DARK          0.000    0.000    -1.05   7  32  WFALL-FIX - S CR-SPLIT=NO
271:15:35:00  271:15:54:00     1151 OCC        NICMOS DARK          0.000    0.000    -1.05   7  33       NIC3 - S NSAMP=20
271:16:27:00  271:17:05:00     2257 DARK_SAA     STIS CCD-CLEAR     2.516   -2.516    -1.05   7  40      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 42-48 with 40
271:16:31:00  271:17:05:00     2000 DARK_SAA     WFPC F814W         2.516   -2.516    -1.05   7  42  WFALL-FIX - - CR-SPLIT=NO
271:16:27:00  271:16:41:00      832 DARK_SAA   NICMOS F110W         2.516   -2.516    -1.05   7  43       NIC3 - - NSAMP=15
271:16:42:00  271:17:01:00     1151 DARK_SAA   NICMOS F110W         2.516   -2.516    -1.05   7  44       NIC3 - - NSAMP=20
271:17:12:00  271:17:35:00     1370 OCC          STIS DARK          0.000    0.000    -1.05   7  50      50CCD - S             RE-ACQ   PAR 52-55 with 50
271:17:17:00  271:17:35:00     1100 OCC          WFPC DARK          0.000    0.000    -1.05   7  52  WFALL-FIX - S CR-SPLIT=NO
271:17:12:00  271:17:31:00     1151 OCC        NICMOS DARK          0.000    0.000    -1.05   7  53       NIC3 - S NSAMP=20
271:18:07:00  271:18:42:00     2079 DARK_SAA     STIS CCD-CLEAR    -2.516    0.000    -1.05   7  60      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 62-68 with 60
271:18:12:00  271:18:42:00     1800 DARK_SAA     WFPC F814W        -2.516    0.000    -1.05   7  62  WFALL-FIX - - CR-SPLIT=NO
271:18:07:00  271:18:21:00      832 DARK_SAA   NICMOS F110W        -2.516    0.000    -1.05   7  63       NIC3 - - NSAMP=15
271:18:22:00  271:18:41:00     1151 DARK_SAA   NICMOS F110W        -2.516    0.000    -1.05   7  64       NIC3 - - NSAMP=20
271:18:49:00  271:19:22:00     1969 OCC          STIS DARK          0.000    0.000    -1.05   7  70      50CCD - S CR-SPLIT=2  RE-ACQ   PAR 72-78 with 70
271:18:54:00  271:19:22:00     1700 OCC          WFPC DARK          0.000    0.000    -1.05   7  72  WFALL-FIX - S CR-SPLIT=NO
271:18:49:00  271:18:52:00      191 OCC        NICMOS DARK          0.000    0.000    -1.05   7  73       NIC3 - S NSAMP=5
271:18:53:00  271:19:18:00     1471 OCC        NICMOS DARK          0.000    0.000    -1.05   7  74       NIC3 - S NSAMP=25
271:19:46:00  271:20:19:00     1961 DARK_SAA     STIS CCD-CLEAR    -2.516    0.000    -1.05   7  80      50CCD - - CR-SPLIT=2  RE-ACQ   PAR 82-88 with 80
271:19:50:00  271:20:19:00     1700 DARK_SAA     WFPC F814W        -2.516    0.000    -1.05   7  82  WFALL-FIX - - CR-SPLIT=NO
271:19:46:00  271:19:55:00      511 DARK_SAA   NICMOS F110W        -2.516    0.000    -1.05   7  83       NIC3 - - NSAMP=10
271:19:56:00  271:20:15:00     1151 DARK_SAA   NICMOS F110W        -2.516    0.000    -1.05   7  84       NIC3 - - NSAMP=20
271:20:26:00  271:20:42:00      964 OCC          STIS DARK          0.000    0.000    -1.05   7  90      50CCD - S             RE-ACQ   PAR 92-95 with 90
271:20:31:00  271:20:42:00      700 OCC          WFPC DARK          0.000    0.000    -1.05   7  92  WFALL-FIX - S CR-SPLIT=NO
271:20:26:00  271:20:40:00      832 OCC        NICMOS DARK          0.000    0.000    -1.05   7  93       NIC3 - S NSAMP=15
271:20:48:00  271:21:05:00     1021 BRIGHT_SAA   STIS G430M-3165    0.000    0.000    -1.05   7 100     52X0.2 - S                      PAR 102-105 with 100
271:20:52:00  271:21:05:00      800 BRIGHT_SAA   WFPC F300W         0.000    0.000    -1.05   7 102  WFALL-FIX - S CR-SPLIT=NO
271:20:48:00  271:21:02:00      832 BRIGHT_SAA NICMOS F222M         0.000    0.000    -1.05   7 103       NIC3 - S NSAMP=15
271:21:24:00  271:21:56:00     1906 DARK_SAA     STIS CCD-CLEAR     0.000    0.000    -1.05   7 110      50CCD O - CR-SPLIT=2  RE-ACQ   PAR 112-118 with 110
271:21:27:00  271:21:56:00     1700 DARK_SAA     WFPC F450W         0.000    0.000    -1.05   7 112  WFALL-FIX O - CR-SPLIT=NO
271:21:24:00  271:21:33:00      511 DARK_SAA   NICMOS F160W         0.000    0.000    -1.05   7 113       NIC3 O - NSAMP=10
271:21:34:00  271:21:53:00     1151 DARK_SAA   NICMOS F160W         0.000    0.000    -1.05   7 114       NIC3 O - NSAMP=20
271:22:07:00  271:22:19:00      697 OCC          STIS DARK          0.000    0.000    -0.70   8  12      50CCD - -             FULL-ACQ PAR 14 with 12
271:22:11:00  271:22:19:00      500 OCC          WFPC DARK          0.000    0.000    -0.70   8  14  WFALL-FIX - - CR-SPLIT=NO
271:22:31:00  271:22:49:00     1080 BRIGHT       STIS G230L         0.000   -2.516    -0.70   8 120     52X0.2 - S                      PAR 122 with 120
271:22:34:00  271:22:49:00      900 BRIGHT       WFPC F300W         0.000   -2.516    -0.70   8 122  WFALL-FIX - S CR-SPLIT=NO
271:22:58:00  271:23:33:00     2092 DARK         STIS G230L         0.000   -2.516    -0.70   8 120     52X0.2 O S                      PAR 122-128 with 120
271:23:01:00  271:23:33:00     1900 DARK         WFPC F450W         0.000   -2.516    -0.70   8 122  WFALL-FIX O S CR-SPLIT=NO
271:22:58:00  271:23:12:00      832 DARK       NICMOS F160W         0.000   -2.516    -0.70   8 123       NIC3 O S NSAMP=15
271:23:13:00  271:23:32:00     1151 DARK       NICMOS F160W         0.000   -2.516    -0.70   8 124       NIC3 O S NSAMP=20
271:23:40:00  271:23:56:00      909 OCC          STIS BIAS          0.000    0.000    -0.70   8 130      50CCD - S             RE-ACQ   PAR 132-135 with 130
271:23:44:00  271:23:56:00      700 OCC          WFPC BIAS          0.000    0.000    -0.70   8 132  WFALL-FIX - S CR-SPLIT=NO
271:23:40:00  271:23:54:00      832 OCC        NICMOS DARK          0.000    0.000    -0.70   8 133       NIC3 - S NSAMP=15
272:00:02:00  272:00:26:00     1440 BRIGHT       STIS G230L         0.000    0.000    -0.70   8 140     52X0.2 - S                      PAR 142-145 with 140
272:00:06:00  272:00:26:00     1200 BRIGHT       WFPC F300W         0.000    0.000    -0.70   8 142  WFALL-FIX - S CR-SPLIT=NO
272:00:02:00  272:00:21:00     1151 BRIGHT     NICMOS F222M         0.000    0.000    -0.70   8 143       NIC3 - S NSAMP=20
272:00:35:00  272:01:10:00     2100 DARK         STIS G230L         0.000    0.000    -0.70   8 150     52X0.2 O S                      PAR 152-158 with 150
272:00:38:00  272:01:10:00     1900 DARK         WFPC F450W         0.000    0.000    -0.70   8 152  WFALL-FIX O S CR-SPLIT=NO
272:00:35:00  272:00:49:00      832 DARK       NICMOS F160W         0.000    0.000    -0.70   8 153       NIC3 O S NSAMP=15
272:00:50:00  272:01:09:00     1151 DARK       NICMOS F160W         0.000    0.000    -0.70   8 154       NIC3 O S NSAMP=20
272:01:17:00  272:01:32:00      909 OCC          STIS BIAS          0.000    0.000    -0.70   8 160      50CCD - S             RE-ACQ   PAR 162-165 with 160
272:01:21:00  272:01:32:00      700 OCC          WFPC BIAS          0.000    0.000    -0.70   8 162  WFALL-FIX - S CR-SPLIT=NO
272:01:17:00  272:01:31:00      832 OCC        NICMOS DARK          0.000    0.000    -0.70   8 163       NIC3 - S NSAMP=15
272:01:38:00  272:02:03:00     1500 BRIGHT       STIS NUV-QTZ      -2.516   -2.516    -0.70   8 170     F25QTZ - S                      PAR 172-178 with 170
272:01:41:00  272:02:03:00     1300 BRIGHT       WFPC F300W        -2.516   -2.516    -0.70   8 172  WFALL-FIX - S CR-SPLIT=NO
272:01:38:00  272:01:41:00      191 BRIGHT     NICMOS F222M        -2.516   -2.516    -0.70   8 173       NIC3 - S NSAMP=5
272:01:42:00  272:02:01:00     1151 BRIGHT     NICMOS F222M        -2.516   -2.516    -0.70   8 174       NIC3 - S NSAMP=20
272:02:08:00  272:02:47:00     2349 DARK         STIS NUV-QTZ      -2.516   -2.516    -0.70   8 180     F25QTZ O S                      PAR 182-188 with 180
272:02:12:00  272:02:47:00     2100 DARK         WFPC F450W        -2.516   -2.516    -0.70   8 182  WFALL-FIX O S CR-SPLIT=NO

Jul 16, 98 16:03 Page 2/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 2/18 draft5b.oh

272:02:08:00  272:02:22:00      832 DARK       NICMOS F160W        -2.516   -2.516    -0.70   8 183       NIC3 O S NSAMP=15
272:02:23:00  272:02:47:00     1471 DARK       NICMOS F160W        -2.516   -2.516    -0.70   8 184       NIC3 O S NSAMP=25
272:02:59:00  272:03:09:00      578 OCC          STIS BIAS          0.000    0.000     0.00   9  12      50CCD - -             FULL-ACQ PAR 14-17 with 12
272:03:04:00  272:03:09:00      300 OCC          WFPC BIAS          0.000    0.000     0.00   9  14  WFALL-FIX - - CR-SPLIT=NO
272:02:59:00  272:03:08:00      511 OCC        NICMOS DARK          0.000    0.000     0.00   9  15       NIC3 - - NSAMP=10
272:03:21:00  272:03:40:00     1140 BRIGHT       STIS NUV-QTZ      -2.516   -2.516     0.00   9  20     F25QTZ - S                      PAR 22-25 with 20
272:03:25:00  272:03:40:00      900 BRIGHT       WFPC F300W        -2.516   -2.516     0.00   9  22  WFALL-FIX - S CR-SPLIT=NO
272:03:21:00  272:03:35:00      832 BRIGHT     NICMOS F222M        -2.516   -2.516     0.00   9  23       NIC3 - S NSAMP=15
272:03:46:00  272:04:24:00     2332 DARK         STIS NUV-QTZ       0.000   -2.516     0.00   9  30     F25QTZ O S                      PAR 32-38 with 30
272:03:49:00  272:04:24:00     2100 DARK         WFPC F450W         0.000   -2.516     0.00   9  32  WFALL-FIX O S CR-SPLIT=NO
272:03:46:00  272:03:59:00      832 DARK       NICMOS F160W         0.000   -2.516     0.00   9  33       NIC3 O S NSAMP=15
272:04:00:00  272:04:25:00     1471 DARK       NICMOS F160W         0.000   -2.516     0.00   9  34       NIC3 O S NSAMP=25
272:04:32:00  272:04:45:00      813 OCC          STIS BIAS          0.000    0.000     0.00   9  40      50CCD - S             RE-ACQ   PAR 42-45 with 40
272:04:35:00  272:04:45:00      600 OCC          WFPC BIAS          0.000    0.000     0.00   9  42  WFALL-FIX - S CR-SPLIT=NO
272:04:32:00  272:04:40:00      511 OCC        NICMOS DARK          0.000    0.000     0.00   9  43       NIC3 - S NSAMP=10
272:04:51:00  272:05:17:00     1560 BRIGHT       STIS NUV-QTZ       0.000   -2.516     0.00   9  50     F25QTZ - S                      PAR 52-58 with 50
272:04:55:00  272:05:17:00     1300 BRIGHT       WFPC F300W         0.000   -2.516     0.00   9  52  WFALL-FIX - S CR-SPLIT=NO
272:04:51:00  272:04:54:00      191 BRIGHT     NICMOS F222M         0.000   -2.516     0.00   9  53       NIC3 - S NSAMP=5
272:04:55:00  272:05:14:00     1151 BRIGHT     NICMOS F222M         0.000   -2.516     0.00   9  54       NIC3 - S NSAMP=20
272:05:22:00  272:06:02:00     2379 DARK         STIS NUV-QTZ       0.000   -2.516     0.00   9  60     F25QTZ O S                      PAR 62-68 with 60
272:05:27:00  272:06:02:00     2100 DARK         WFPC F606W         0.000   -2.516     0.00   9  62  WFALL-FIX O S CR-SPLIT=NO
272:05:22:00  272:05:36:00      832 DARK       NICMOS F110W         0.000   -2.516     0.00   9  63       NIC3 O S NSAMP=15
272:05:37:00  272:06:01:00     1471 DARK       NICMOS F110W         0.000   -2.516     0.00   9  64       NIC3 O S NSAMP=25
272:06:09:00  272:06:22:00      773 OCC          STIS BIAS          0.000    0.000     0.00   9  70      50CCD - S             RE-ACQ   PAR 72-75 with 70
272:06:14:00  272:06:22:00      500 OCC          WFPC BIAS          0.000    0.000     0.00   9  72  WFALL-FIX - S CR-SPLIT=NO
272:06:09:00  272:06:18:00      511 OCC        NICMOS DARK          0.000    0.000     0.00   9  73       NIC3 - S NSAMP=10
272:06:28:00  272:06:53:00     1500 BRIGHT       STIS NUV-QTZ       2.516   -2.516     0.00   9  80     F25QTZ - S                      PAR 82 with 80
272:06:31:00  272:06:53:00     1300 BRIGHT       WFPC F300W         2.516   -2.516     0.00   9  82  WFALL-FIX - S CR-SPLIT=NO
272:06:58:00  272:07:39:00     2461 DARK         STIS NUV-QTZ       2.516   -2.516     0.00   9  80     F25QTZ O S                      PAR 82-88 with 80
272:07:02:00  272:07:39:00     2200 DARK         WFPC F606W         2.516   -2.516     0.00   9  82  WFALL-FIX O S CR-SPLIT=NO
272:06:58:00  272:07:12:00      832 DARK       NICMOS F110W         2.516   -2.516     0.00   9  83       NIC3 O S NSAMP=15
272:07:13:00  272:07:37:00     1471 DARK       NICMOS F110W         2.516   -2.516     0.00   9  84       NIC3 O S NSAMP=25
272:08:19:00  272:08:30:00      660 BRIGHT_SAA   STIS G430M-3165    0.000    0.000    -0.70  10  12     52X0.2 - -             FULL-ACQ PAR 14-17 with 12
272:08:23:00  272:08:30:00      400 BRIGHT_SAA   WFPC F300W         0.000    0.000    -0.70  10  14  WFALL-FIX - - CR-SPLIT=NO
272:08:19:00  272:08:28:00      511 BRIGHT_SAA NICMOS F222M         0.000    0.000    -0.70  10  15       NIC3 - - NSAMP=10
272:08:35:00  272:09:17:00     2491 DARK_SAA     STIS CCD-CLEAR     0.000    0.000    -0.70  10  20      50CCD O S CR-SPLIT=3           PAR 22-28 with 20
272:08:38:00  272:09:17:00     2300 DARK_SAA     WFPC F606W         0.000    0.000    -0.70  10  22  WFALL-FIX O S CR-SPLIT=NO
272:08:35:00  272:08:49:00      832 DARK_SAA   NICMOS F110W         0.000    0.000    -0.70  10  23       NIC3 O S NSAMP=15
272:08:50:00  272:09:14:00     1471 DARK_SAA   NICMOS F110W         0.000    0.000    -0.70  10  24       NIC3 O S NSAMP=25
272:09:56:00  272:10:07:00      660 BRIGHT_SAA   STIS G430M-3165    0.000    2.516    -0.70  10  30     52X0.2 - -             RE-ACQ   PAR 32-35 with 30
272:10:00:00  272:10:07:00      400 BRIGHT_SAA   WFPC F300W         0.000    2.516    -0.70  10  32  WFALL-FIX - - CR-SPLIT=NO
272:09:56:00  272:10:05:00      511 BRIGHT_SAA NICMOS F222M         0.000    2.516    -0.70  10  33       NIC3 - - NSAMP=10
272:10:13:00  272:10:54:00     2508 DARK_SAA     STIS CCD-CLEAR     2.516    0.000    -0.70  10  40      50CCD O S CR-SPLIT=3           PAR 42-48 with 40
272:10:16:00  272:10:54:00     2300 DARK_SAA     WFPC F606W         2.516    0.000    -0.70  10  42  WFALL-FIX O S CR-SPLIT=NO
272:10:13:00  272:10:26:00      832 DARK_SAA   NICMOS F110W         2.516    0.000    -0.70  10  43       NIC3 O S NSAMP=15
272:10:27:00  272:10:52:00     1471 DARK_SAA   NICMOS F110W         2.516    0.000    -0.70  10  44       NIC3 O S NSAMP=25
272:11:44:00  272:12:31:00     2827 DARK_SAA     STIS CCD-CLEAR     2.516    0.000    -0.70  10  50      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 52-58 with 50
272:11:48:00  272:12:31:00     2600 DARK_SAA     WFPC F814W         2.516    0.000    -0.70  10  52  WFALL-FIX - - CR-SPLIT=NO
272:11:44:00  272:12:03:00     1151 DARK_SAA   NICMOS F160W         2.516    0.000    -0.70  10  53       NIC3 - - NSAMP=20
272:12:04:00  272:12:29:00     1471 DARK_SAA   NICMOS F160W         2.516    0.000    -0.70  10  54       NIC3 - - NSAMP=25
272:13:21:00  272:14:08:00     2816 DARK_SAA     STIS CCD-CLEAR    -2.516    2.516    -0.70  10  60      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 62-68 with 60
272:13:25:00  272:14:08:00     2600 DARK_SAA     WFPC F814W        -2.516    2.516    -0.70  10  62  WFALL-FIX - - CR-SPLIT=NO
272:13:21:00  272:13:40:00     1151 DARK_SAA   NICMOS F160W        -2.516    2.516    -0.70  10  63       NIC3 - - NSAMP=20
272:13:41:00  272:14:06:00     1471 DARK_SAA   NICMOS F160W        -2.516    2.516    -0.70  10  64       NIC3 - - NSAMP=25
272:15:04:00  272:15:45:00     2446 DARK_SAA     STIS CCD-LP       -2.516  -14.500     0.00  11  12   F28X50LP - - CR-SPLIT=3  FULL-ACQ PAR 14-20 with 12
272:15:08:00  272:15:45:00     2200 DARK_SAA     WFPC F606W        -2.516  -14.500     0.00  11  14  WFALL-FIX - - CR-SPLIT=NO
272:15:04:00  272:15:18:00      832 DARK_SAA   NICMOS F160W        -2.516  -14.500     0.00  11  15       NIC3 - - NSAMP=15
272:15:19:00  272:15:43:00     1471 DARK_SAA   NICMOS F160W        -2.516  -14.500     0.00  11  16       NIC3 - - NSAMP=25
272:16:38:00  272:17:22:00     2615 DARK_SAA     STIS CCD-LP       -2.516  -14.500     0.00  11  30   F28X50LP - - CR-SPLIT=3  RE-ACQ   PAR 32-38 with 30
272:16:42:00  272:17:22:00     2400 DARK_SAA     WFPC F300W        -2.516  -14.500     0.00  11  32  WFALL-FIX - - CR-SPLIT=NO
272:16:38:00  272:16:52:00      832 DARK_SAA   NICMOS F160W        -2.516  -14.500     0.00  11  33       NIC3 - - NSAMP=15
272:16:53:00  272:17:17:00     1471 DARK_SAA   NICMOS F160W        -2.516  -14.500     0.00  11  34       NIC3 - - NSAMP=25
272:18:18:00  272:18:58:00     2426 DARK_SAA     STIS CCD-LP        0.000  -14.500     0.00  11  40   F28X50LP - - CR-SPLIT=3  RE-ACQ   PAR 42-48 with 40
272:18:22:00  272:18:58:00     2200 DARK_SAA     WFPC F300W         0.000  -14.500     0.00  11  42  WFALL-FIX - - CR-SPLIT=NO
272:18:18:00  272:18:32:00      832 DARK_SAA   NICMOS F110W         0.000  -14.500     0.00  11  43       NIC3 - - NSAMP=15
272:18:33:00  272:18:57:00     1471 DARK_SAA   NICMOS F110W         0.000  -14.500     0.00  11  44       NIC3 - - NSAMP=25

Jul 16, 98 16:03 Page 3/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 3/18 draft5b.oh

272:19:21:00  272:19:35:00      813 BRIGHT_SAA   STIS G430M-3165    0.000   -2.516     0.00  11  50     52X0.2 - S             RE-ACQ   PAR 52 with 50
272:19:25:00  272:19:35:00      600 BRIGHT_SAA   WFPC F300W         0.000   -2.516     0.00  11  52  WFALL-FIX - S CR-SPLIT=NO
272:19:57:00  272:20:35:00     2295 DARK_SAA     STIS CCD-LP        0.000  -14.500     0.00  11  50   F28X50LP O - CR-SPLIT=3  RE-ACQ   PAR 52-58 with 50
272:20:00:00  272:20:35:00     2100 DARK_SAA     WFPC F300W         0.000  -14.500     0.00  11  52  WFALL-FIX O - CR-SPLIT=NO
272:19:57:00  272:20:11:00      832 DARK_SAA   NICMOS F110W         0.000  -14.500     0.00  11  53       NIC3 O - NSAMP=15
272:20:12:00  272:20:31:00     1151 DARK_SAA   NICMOS F110W         0.000  -14.500     0.00  11  54       NIC3 O - NSAMP=20
272:20:58:00  272:21:19:00     1287 BRIGHT_SAA   STIS G430M-3165    0.000   -2.516     0.00  11  60     52X0.2 - S             RE-ACQ   PAR 62-65 with 60
272:21:01:00  272:21:19:00     1100 BRIGHT_SAA   WFPC F300W         0.000   -2.516     0.00  11  62  WFALL-FIX - S CR-SPLIT=NO
272:20:58:00  272:21:17:00     1151 BRIGHT_SAA NICMOS F222M         0.000   -2.516     0.00  11  63       NIC3 - S NSAMP=20
272:21:32:00  272:22:12:00     2404 DARK_SAA     STIS CCD-LP        2.516  -14.500     0.00  11  70   F28X50LP O - CR-SPLIT=3  RE-ACQ   PAR 72-78 with 70
272:21:35:00  272:22:12:00     2200 DARK_SAA     WFPC F606W         2.516  -14.500     0.00  11  72  WFALL-FIX O - CR-SPLIT=NO
272:21:32:00  272:21:46:00      832 DARK_SAA   NICMOS F110W         2.516  -14.500     0.00  11  73       NIC3 O - NSAMP=15
272:21:47:00  272:22:11:00     1472 DARK_SAA   NICMOS F110W         2.516  -14.500     0.00  11  74       NIC3 O - NSAMP=25
272:22:28:00  272:22:40:00      727 ACQ-PEAK    ACQPK CCD           0.000    0.000     0.70  12  10    0.2X0.2 - -
272:22:40:00  272:23:02:00     1320 BRIGHT       STIS NUV-QTZ       2.516   -2.516     0.70  12  14     F25QTZ - -             FULL-ACQ PAR 16-19 with 14
272:22:44:00  272:23:02:00     1100 BRIGHT       WFPC F300W         2.516   -2.516     0.70  12  16  WFALL-FIX - - CR-SPLIT=NO
272:22:40:00  272:22:59:00     1151 BRIGHT     NICMOS F222M         2.516   -2.516     0.70  12  17       NIC3 - - NSAMP=20
272:23:08:00  272:23:49:00     2485 DARK         STIS NUV-QTZ      -2.516    0.000     0.70  12  30     F25QTZ O S                      PAR 32-38 with 30
272:23:11:00  272:23:49:00     2300 DARK         WFPC F450W        -2.516    0.000     0.70  12  32  WFALL-FIX O S CR-SPLIT=NO
272:23:08:00  272:23:21:00      832 DARK       NICMOS F110W        -2.516    0.000     0.70  12  33       NIC3 O S NSAMP=15
272:23:22:00  272:23:47:00     1472 DARK       NICMOS F110W        -2.516    0.000     0.70  12  34       NIC3 O S NSAMP=25
273:00:11:00  273:00:39:00     1680 BRIGHT       STIS NUV-QTZ      -2.516    0.000     0.70  12  40     F25QTZ - S             RE-ACQ   PAR 42-48 with 40
273:00:14:00  273:00:39:00     1500 BRIGHT       WFPC F300W        -2.516    0.000     0.70  12  42  WFALL-FIX - S CR-SPLIT=NO
273:00:11:00  273:00:20:00      512 BRIGHT     NICMOS F222M        -2.516    0.000     0.70  12  43       NIC3 - S NSAMP=10
273:00:21:00  273:00:40:00     1151 BRIGHT     NICMOS F222M        -2.516    0.000     0.70  12  44       NIC3 - S NSAMP=20
273:00:44:00  273:01:26:00     2504 DARK         STIS NUV-QTZ      -2.516    0.000     0.70  12  50     F25QTZ O S                      PAR 52-58 with 50
273:00:47:00  273:01:26:00     2300 DARK         WFPC F450W        -2.516    0.000     0.70  12  52  WFALL-FIX O S CR-SPLIT=NO
273:00:44:00  273:00:58:00      832 DARK       NICMOS F110W        -2.516    0.000     0.70  12  53       NIC3 O S NSAMP=15
273:00:59:00  273:01:23:00     1472 DARK       NICMOS F110W        -2.516    0.000     0.70  12  54       NIC3 O S NSAMP=25
273:01:47:00  273:02:15:00     1680 BRIGHT       STIS E230M         0.000    0.000     0.70  12  60 0.2X0.2FPA - S             RE-ACQ   PAR 62-68 with 60
273:01:50:00  273:02:15:00     1500 BRIGHT       WFPC F300W         0.000    0.000     0.70  12  62  WFALL-FIX - S CR-SPLIT=NO
273:01:47:00  273:01:56:00      512 BRIGHT     NICMOS F222M         0.000    0.000     0.70  12  63       NIC3 - S NSAMP=10
273:01:57:00  273:02:16:00     1151 BRIGHT     NICMOS F222M         0.000    0.000     0.70  12  64       NIC3 - S NSAMP=20
273:02:24:00  273:03:03:00     2313 DARK         STIS E230M         0.000    0.000     0.70  12  70 0.2X0.2FPA O S                      PAR 72-78 with 70
273:02:28:00  273:03:03:00     2100 DARK         WFPC F606W         0.000    0.000     0.70  12  72  WFALL-FIX O S CR-SPLIT=NO
273:02:24:00  273:02:38:00      832 DARK       NICMOS F160W         0.000    0.000     0.70  12  73       NIC3 O S NSAMP=15
273:02:39:00  273:03:03:00     1472 DARK       NICMOS F160W         0.000    0.000     0.70  12  74       NIC3 O S NSAMP=25
273:03:18:00  273:03:30:00      712 ACQ-PEAK    ACQPK CCD           0.000    0.000     1.05  13  10    0.2X0.2 - -
273:03:30:00  273:03:52:00     1320 BRIGHT       STIS E230M         0.000    0.000     1.05  13  14 0.2X0.2FPA - -             FULL-ACQ PAR 16 with 14
273:03:34:00  273:03:52:00     1100 BRIGHT       WFPC F300W         0.000    0.000     1.05  13  16  WFALL-FIX - - CR-SPLIT=NO
273:04:02:00  273:04:39:00     2273 DARK         STIS E230M         0.190    0.000     1.05  13  80 0.2X0.2FPB O S                      PAR 82-88 with 80
273:04:06:00  273:04:39:00     2000 DARK         WFPC F606W         0.190    0.000     1.05  13  82  WFALL-FIX O S CR-SPLIT=NO
273:04:02:00  273:04:15:00      832 DARK       NICMOS F160W         0.190    0.000     1.05  13  83       NIC3 O S NSAMP=15
273:04:16:00  273:04:36:00     1151 DARK       NICMOS F160W         0.190    0.000     1.05  13  84       NIC3 O S NSAMP=20
273:05:00:00  273:05:29:00     1740 BRIGHT       STIS E230M         0.190    0.000     1.05  13  90 0.2X0.2FPB - S             RE-ACQ   PAR 92-98 with 90
273:05:04:00  273:05:29:00     1500 BRIGHT       WFPC F300W         0.190    0.000     1.05  13  92  WFALL-FIX - S CR-SPLIT=NO
273:05:00:00  273:05:09:00      512 BRIGHT     NICMOS F222M         0.190    0.000     1.05  13  93       NIC3 - S NSAMP=10
273:05:10:00  273:05:29:00     1151 BRIGHT     NICMOS F222M         0.190    0.000     1.05  13  94       NIC3 - S NSAMP=20
273:05:38:00  273:06:16:00     2294 DARK         STIS E230M         0.190    0.000     1.05  13 100 0.2X0.2FPB O S                      PAR 102-108 with 100
273:05:41:00  273:06:16:00     2100 DARK         WFPC F606W         0.190    0.000     1.05  13 102  WFALL-FIX O S CR-SPLIT=NO
273:05:38:00  273:05:52:00      832 DARK       NICMOS F160W         0.190    0.000     1.05  13 103       NIC3 O S NSAMP=15
273:05:53:00  273:06:12:00     1151 DARK       NICMOS F160W         0.190    0.000     1.05  13 104       NIC3 O S NSAMP=20
273:06:37:00  273:07:06:00     1740 BRIGHT       STIS E230M         0.240    0.000     1.05  13 110 0.2X0.2FPC - S             RE-ACQ   PAR 112-118 with 110
273:06:41:00  273:07:06:00     1500 BRIGHT       WFPC F300W         0.240    0.000     1.05  13 112  WFALL-FIX - S CR-SPLIT=NO
273:06:37:00  273:06:40:00      191 BRIGHT     NICMOS DARK          0.240    0.000     1.05  13 113       NIC3 - S NSAMP=5
273:06:41:00  273:07:06:00     1472 BRIGHT     NICMOS DARK          0.240    0.000     1.05  13 114       NIC3 - S NSAMP=25
273:07:15:00  273:07:53:00     2283 DARK         STIS E230M         0.240    0.000     1.05  13 120 0.2X0.2FPC O S                      PAR 122-128 with 120
273:07:18:00  273:07:53:00     2100 DARK         WFPC F606W         0.240    0.000     1.05  13 122  WFALL-FIX O S CR-SPLIT=NO
273:07:15:00  273:07:29:00      832 DARK       NICMOS F160W         0.240    0.000     1.05  13 123       NIC3 O S NSAMP=15
273:07:30:00  273:07:49:00     1151 DARK       NICMOS F160W         0.240    0.000     1.05  13 124       NIC3 O S NSAMP=20
273:08:31:00  273:08:43:00      720 BRIGHT_SAA   STIS G430M-3423    0.000   -2.516     0.70  14  12     52X0.2 - -             FULL-ACQ PAR 14-17 with 12
273:08:35:00  273:08:43:00      500 BRIGHT_SAA   WFPC F300W         0.000   -2.516     0.70  14  14  WFALL-FIX - - CR-SPLIT=NO
273:08:31:00  273:08:40:00      512 BRIGHT_SAA NICMOS F222M         0.000   -2.516     0.70  14  15       NIC3 - - NSAMP=10
273:08:49:00  273:09:30:00     2482 DARK_SAA     STIS CCD-CLEAR    -2.516    2.516     0.70  14  20      50CCD O S CR-SPLIT=3           PAR 22-28 with 20
273:08:52:00  273:09:30:00     2300 DARK_SAA     WFPC F814W        -2.516    2.516     0.70  14  22  WFALL-FIX O S CR-SPLIT=NO
273:08:49:00  273:09:02:00      832 DARK_SAA   NICMOS F110W        -2.516    2.516     0.70  14  23       NIC3 O S NSAMP=15

Jul 16, 98 16:03 Page 4/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 4/18 draft5b.oh

273:09:03:00  273:09:28:00     1472 DARK_SAA   NICMOS F110W        -2.516    2.516     0.70  14  24       NIC3 O S NSAMP=25
273:10:08:00  273:10:20:00      720 BRIGHT_SAA   STIS G430M-3423    0.000   -2.516     0.70  14  30     52X0.2 - -             RE-ACQ   PAR 32-35 with 30
273:10:12:00  273:10:20:00      500 BRIGHT_SAA   WFPC F300W         0.000   -2.516     0.70  14  32  WFALL-FIX - - CR-SPLIT=NO
273:10:08:00  273:10:17:00      512 BRIGHT_SAA NICMOS F222M         0.000   -2.516     0.70  14  33       NIC3 - - NSAMP=10
273:10:27:00  273:11:07:00     2384 DARK_SAA     STIS DARK          0.000    2.516     0.70  14  40      50CCD O S                      PAR 42-48 with 40
273:10:30:00  273:11:07:00     2200 DARK_SAA     WFPC F814W         0.000    2.516     0.70  14  42  WFALL-FIX O S CR-SPLIT=NO
273:10:27:00  273:10:41:00      832 DARK_SAA   NICMOS F110W         0.000    2.516     0.70  14  43       NIC3 O S NSAMP=15
273:10:42:00  273:11:06:00     1472 DARK_SAA   NICMOS F110W         0.000    2.516     0.70  14  44       NIC3 O S NSAMP=25
273:11:57:00  273:12:44:00     2793 DARK_SAA     STIS CCD-CLEAR     0.000    2.516     0.70  14  50      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 52-58 with 50
273:12:00:00  273:12:44:00     2600 DARK_SAA     WFPC F814W         0.000    2.516     0.70  14  52  WFALL-FIX - - CR-SPLIT=NO
273:11:57:00  273:12:16:00     1151 DARK_SAA   NICMOS F110W         0.000    2.516     0.70  14  53       NIC3 - - NSAMP=20
273:12:17:00  273:12:42:00     1472 DARK_SAA   NICMOS F110W         0.000    2.516     0.70  14  54       NIC3 - - NSAMP=25
273:13:33:00  273:14:20:00     2843 DARK_SAA     STIS CCD-CLEAR     2.516    2.516     0.70  14  60      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 62-68 with 60
273:13:37:00  273:14:20:00     2600 DARK_SAA     WFPC F814W         2.516    2.516     0.70  14  62  WFALL-FIX - - CR-SPLIT=NO
273:13:33:00  273:13:52:00     1151 DARK_SAA   NICMOS F110W         2.516    2.516     0.70  14  63       NIC3 - - NSAMP=20
273:13:53:00  273:14:18:00     1472 DARK_SAA   NICMOS F110W         2.516    2.516     0.70  14  64       NIC3 - - NSAMP=25
273:15:15:00  273:15:57:00     2535 DARK_SAA     STIS CCD-CLEAR     2.516    2.516     1.05  15  12      50CCD - - CR-SPLIT=3  FULL-ACQ PAR 14-20 with 12
273:15:19:00  273:15:57:00     2300 DARK_SAA     WFPC F450W         2.516    2.516     1.05  15  14  WFALL-FIX - - CR-SPLIT=NO
273:15:15:00  273:15:29:00      832 DARK_SAA   NICMOS F160W         2.516    2.516     1.05  15  15       NIC3 - - NSAMP=15
273:15:30:00  273:15:54:00     1472 DARK_SAA   NICMOS F160W         2.516    2.516     1.05  15  16       NIC3 - - NSAMP=25
273:16:49:00  273:17:34:00     2704 DARK_SAA     STIS CCD-CLEAR    -2.516   -2.516     1.05  15  30      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 32-38 with 30
273:16:52:00  273:17:34:00     2500 DARK_SAA     WFPC F450W        -2.516   -2.516     1.05  15  32  WFALL-FIX - - CR-SPLIT=NO
273:16:49:00  273:17:08:00     1151 DARK_SAA   NICMOS F160W        -2.516   -2.516     1.05  15  33       NIC3 - - NSAMP=20
273:17:09:00  273:17:34:00     1472 DARK_SAA   NICMOS F160W        -2.516   -2.516     1.05  15  34       NIC3 - - NSAMP=25
273:18:30:00  273:19:11:00     2455 DARK_SAA     STIS CCD-CLEAR    -2.516   -2.516     1.05  15  40      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 42-48 with 40
273:18:34:00  273:19:11:00     2200 DARK_SAA     WFPC F450W        -2.516   -2.516     1.05  15  42  WFALL-FIX - - CR-SPLIT=NO
273:18:30:00  273:18:44:00      832 DARK_SAA   NICMOS F160W        -2.516   -2.516     1.05  15  43       NIC3 - - NSAMP=15
273:18:45:00  273:19:09:00     1472 DARK_SAA   NICMOS F160W        -2.516   -2.516     1.05  15  44       NIC3 - - NSAMP=25
273:19:29:00  273:19:47:00     1091 BRIGHT_SAA   STIS G430M-3423    0.000    0.000     1.05  15  50     52X0.2 - S             RE-ACQ   PAR 52 with 50
273:19:32:00  273:19:47:00      900 BRIGHT_SAA   WFPC F300W         0.000    0.000     1.05  15  52  WFALL-FIX - S CR-SPLIT=NO
273:20:08:00  273:20:48:00     2385 DARK_SAA     STIS CCD-CLEAR     0.000   -2.516     1.05  15  50      50CCD O - CR-SPLIT=3  RE-ACQ   PAR 52-58 with 50
273:20:11:00  273:20:48:00     2200 DARK_SAA     WFPC F450W         0.000   -2.516     1.05  15  52  WFALL-FIX O - CR-SPLIT=NO
273:20:08:00  273:20:22:00      832 DARK_SAA   NICMOS F160W         0.000   -2.516     1.05  15  53       NIC3 O - NSAMP=15
273:20:23:00  273:20:47:00     1472 DARK_SAA   NICMOS F160W         0.000   -2.516     1.05  15  54       NIC3 O - NSAMP=25
273:21:00:00  273:21:12:00      698 ACQ-PEAK    ACQPK CCD           0.000    0.000    -1.05  16  10    0.2X0.2 - -
273:21:12:00  273:21:38:00     1560 BRIGHT       STIS E230M         0.240    0.000    -1.05  16  14 0.2X0.2FPC - -             FULL-ACQ PAR 16-22 with 14
273:21:16:00  273:21:38:00     1300 BRIGHT       WFPC F300W         0.240    0.000    -1.05  16  16  WFALL-FIX - - CR-SPLIT=NO
273:21:12:00  273:21:15:00      191 BRIGHT     NICMOS F222M         0.240    0.000    -1.05  16  17       NIC3 - - NSAMP=5
273:21:16:00  273:21:35:00     1151 BRIGHT     NICMOS F222M         0.240    0.000    -1.05  16  18       NIC3 - - NSAMP=20
273:21:48:00  273:22:25:00     2227 DARK         STIS E230M         0.360    0.000    -1.05  16  30 0.2X0.2FPD O S                      PAR 32-38 with 30
273:21:51:00  273:22:25:00     2000 DARK         WFPC F606W         0.360    0.000    -1.05  16  32  WFALL-FIX O S CR-SPLIT=NO
273:21:48:00  273:22:01:00      832 DARK       NICMOS F110W         0.360    0.000    -1.05  16  33       NIC3 O S NSAMP=15
273:22:02:00  273:22:22:00     1151 DARK       NICMOS F110W         0.360    0.000    -1.05  16  34       NIC3 O S NSAMP=20
273:22:42:00  273:23:14:00     1920 BRIGHT       STIS E230M         0.360    0.000    -1.05  16  40 0.2X0.2FPD - S             RE-ACQ   PAR 42-48 with 40
273:22:46:00  273:23:14:00     1700 BRIGHT       WFPC DARK          0.360    0.000    -1.05  16  42  WFALL-FIX - S CR-SPLIT=NO
273:22:42:00  273:22:51:00      512 BRIGHT     NICMOS F222M         0.360    0.000    -1.05  16  43       NIC3 - S NSAMP=10
273:22:52:00  273:23:11:00     1151 BRIGHT     NICMOS F222M         0.360    0.000    -1.05  16  44       NIC3 - S NSAMP=20
273:23:23:00  274:00:01:00     2306 DARK         STIS E230M         0.360    0.000    -1.05  16  50 0.2X0.2FPD O S                      PAR 52-58 with 50
273:23:26:00  274:00:01:00     2100 DARK         WFPC F606W         0.360    0.000    -1.05  16  52  WFALL-FIX O S CR-SPLIT=NO
273:23:23:00  273:23:37:00      832 DARK       NICMOS F110W         0.360    0.000    -1.05  16  53       NIC3 O S NSAMP=15
273:23:38:00  274:00:02:00     1472 DARK       NICMOS F110W         0.360    0.000    -1.05  16  54       NIC3 O S NSAMP=25
274:00:19:00  274:00:51:00     1920 BRIGHT       STIS E230M         0.620    0.000    -1.05  16  60 0.2X0.2FPE - S             RE-ACQ   PAR 62-68 with 60
274:00:23:00  274:00:51:00     1700 BRIGHT       WFPC F300W         0.620    0.000    -1.05  16  62  WFALL-FIX - S CR-SPLIT=NO
274:00:19:00  274:00:28:00      512 BRIGHT     NICMOS F222M         0.620    0.000    -1.05  16  63       NIC3 - S NSAMP=10
274:00:29:00  274:00:48:00     1151 BRIGHT     NICMOS F222M         0.620    0.000    -1.05  16  64       NIC3 - S NSAMP=20
274:01:00:00  274:01:38:00     2295 DARK         STIS E230M         0.620    0.000    -1.05  16  70 0.2X0.2FPE O S                      PAR 72-78 with 70
274:01:03:00  274:01:38:00     2100 DARK         WFPC F606W         0.620    0.000    -1.05  16  72  WFALL-FIX O S CR-SPLIT=NO
274:01:00:00  274:01:14:00      832 DARK       NICMOS F110W         0.620    0.000    -1.05  16  73       NIC3 O S NSAMP=15
274:01:15:00  274:01:34:00     1151 DARK       NICMOS F110W         0.620    0.000    -1.05  16  74       NIC3 O S NSAMP=20
274:01:49:00  274:02:01:00      720 ACQ-PEAK    ACQPK CCD           0.000    0.000    -0.70  17  10    0.2X0.2 - -
274:02:01:00  274:02:28:00     1620 BRIGHT       STIS E230M         0.620    0.000    -0.70  17  14 0.2X0.2FPE - -             FULL-ACQ PAR 16 with 14
274:02:05:00  274:02:28:00     1400 BRIGHT       WFPC F300W         0.620    0.000    -0.70  17  16  WFALL-FIX - - CR-SPLIT=NO
274:02:38:00  274:03:15:00     2256 DARK         STIS E230M         0.000    0.000    -0.70  17  80 0.2X0.2FPA O S                      PAR 82-88 with 80
274:02:42:00  274:03:15:00     2000 DARK         WFPC F606W         0.000    0.000    -0.70  17  82  WFALL-FIX O S CR-SPLIT=NO
274:02:38:00  274:02:51:00      832 DARK       NICMOS F110W         0.000    0.000    -0.70  17  83       NIC3 O S NSAMP=15
274:02:52:00  274:03:12:00     1151 DARK       NICMOS F110W         0.000    0.000    -0.70  17  84       NIC3 O S NSAMP=20

Jul 16, 98 16:03 Page 5/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 5/18 draft5b.oh

274:03:31:00  274:04:05:00     2040 BRIGHT       STIS E230M         0.000    0.000    -0.70  17  90 0.2X0.2FPA - S             RE-ACQ   PAR 92-98 with 90
274:03:35:00  274:04:05:00     1800 BRIGHT       WFPC F300W         0.000    0.000    -0.70  17  92  WFALL-FIX - S CR-SPLIT=NO
274:03:31:00  274:03:40:00      512 BRIGHT     NICMOS DARK          0.000    0.000    -0.70  17  93       NIC3 - S NSAMP=10
274:03:41:00  274:04:05:00     1472 BRIGHT     NICMOS DARK          0.000    0.000    -0.70  17  94       NIC3 - S NSAMP=25
274:04:14:00  274:04:52:00     2276 DARK         STIS E230M         0.000    0.000    -0.70  17 100 0.2X0.2FPA O S                      PAR 102-108 with 100
274:04:19:00  274:04:52:00     2000 DARK         WFPC F814W         0.000    0.000    -0.70  17 102  WFALL-FIX O S CR-SPLIT=NO
274:04:14:00  274:04:28:00      832 DARK       NICMOS F160W         0.000    0.000    -0.70  17 103       NIC3 O S NSAMP=15
274:04:29:00  274:04:48:00     1151 DARK       NICMOS F160W         0.000    0.000    -0.70  17 104       NIC3 O S NSAMP=20
274:05:08:00  274:05:42:00     2040 BRIGHT       STIS E230M         0.190    0.000    -0.70  17 110 0.2X0.2FPB - S             RE-ACQ   PAR 112-118 with 110
274:05:12:00  274:05:42:00     1800 BRIGHT       WFPC F300W         0.190    0.000    -0.70  17 112  WFALL-FIX - S CR-SPLIT=NO
274:05:08:00  274:05:22:00      832 BRIGHT     NICMOS F222M         0.190    0.000    -0.70  17 113       NIC3 - S NSAMP=15
274:05:23:00  274:05:42:00     1151 BRIGHT     NICMOS F222M         0.190    0.000    -0.70  17 114       NIC3 - S NSAMP=20
274:05:51:00  274:06:29:00     2268 DARK         STIS E230M         0.190    0.000    -0.70  17 120 0.2X0.2FPB O S                      PAR 122-128 with 120
274:05:55:00  274:06:29:00     2000 DARK         WFPC F814W         0.190    0.000    -0.70  17 122  WFALL-FIX O S CR-SPLIT=NO
274:05:51:00  274:06:05:00      832 DARK       NICMOS F160W         0.190    0.000    -0.70  17 123       NIC3 O S NSAMP=15
274:06:06:00  274:06:25:00     1151 DARK       NICMOS F160W         0.190    0.000    -0.70  17 124       NIC3 O S NSAMP=20
274:07:01:00  274:07:19:00     1080 BRIGHT_SAA   STIS G430M-3423    0.000    0.000    -1.05  18  12     52X0.2 - -             FULL-ACQ PAR 14-17 with 12
274:07:04:00  274:07:19:00      900 BRIGHT_SAA   WFPC F300W         0.000    0.000    -1.05  18  14  WFALL-FIX - - CR-SPLIT=NO
274:07:01:00  274:07:15:00      832 BRIGHT_SAA NICMOS F222M         0.000    0.000    -1.05  18  15       NIC3 - - NSAMP=15
274:07:25:00  274:08:06:00     2470 DARK_SAA     STIS CCD-CLEAR     0.000   -2.516    -1.05  18  20      50CCD O S CR-SPLIT=3           PAR 22-28 with 20
274:07:29:00  274:08:06:00     2200 DARK_SAA     WFPC F814W         0.000   -2.516    -1.05  18  22  WFALL-FIX O S CR-SPLIT=NO
274:07:25:00  274:07:38:00      832 DARK_SAA   NICMOS F160W         0.000   -2.516    -1.05  18  23       NIC3 O S NSAMP=15
274:07:39:00  274:08:04:00     1472 DARK_SAA   NICMOS F160W         0.000   -2.516    -1.05  18  24       NIC3 O S NSAMP=25
274:08:38:00  274:08:55:00     1020 BRIGHT_SAA   STIS G430M-3423    0.000    0.000    -1.05  18  30     52X0.2 - -             RE-ACQ   PAR 32-35 with 30
274:08:42:00  274:08:55:00      800 BRIGHT_SAA   WFPC F300W         0.000    0.000    -1.05  18  32  WFALL-FIX - - CR-SPLIT=NO
274:08:38:00  274:08:52:00      832 BRIGHT_SAA NICMOS F222M         0.000    0.000    -1.05  18  33       NIC3 - - NSAMP=15
274:09:01:00  274:09:43:00     2522 DARK_SAA     STIS CCD-CLEAR     2.516   -2.516    -1.05  18  40      50CCD O S CR-SPLIT=3           PAR 42-48 with 40
274:09:04:00  274:09:43:00     2300 DARK_SAA     WFPC F814W         2.516   -2.516    -1.05  18  42  WFALL-FIX O S CR-SPLIT=NO
274:09:01:00  274:09:14:00      832 DARK_SAA   NICMOS F160W         2.516   -2.516    -1.05  18  43       NIC3 O S NSAMP=15
274:09:15:00  274:09:40:00     1472 DARK_SAA   NICMOS F160W         2.516   -2.516    -1.05  18  44       NIC3 O S NSAMP=25
274:10:20:00  274:10:32:00      720 BRIGHT_SAA   STIS G430M-3165    0.000   -2.516    -1.05  18  50     52X0.2 - -             RE-ACQ   PAR 52-55 with 50
274:10:24:00  274:10:32:00      500 BRIGHT_SAA   WFPC F300W         0.000   -2.516    -1.05  18  52  WFALL-FIX - - CR-SPLIT=NO
274:10:20:00  274:10:29:00      512 BRIGHT_SAA NICMOS F222M         0.000   -2.516    -1.05  18  53       NIC3 - - NSAMP=10
274:10:38:00  274:11:19:00     2513 DARK_SAA     STIS CCD-CLEAR     2.516   -2.516    -1.05  18  60      50CCD O S CR-SPLIT=3           PAR 62-68 with 60
274:10:41:00  274:11:19:00     2300 DARK_SAA     WFPC F450W         2.516   -2.516    -1.05  18  62  WFALL-FIX O S CR-SPLIT=NO
274:10:38:00  274:10:51:00      832 DARK_SAA   NICMOS F110W         2.516   -2.516    -1.05  18  63       NIC3 O S NSAMP=15
274:10:52:00  274:11:17:00     1472 DARK_SAA   NICMOS F110W         2.516   -2.516    -1.05  18  64       NIC3 O S NSAMP=25
274:12:09:00  274:12:56:00     2835 DARK_SAA     STIS CCD-CLEAR    -2.516    0.000    -1.05  18  70      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 72-78 with 70
274:12:13:00  274:12:56:00     2600 DARK_SAA     WFPC F450W        -2.516    0.000    -1.05  18  72  WFALL-FIX - - CR-SPLIT=NO
274:12:09:00  274:12:28:00     1151 DARK_SAA   NICMOS F110W        -2.516    0.000    -1.05  18  73       NIC3 - - NSAMP=20
274:12:29:00  274:12:54:00     1472 DARK_SAA   NICMOS F110W        -2.516    0.000    -1.05  18  74       NIC3 - - NSAMP=25
274:13:47:00  274:14:33:00     2767 DARK_SAA     STIS CCD-LP        2.516  -14.500    -0.70  19  12   F28X50LP - - CR-SPLIT=3  FULL-ACQ PAR 14-20 with 12
274:13:51:00  274:14:33:00     2500 DARK_SAA     WFPC F300W         2.516  -14.500    -0.70  19  14  WFALL-FIX - - CR-SPLIT=NO
274:13:47:00  274:14:06:00     1151 DARK_SAA   NICMOS F110W         2.516  -14.500    -0.70  19  15       NIC3 - - NSAMP=20
274:14:07:00  274:14:32:00     1472 DARK_SAA   NICMOS F110W         2.516  -14.500    -0.70  19  16       NIC3 - - NSAMP=25
274:15:23:00  274:16:10:00     2819 DARK_SAA     STIS CCD-LP       -2.516   14.500    -0.70  19  30   F28X50LP - - CR-SPLIT=3  RE-ACQ   PAR 32-38 with 30
274:15:27:00  274:16:10:00     2600 DARK_SAA     WFPC F450W        -2.516   14.500    -0.70  19  32  WFALL-FIX - - CR-SPLIT=NO
274:15:23:00  274:15:42:00     1151 DARK_SAA   NICMOS F110W        -2.516   14.500    -0.70  19  33       NIC3 - - NSAMP=20
274:15:43:00  274:16:08:00     1472 DARK_SAA   NICMOS F110W        -2.516   14.500    -0.70  19  34       NIC3 - - NSAMP=25
274:17:01:00  274:17:47:00     2752 DARK_SAA     STIS CCD-LP       -2.516   14.500    -0.70  19  40   F28X50LP - - CR-SPLIT=3  RE-ACQ   PAR 42-48 with 40
274:17:05:00  274:17:47:00     2500 DARK_SAA     WFPC F450W        -2.516   14.500    -0.70  19  42  WFALL-FIX - - CR-SPLIT=NO
274:17:01:00  274:17:20:00     1151 DARK_SAA   NICMOS F160W        -2.516   14.500    -0.70  19  43       NIC3 - - NSAMP=20
274:17:21:00  274:17:46:00     1472 DARK_SAA   NICMOS F160W        -2.516   14.500    -0.70  19  44       NIC3 - - NSAMP=25
274:17:58:00  274:18:17:00     1128 BRIGHT_SAA   STIS G430M-3165    0.000    0.000    -0.70  19  50     52X0.2 - S             RE-ACQ   PAR 52-55 with 50
274:18:02:00  274:18:17:00      900 BRIGHT_SAA   WFPC F300W         0.000    0.000    -0.70  19  52  WFALL-FIX - S CR-SPLIT=NO
274:17:58:00  274:18:12:00      832 BRIGHT_SAA NICMOS F222M         0.000    0.000    -0.70  19  53       NIC3 - S NSAMP=15
274:18:40:00  274:19:24:00     2629 DARK_SAA     STIS CCD-LP        0.000   14.500    -0.70  19  60   F28X50LP O - CR-SPLIT=3  RE-ACQ   PAR 62-68 with 60
274:18:44:00  274:19:24:00     2400 DARK_SAA     WFPC F300W         0.000   14.500    -0.70  19  62  WFALL-FIX O - CR-SPLIT=NO
274:18:40:00  274:18:59:00     1151 DARK_SAA   NICMOS F160W         0.000   14.500    -0.70  19  63       NIC3 O - NSAMP=20
274:19:00:00  274:19:25:00     1472 DARK_SAA   NICMOS F160W         0.000   14.500    -0.70  19  64       NIC3 O - NSAMP=25
274:19:34:00  274:20:01:00     1592 BRIGHT_SAA   STIS G430M-3165    0.000    0.000    -0.70  19  70     52X0.2 O S                      PAR 72 with 70
274:19:37:00  274:20:01:00     1400 BRIGHT_SAA   WFPC F300W         0.000    0.000    -0.70  19  72  WFALL-FIX O S CR-SPLIT=NO
274:20:16:00  274:21:01:00     2688 DARK_SAA     STIS CCD-CLEAR    -2.516    0.000    -0.70  19  70      50CCD O - CR-SPLIT=3  RE-ACQ   PAR 72-78 with 70
274:20:19:00  274:21:01:00     2500 DARK_SAA     WFPC F606W        -2.516    0.000    -0.70  19  72  WFALL-FIX O - CR-SPLIT=NO
274:20:16:00  274:20:35:00     1151 DARK_SAA   NICMOS F160W        -2.516    0.000    -0.70  19  73       NIC3 O - NSAMP=20
274:20:36:00  274:21:01:00     1472 DARK_SAA   NICMOS F160W        -2.516    0.000    -0.70  19  74       NIC3 O - NSAMP=25

Jul 16, 98 16:03 Page 6/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 6/18 draft5b.oh

274:21:04:00  274:21:16:00      709 ACQ-PEAK    ACQPK CCD           0.000    0.000     0.00  20  10    0.2X0.2 - -
274:21:16:00  274:21:50:00     2040 BRIGHT       STIS E230M         0.190    0.000     0.00  20  14 0.2X0.2FPB - -             FULL-ACQ PAR 16-22 with 14
274:21:20:00  274:21:50:00     1800 BRIGHT       WFPC F300W         0.190    0.000     0.00  20  16  WFALL-FIX - - CR-SPLIT=NO
274:21:16:00  274:21:30:00      832 BRIGHT     NICMOS F222M         0.190    0.000     0.00  20  17       NIC3 - - NSAMP=15
274:21:31:00  274:21:50:00     1151 BRIGHT     NICMOS F222M         0.190    0.000     0.00  20  18       NIC3 - - NSAMP=20
274:22:00:00  274:22:38:00     2309 DARK         STIS E230M         0.240    0.000     0.00  20  30 0.2X0.2FPC O S                      PAR 32-38 with 30
274:22:03:00  274:22:38:00     2100 DARK         WFPC F606W         0.240    0.000     0.00  20  32  WFALL-FIX O S CR-SPLIT=NO
274:22:00:00  274:22:13:00      832 DARK       NICMOS F160W         0.240    0.000     0.00  20  33       NIC3 O S NSAMP=15
274:22:14:00  274:22:39:00     1472 DARK       NICMOS F160W         0.240    0.000     0.00  20  34       NIC3 O S NSAMP=25
274:22:45:00  274:23:30:00     2700 BRIGHT       STIS E230M         0.240    0.000     0.00  20  40 0.2X0.2FPC - S             RE-ACQ   PAR 42-48 with 40
274:22:48:00  274:23:30:00     2500 BRIGHT       WFPC F300W         0.240    0.000     0.00  20  42  WFALL-FIX - S CR-SPLIT=NO
274:22:45:00  274:23:04:00     1151 BRIGHT     NICMOS F222M         0.240    0.000     0.00  20  43       NIC3 - S NSAMP=20
274:23:05:00  274:23:30:00     1472 BRIGHT     NICMOS F222M         0.240    0.000     0.00  20  44       NIC3 - S NSAMP=25
274:23:39:00  275:00:16:00     2220 DARK         STIS E230M         0.240    0.000     0.00  20  50 0.2X0.2FPC O S                      PAR 52-58 with 50
274:23:43:00  275:00:16:00     2000 DARK         WFPC F814W         0.240    0.000     0.00  20  52  WFALL-FIX O S CR-SPLIT=NO
274:23:39:00  274:23:53:00      832 DARK       NICMOS F110W         0.240    0.000     0.00  20  53       NIC3 O S NSAMP=15
274:23:54:00  275:00:13:00     1151 DARK       NICMOS F110W         0.240    0.000     0.00  20  54       NIC3 O S NSAMP=20
275:00:25:00  275:01:04:00     2340 BRIGHT       STIS E230M         0.240    0.000     0.00  20  60 0.2X0.2FPC O S                      PAR 62-68 with 60
275:00:29:00  275:01:04:00     2100 BRIGHT       WFPC F300W         0.240    0.000     0.00  20  62  WFALL-FIX O S CR-SPLIT=NO
275:00:25:00  275:00:39:00      832 BRIGHT     NICMOS F222M         0.240    0.000     0.00  20  63       NIC3 O S NSAMP=15
275:00:40:00  275:01:04:00     1472 BRIGHT     NICMOS F222M         0.240    0.000     0.00  20  64       NIC3 O S NSAMP=25
275:01:14:00  275:01:53:00     2370 DARK         STIS E230M         0.360    0.000     0.00  20  70 0.2X0.2FPD O S                      PAR 72-78 with 70
275:01:18:00  275:01:53:00     2100 DARK         WFPC F814W         0.360    0.000     0.00  20  72  WFALL-FIX O S CR-SPLIT=NO
275:01:14:00  275:01:27:00      832 DARK       NICMOS F110W         0.360    0.000     0.00  20  73       NIC3 O S NSAMP=15
275:01:28:00  275:01:53:00     1472 DARK       NICMOS F110W         0.360    0.000     0.00  20  74       NIC3 O S NSAMP=25
275:01:53:00  275:02:05:00      720 ACQ-PEAK    ACQPK CCD           0.000    0.000     0.70  21  10    0.2X0.2 - -
275:02:08:00  275:02:41:00     1980 BRIGHT       STIS E230M         0.360    0.000     0.70  21  14 0.2X0.2FPD - -             FULL-ACQ PAR 16 with 14
275:02:11:00  275:02:41:00     1800 BRIGHT       WFPC F300W         0.360    0.000     0.70  21  16  WFALL-FIX - - CR-SPLIT=NO
275:02:50:00  275:03:30:00     2400 DARK         STIS E230M         0.360    0.000     0.70  21  80 0.2X0.2FPD O S                      PAR 82-88 with 80
275:02:53:00  275:03:30:00     2200 DARK         WFPC F814W         0.360    0.000     0.70  21  82  WFALL-FIX O S CR-SPLIT=NO
275:02:50:00  275:03:04:00      832 DARK       NICMOS F110W         0.360    0.000     0.70  21  83       NIC3 O S NSAMP=15
275:03:05:00  275:03:29:00     1472 DARK       NICMOS F110W         0.360    0.000     0.70  21  84       NIC3 O S NSAMP=25
275:03:40:00  275:04:17:00     2250 BRIGHT       STIS E230M         0.620    0.000     0.70  21  90 0.2X0.2FPE O S                      PAR 92-98 with 90
275:03:44:00  275:04:17:00     2000 BRIGHT       WFPC F300W         0.620    0.000     0.70  21  92  WFALL-FIX O S CR-SPLIT=NO
275:03:40:00  275:03:53:00      832 BRIGHT     NICMOS F222M         0.620    0.000     0.70  21  93       NIC3 O S NSAMP=15
275:03:54:00  275:04:14:00     1151 BRIGHT     NICMOS F222M         0.620    0.000     0.70  21  94       NIC3 O S NSAMP=20
275:04:26:00  275:05:07:00     2460 DARK         STIS E230M         0.620    0.000     0.70  21 100 0.2X0.2FPE O S                      PAR 102-108 with 100
275:04:30:00  275:05:07:00     2200 DARK         WFPC F814W         0.620    0.000     0.70  21 102  WFALL-FIX O S CR-SPLIT=NO
275:04:26:00  275:04:40:00      832 DARK       NICMOS F110W         0.620    0.000     0.70  21 103       NIC3 O S NSAMP=15
275:04:41:00  275:05:05:00     1472 DARK       NICMOS F110W         0.620    0.000     0.70  21 104       NIC3 O S NSAMP=25
275:05:16:00  275:05:54:00     2280 BRIGHT       STIS E230M         0.620    0.000     0.70  21 110 0.2X0.2FPE O S                      PAR 112-118 with 110
275:05:19:00  275:05:54:00     2100 BRIGHT       WFPC F300W         0.620    0.000     0.70  21 112  WFALL-FIX O S CR-SPLIT=NO
275:05:16:00  275:05:30:00      832 BRIGHT     NICMOS F222M         0.620    0.000     0.70  21 113       NIC3 O S NSAMP=15
275:05:31:00  275:05:50:00     1151 BRIGHT     NICMOS F222M         0.620    0.000     0.70  21 114       NIC3 O S NSAMP=20
275:06:04:00  275:06:30:00     1590 DARK         STIS E230M         0.000    0.000     0.70  21 120 0.2X0.2FPA O S                      PAR 122-128 with 120
275:06:07:00  275:06:30:00     1400 DARK         WFPC F450W         0.000    0.000     0.70  21 122  WFALL-FIX O S CR-SPLIT=NO
275:06:04:00  275:06:07:00      191 DARK       NICMOS F160W         0.000    0.000     0.70  21 123       NIC3 O S NSAMP=5
275:06:08:00  275:06:27:00     1151 DARK       NICMOS F160W         0.000    0.000     0.70  21 124       NIC3 O S NSAMP=20
275:06:35:00  275:06:40:00      300 STIS_STOP    WFPC F450W         0.000    0.000     0.70  21 130  WFALL-FIX O S CR-SPLIT=NO          PAR 131-133 with 130
275:06:35:00  275:06:38:00      191 STIS_STOP  NICMOS F160W         0.000    0.000     0.70  21 131       NIC3 O S NSAMP=5
275:07:14:00  275:07:31:00     1020 BRIGHT_SAA   STIS G430M-3165    0.000    0.000     0.00  22  12     52X0.2 - -             FULL-ACQ PAR 14-17 with 12
275:07:18:00  275:07:31:00      800 BRIGHT_SAA   WFPC F300W         0.000    0.000     0.00  22  14  WFALL-FIX - - CR-SPLIT=NO
275:07:14:00  275:07:28:00      832 BRIGHT_SAA NICMOS F222M         0.000    0.000     0.00  22  15       NIC3 - - NSAMP=15
275:07:36:00  275:08:17:00     2477 DARK_SAA     STIS CCD-CLEAR     0.000    0.000     0.00  22  20      50CCD O S CR-SPLIT=3           PAR 22-28 with 20
275:07:41:00  275:08:17:00     2200 DARK_SAA     WFPC F450W         0.000    0.000     0.00  22  22  WFALL-FIX O S CR-SPLIT=NO
275:07:36:00  275:07:50:00      832 DARK_SAA   NICMOS F160W         0.000    0.000     0.00  22  23       NIC3 O S NSAMP=15
275:07:51:00  275:08:15:00     1472 DARK_SAA   NICMOS F160W         0.000    0.000     0.00  22  24       NIC3 O S NSAMP=25
275:08:50:00  275:09:08:00     1080 BRIGHT_SAA   STIS G430M-3165    0.000    0.000     0.00  22  30     52X0.2 O -             RE-ACQ   PAR 32-35 with 30
275:08:53:00  275:09:08:00      900 BRIGHT_SAA   WFPC F300W         0.000    0.000     0.00  22  32  WFALL-FIX O - CR-SPLIT=NO
275:08:50:00  275:09:04:00      832 BRIGHT_SAA NICMOS F222M         0.000    0.000     0.00  22  33       NIC3 O - NSAMP=15
275:09:13:00  275:09:57:00     2612 DARK_SAA     STIS CCD-CLEAR     0.000    0.000     0.00  22  40      50CCD O S CR-SPLIT=3           PAR 42-48 with 40
275:09:17:00  275:09:57:00     2400 DARK_SAA     WFPC F450W         0.000    0.000     0.00  22  42  WFALL-FIX O S CR-SPLIT=NO
275:09:13:00  275:09:27:00      832 DARK_SAA   NICMOS F160W         0.000    0.000     0.00  22  43       NIC3 O S NSAMP=15
275:09:28:00  275:09:52:00     1472 DARK_SAA   NICMOS F160W         0.000    0.000     0.00  22  44       NIC3 O S NSAMP=25
275:10:32:00  275:10:45:00      780 BRIGHT_SAA   STIS G430M-3165    0.000    2.516     0.00  22  50     52X0.2 O -             RE-ACQ   PAR 52-55 with 50
275:10:35:00  275:10:45:00      600 BRIGHT_SAA   WFPC F300W         0.000    2.516     0.00  22  52  WFALL-FIX O - CR-SPLIT=NO

Jul 16, 98 16:03 Page 7/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 7/18 draft5b.oh

275:10:32:00  275:10:41:00      512 BRIGHT_SAA NICMOS F222M         0.000    2.516     0.00  22  53       NIC3 O - NSAMP=10
275:10:51:00  275:11:34:00     2610 DARK_SAA     STIS CCD-CLEAR     2.516    0.000     0.00  22  60      50CCD O S CR-SPLIT=3           PAR 62-68 with 60
275:10:54:00  275:11:34:00     2400 DARK_SAA     WFPC F450W         2.516    0.000     0.00  22  62  WFALL-FIX O S CR-SPLIT=NO
275:10:51:00  275:11:04:00      832 DARK_SAA   NICMOS F160W         2.516    0.000     0.00  22  63       NIC3 O S NSAMP=15
275:11:05:00  275:11:30:00     1472 DARK_SAA   NICMOS F160W         2.516    0.000     0.00  22  64       NIC3 O S NSAMP=25
275:12:12:00  275:12:22:00      600 BRIGHT_SAA   STIS G430M-3165    0.000    2.516     0.00  22  70     52X0.2 O -             RE-ACQ   PAR 72-75 with 70
275:12:15:00  275:12:22:00      400 BRIGHT_SAA   WFPC F300W         0.000    2.516     0.00  22  72  WFALL-FIX O - CR-SPLIT=NO
275:12:12:00  275:12:21:00      512 BRIGHT_SAA NICMOS F222M         0.000    2.516     0.00  22  73       NIC3 O - NSAMP=10
275:12:28:00  275:13:11:00     2610 DARK_SAA     STIS CCD-CLEAR     2.516    0.000     0.00  22  80      50CCD O S CR-SPLIT=3           PAR 82-88 with 80
275:12:31:00  275:13:11:00     2400 DARK_SAA     WFPC F606W         2.516    0.000     0.00  22  82  WFALL-FIX O S CR-SPLIT=NO
275:12:28:00  275:12:41:00      832 DARK_SAA   NICMOS F110W         2.516    0.000     0.00  22  83       NIC3 O S NSAMP=15
275:12:42:00  275:13:07:00     1472 DARK_SAA   NICMOS F110W         2.516    0.000     0.00  22  84       NIC3 O S NSAMP=25
275:13:58:00  275:14:47:00     2940 DARK_SAA     STIS CCD-CLEAR    -2.516    2.516     0.70  23  12      50CCD - - CR-SPLIT=3  FULL-ACQ PAR 14-20 with 12
275:14:02:00  275:14:47:00     2700 DARK_SAA     WFPC F606W        -2.516    2.516     0.70  23  14  WFALL-FIX - - CR-SPLIT=NO
275:13:58:00  275:14:17:00     1151 DARK_SAA   NICMOS F110W        -2.516    2.516     0.70  23  15       NIC3 - - NSAMP=20
275:14:18:00  275:14:43:00     1472 DARK_SAA   NICMOS F110W        -2.516    2.516     0.70  23  16       NIC3 - - NSAMP=25
275:15:35:00  275:16:24:00     2940 DARK_SAA     STIS CCD-CLEAR    -2.516    2.516     0.70  23  30      50CCD O - CR-SPLIT=3  RE-ACQ   PAR 32-38 with 30
275:15:39:00  275:16:24:00     2700 DARK_SAA     WFPC F606W        -2.516    2.516     0.70  23  32  WFALL-FIX O - CR-SPLIT=NO
275:15:35:00  275:15:54:00     1151 DARK_SAA   NICMOS F110W        -2.516    2.516     0.70  23  33       NIC3 O - NSAMP=20
275:15:55:00  275:16:20:00     1472 DARK_SAA   NICMOS F110W        -2.516    2.516     0.70  23  34       NIC3 O - NSAMP=25
275:16:34:00  275:16:47:00      750 BRIGHT_SAA   STIS G430M-3165    0.000    2.516     0.70  23  40     52X0.2 O S                      PAR 42-45 with 40
275:16:38:00  275:16:47:00      500 BRIGHT_SAA   WFPC F300W         0.000    2.516     0.70  23  42  WFALL-FIX O S CR-SPLIT=NO
275:16:34:00  275:16:43:00      511 BRIGHT_SAA NICMOS F222M         0.000    2.516     0.70  23  43       NIC3 O S NSAMP=10
275:17:12:00  275:18:01:00     2940 DARK_SAA     STIS CCD-CLEAR     0.000    2.516     0.70  23  50      50CCD O - CR-SPLIT=3  RE-ACQ   PAR 52-58 with 50
275:17:16:00  275:18:01:00     2700 DARK_SAA     WFPC F606W         0.000    2.516     0.70  23  52  WFALL-FIX O - CR-SPLIT=NO
275:17:12:00  275:17:31:00     1152 DARK_SAA   NICMOS F110W         0.000    2.516     0.70  23  53       NIC3 O - NSAMP=20
275:17:32:00  275:17:57:00     1471 DARK_SAA   NICMOS F110W         0.000    2.516     0.70  23  54       NIC3 O - NSAMP=25
275:18:11:00  275:18:29:00     1132 BRIGHT_SAA   STIS G430M-3165    0.000    2.516     0.70  23  60     52X0.2 O S                      PAR 62-65 with 60
275:18:14:00  275:18:29:00      900 BRIGHT_SAA   WFPC F300W         0.000    2.516     0.70  23  62  WFALL-FIX O S CR-SPLIT=NO
275:18:11:00  275:18:24:00      832 BRIGHT_SAA NICMOS F222M         0.000    2.516     0.70  23  63       NIC3 O S NSAMP=15
275:18:51:00  275:19:38:00     2820 DARK_SAA     STIS CCD-CLEAR     0.000    2.516     0.70  23  70      50CCD O - CR-SPLIT=3  RE-ACQ   PAR 72-78 with 70
275:18:55:00  275:19:38:00     2600 DARK_SAA     WFPC F814W         0.000    2.516     0.70  23  72  WFALL-FIX O - CR-SPLIT=NO
275:18:51:00  275:19:10:00     1152 DARK_SAA   NICMOS F160W         0.000    2.516     0.70  23  73       NIC3 O - NSAMP=20
275:19:11:00  275:19:36:00     1471 DARK_SAA   NICMOS F160W         0.000    2.516     0.70  23  74       NIC3 O - NSAMP=25
275:19:48:00  275:20:16:00     1694 BRIGHT_SAA   STIS G430M-3165    0.000    2.516     0.70  23  80     52X0.2 O S                      PAR 82 with 80
275:19:51:00  275:20:16:00     1500 BRIGHT_SAA   WFPC F300W         0.000    2.516     0.70  23  82  WFALL-FIX O S CR-SPLIT=NO
275:20:18:00  275:20:24:00      330 ACQ-PEAK    ACQPK CCD           0.000    0.000     1.05  24  10    0.2X0.2 - -
275:20:31:00  275:21:15:00     2655 DARK         STIS E230M         0.000    0.000     1.05  24  14 0.2X0.2FPA - -             FULL-ACQ PAR 16-22 with 14
275:20:35:00  275:21:15:00     2400 DARK         WFPC F814W         0.000    0.000     1.05  24  16  WFALL-FIX - - CR-SPLIT=NO
275:20:31:00  275:20:50:00     1152 DARK       NICMOS F160W         0.000    0.000     1.05  24  17       NIC3 - - NSAMP=20
275:20:51:00  275:21:15:00     1471 DARK       NICMOS F160W         0.000    0.000     1.05  24  18       NIC3 - - NSAMP=25
275:21:24:00  275:22:03:00     2340 BRIGHT       STIS E230M         0.000    0.000     1.05  24  30 0.2X0.2FPA O S                      PAR 32-38 with 30
275:21:28:00  275:22:03:00     2100 BRIGHT       WFPC F300W         0.000    0.000     1.05  24  32  WFALL-FIX O S CR-SPLIT=NO
275:21:24:00  275:21:38:00      832 BRIGHT     NICMOS F222M         0.000    0.000     1.05  24  33       NIC3 O S NSAMP=15
275:21:39:00  275:22:03:00     1471 BRIGHT     NICMOS F222M         0.000    0.000     1.05  24  34       NIC3 O S NSAMP=25
275:22:13:00  275:22:51:00     2310 DARK         STIS E230M         0.190    0.000     1.05  24  40 0.2X0.2FPB O S                      PAR 42-48 with 40
275:22:16:00  275:22:51:00     2100 DARK         WFPC F814W         0.190    0.000     1.05  24  42  WFALL-FIX O S CR-SPLIT=NO
275:22:13:00  275:22:26:00      832 DARK       NICMOS F160W         0.190    0.000     1.05  24  43       NIC3 O S NSAMP=15
275:22:27:00  275:22:52:00     1471 DARK       NICMOS F160W         0.190    0.000     1.05  24  44       NIC3 O S NSAMP=25
275:23:00:00  275:23:39:00     2340 BRIGHT       STIS E230M         0.190    0.000     1.05  24  50 0.2X0.2FPB O S                      PAR 52-58 with 50
275:23:04:00  275:23:39:00     2100 BRIGHT       WFPC F300W         0.190    0.000     1.05  24  52  WFALL-FIX O S CR-SPLIT=NO
275:23:00:00  275:23:14:00      832 BRIGHT     NICMOS DARK          0.190    0.000     1.05  24  53       NIC3 O S NSAMP=15
275:23:15:00  275:23:39:00     1471 BRIGHT     NICMOS DARK          0.190    0.000     1.05  24  54       NIC3 O S NSAMP=25
275:23:48:00  276:00:28:00     2400 DARK         STIS E230M         0.190    0.000     1.05  24  60 0.2X0.2FPB O S                      PAR 62-68 with 60
275:23:51:00  276:00:28:00     2200 DARK         WFPC F814W         0.190    0.000     1.05  24  62  WFALL-FIX O S CR-SPLIT=NO
275:23:48:00  276:00:02:00      832 DARK       NICMOS F160W         0.190    0.000     1.05  24  63       NIC3 O S NSAMP=15
276:00:03:00  276:00:27:00     1471 DARK       NICMOS F160W         0.190    0.000     1.05  24  64       NIC3 O S NSAMP=25
276:00:28:00  276:00:40:00      720 ACQ-PEAK    ACQPK CCD           0.000    0.000    -1.05  25  10    0.2X0.2 - -
276:00:43:00  276:01:16:00     1980 BRIGHT       STIS E230M         0.240    0.000    -1.05  25  14 0.2X0.2FPC - -             FULL-ACQ PAR 16 with 14
276:00:46:00  276:01:16:00     1800 BRIGHT       WFPC F300W         0.240    0.000    -1.05  25  16  WFALL-FIX - - CR-SPLIT=NO
276:01:25:00  276:02:05:00     2400 DARK         STIS E230M         0.240    0.000    -1.05  25  70 0.2X0.2FPC O S                      PAR 72-78 with 70
276:01:28:00  276:02:05:00     2200 DARK         WFPC F450W         0.240    0.000    -1.05  25  72  WFALL-FIX O S CR-SPLIT=NO
276:01:25:00  276:01:39:00      832 DARK       NICMOS F110W         0.240    0.000    -1.05  25  73       NIC3 O S NSAMP=15
276:01:40:00  276:02:04:00     1471 DARK       NICMOS F110W         0.240    0.000    -1.05  25  74       NIC3 O S NSAMP=25
276:02:14:00  276:02:53:00     2340 BRIGHT       STIS E230M         0.240    0.000    -1.05  25  80 0.2X0.2FPC O S                      PAR 82-88 with 80
276:02:18:00  276:02:53:00     2100 BRIGHT       WFPC F300W         0.240    0.000    -1.05  25  82  WFALL-FIX O S CR-SPLIT=NO

Jul 16, 98 16:03 Page 8/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 8/18 draft5b.oh

276:02:14:00  276:02:28:00      832 BRIGHT     NICMOS F222M         0.240    0.000    -1.05  25  83       NIC3 O S NSAMP=15
276:02:29:00  276:02:53:00     1471 BRIGHT     NICMOS F222M         0.240    0.000    -1.05  25  84       NIC3 O S NSAMP=25
276:03:03:00  276:03:42:00     2370 DARK         STIS E230M         0.360    0.000    -1.05  25  90 0.2X0.2FPD O S                      PAR 92-98 with 90
276:03:07:00  276:03:42:00     2100 DARK         WFPC F450W         0.360    0.000    -1.05  25  92  WFALL-FIX O S CR-SPLIT=NO
276:03:03:00  276:03:16:00      832 DARK       NICMOS F110W         0.360    0.000    -1.05  25  93       NIC3 O S NSAMP=15
276:03:17:00  276:03:42:00     1471 DARK       NICMOS F110W         0.360    0.000    -1.05  25  94       NIC3 O S NSAMP=25
276:03:51:00  276:04:30:00     2340 BRIGHT       STIS E230M         0.360    0.000    -1.05  25 100 0.2X0.2FPD O S                      PAR 102-108 with 100
276:03:55:00  276:04:30:00     2100 BRIGHT       WFPC DARK          0.360    0.000    -1.05  25 102  WFALL-FIX O S CR-SPLIT=NO
276:03:51:00  276:04:05:00      832 BRIGHT     NICMOS F222M         0.360    0.000    -1.05  25 103       NIC3 O S NSAMP=15
276:04:06:00  276:04:30:00     1471 BRIGHT     NICMOS F222M         0.360    0.000    -1.05  25 104       NIC3 O S NSAMP=25
276:04:39:00  276:05:09:00     1800 DARK         STIS E230M         0.360    0.000    -1.05  25 110 0.2X0.2FPD O S                      PAR 112-118 with 110
276:04:42:00  276:05:09:00     1600 DARK         WFPC F450W         0.360    0.000    -1.05  25 112  WFALL-FIX O S CR-SPLIT=NO
276:04:39:00  276:04:48:00      511 DARK       NICMOS F110W         0.360    0.000    -1.05  25 113       NIC3 O S NSAMP=10
276:04:49:00  276:05:08:00     1152 DARK       NICMOS F110W         0.360    0.000    -1.05  25 114       NIC3 O S NSAMP=20
276:05:14:00  276:05:19:00      300 STIS_STOP    WFPC F450W         0.000    0.000    -1.05  25 120  WFALL-FIX O S CR-SPLIT=NO          PAR 121-123 with 120
276:05:14:00  276:05:17:00      192 STIS_STOP  NICMOS F110W         0.000    0.000    -1.05  25 121       NIC3 O S NSAMP=5
276:05:42:00  276:06:07:00     1500 BRIGHT_SAA   STIS G430M-3165    0.000    2.516     1.05  26  12     52X0.2 - -             FULL-ACQ PAR 14-20 with 12
276:05:45:00  276:06:07:00     1300 BRIGHT_SAA   WFPC F300W         0.000    2.516     1.05  26  14  WFALL-FIX - - CR-SPLIT=NO
276:05:42:00  276:05:45:00      192 BRIGHT_SAA NICMOS F222M         0.000    2.516     1.05  26  15       NIC3 - - NSAMP=5
276:05:46:00  276:06:05:00     1152 BRIGHT_SAA NICMOS F222M         0.000    2.516     1.05  26  16       NIC3 - - NSAMP=20
276:06:13:00  276:06:49:00     2207 DARK_SAA     STIS CCD-CLEAR     2.516    2.516     1.05  26  30      50CCD O S CR-SPLIT=3           PAR 32-38 with 30
276:06:16:00  276:06:49:00     2000 DARK_SAA     WFPC F450W         2.516    2.516     1.05  26  32  WFALL-FIX O S CR-SPLIT=NO
276:06:13:00  276:06:26:00      832 DARK_SAA   NICMOS F110W         2.516    2.516     1.05  26  33       NIC3 O S NSAMP=15
276:06:27:00  276:06:47:00     1152 DARK_SAA   NICMOS F110W         2.516    2.516     1.05  26  34       NIC3 O S NSAMP=20
276:07:20:00  276:07:44:00     1440 BRIGHT_SAA   STIS G430M-3423    0.000    0.000     1.05  26  40     52X0.2 O -             RE-ACQ   PAR 42-45 with 40
276:07:24:00  276:07:44:00     1200 BRIGHT_SAA   WFPC F300W         0.000    0.000     1.05  26  42  WFALL-FIX O - CR-SPLIT=NO
276:07:20:00  276:07:39:00     1152 BRIGHT_SAA NICMOS F222M         0.000    0.000     1.05  26  43       NIC3 O - NSAMP=20
276:07:50:00  276:08:28:00     2325 DARK_SAA     STIS CCD-CLEAR     2.516    2.516     1.05  26  50      50CCD O S CR-SPLIT=3           PAR 52-58 with 50
276:07:53:00  276:08:28:00     2100 DARK_SAA     WFPC F606W         2.516    2.516     1.05  26  52  WFALL-FIX O S CR-SPLIT=NO
276:07:50:00  276:08:03:00      832 DARK_SAA   NICMOS F160W         2.516    2.516     1.05  26  53       NIC3 O S NSAMP=15
276:08:04:00  276:08:29:00     1471 DARK_SAA   NICMOS F160W         2.516    2.516     1.05  26  54       NIC3 O S NSAMP=25
276:09:03:00  276:09:20:00     1020 BRIGHT_SAA   STIS G430M-3423    0.000    2.516     1.05  26  60     52X0.2 O -             RE-ACQ   PAR 62-65 with 60
276:09:07:00  276:09:20:00      800 BRIGHT_SAA   WFPC F300W         0.000    2.516     1.05  26  62  WFALL-FIX O - CR-SPLIT=NO
276:09:03:00  276:09:17:00      832 BRIGHT_SAA NICMOS F222M         0.000    2.516     1.05  26  63       NIC3 O - NSAMP=15
276:09:26:00  276:10:08:00     2530 DARK_SAA     STIS CCD-LP        0.000   14.500     1.05  26  70   F28X50LP O S CR-SPLIT=3           PAR 72-78 with 70
276:09:29:00  276:10:08:00     2300 DARK_SAA     WFPC F300W         0.000   14.500     1.05  26  72  WFALL-FIX O S CR-SPLIT=NO
276:09:26:00  276:09:39:00      832 DARK_SAA   NICMOS F160W         0.000   14.500     1.05  26  73       NIC3 O S NSAMP=15
276:09:40:00  276:10:05:00     1471 DARK_SAA   NICMOS F160W         0.000   14.500     1.05  26  74       NIC3 O S NSAMP=25
276:10:44:00  276:10:57:00      780 BRIGHT_SAA   STIS G430M-3423    0.000    2.516     1.05  26  80     52X0.2 O -             RE-ACQ   PAR 82-85 with 80
276:10:47:00  276:10:57:00      600 BRIGHT_SAA   WFPC F300W         0.000    2.516     1.05  26  82  WFALL-FIX O - CR-SPLIT=NO
276:10:44:00  276:10:53:00      511 BRIGHT_SAA NICMOS F222M         0.000    2.516     1.05  26  83       NIC3 O - NSAMP=10
276:11:03:00  276:11:46:00     2610 DARK_SAA     STIS CCD-LP        2.516   14.500     1.05  26  90   F28X50LP O S CR-SPLIT=3           PAR 92-98 with 90
276:11:06:00  276:11:46:00     2400 DARK_SAA     WFPC F300W         2.516   14.500     1.05  26  92  WFALL-FIX O S CR-SPLIT=NO
276:11:03:00  276:11:16:00      832 DARK_SAA   NICMOS F160W         2.516   14.500     1.05  26  93       NIC3 O S NSAMP=15
276:11:17:00  276:11:42:00     1471 DARK_SAA   NICMOS F160W         2.516   14.500     1.05  26  94       NIC3 O S NSAMP=25
276:12:34:00  276:13:23:00     2940 DARK_SAA     STIS CCD-LP        2.516   14.500    -1.05  27  12   F28X50LP - - CR-SPLIT=3  FULL-ACQ PAR 14-20 with 12
276:12:38:00  276:13:23:00     2700 DARK_SAA     WFPC F606W         2.516   14.500    -1.05  27  14  WFALL-FIX - - CR-SPLIT=NO
276:12:34:00  276:12:53:00     1152 DARK_SAA   NICMOS F160W         2.516   14.500    -1.05  27  15       NIC3 - - NSAMP=20
276:12:54:00  276:13:19:00     1471 DARK_SAA   NICMOS F160W         2.516   14.500    -1.05  27  16       NIC3 - - NSAMP=25
276:14:11:00  276:15:00:00     2940 DARK_SAA     STIS CCD-LP       -2.516  -14.500    -1.05  27  30   F28X50LP O - CR-SPLIT=3  RE-ACQ   PAR 32-38 with 30
276:14:15:00  276:15:00:00     2700 DARK_SAA     WFPC F450W        -2.516  -14.500    -1.05  27  32  WFALL-FIX O - CR-SPLIT=NO
276:14:11:00  276:14:30:00     1152 DARK_SAA   NICMOS F110W        -2.516  -14.500    -1.05  27  33       NIC3 O - NSAMP=20
276:14:31:00  276:14:56:00     1471 DARK_SAA   NICMOS F110W        -2.516  -14.500    -1.05  27  34       NIC3 O - NSAMP=25
276:15:48:00  276:16:36:00     2880 DARK_SAA     STIS CCD-CLEAR    -2.516   -2.516    -1.05  27  40      50CCD O - CR-SPLIT=3  RE-ACQ   PAR 42-48 with 40
276:15:51:00  276:16:36:00     2700 DARK_SAA     WFPC F814W        -2.516   -2.516    -1.05  27  42  WFALL-FIX O - CR-SPLIT=NO
276:15:48:00  276:16:07:00     1152 DARK_SAA   NICMOS F110W        -2.516   -2.516    -1.05  27  43       NIC3 O - NSAMP=20
276:16:08:00  276:16:33:00     1471 DARK_SAA   NICMOS F110W        -2.516   -2.516    -1.05  27  44       NIC3 O - NSAMP=25
276:16:46:00  276:16:59:00      812 BRIGHT_SAA   STIS G430M-3423   -2.516   -2.516    -1.05  27  50     52X0.2 O S                      PAR 52-55 with 50
276:16:49:00  276:16:59:00      600 BRIGHT_SAA   WFPC F300W        -2.516   -2.516    -1.05  27  52  WFALL-FIX O S CR-SPLIT=NO
276:16:46:00  276:16:54:00      511 BRIGHT_SAA NICMOS F222M        -2.516   -2.516    -1.05  27  53       NIC3 O S NSAMP=10
276:17:24:00  276:18:13:00     2940 DARK_SAA     STIS CCD-CLEAR    -2.516   -2.516    -1.05  27  60      50CCD O - CR-SPLIT=3  RE-ACQ   PAR 62-68 with 60
276:17:28:00  276:18:13:00     2700 DARK_SAA     WFPC F814W        -2.516   -2.516    -1.05  27  62  WFALL-FIX O - CR-SPLIT=NO
276:17:24:00  276:17:43:00     1152 DARK_SAA   NICMOS F110W        -2.516   -2.516    -1.05  27  63       NIC3 O - NSAMP=20
276:17:44:00  276:18:09:00     1471 DARK_SAA   NICMOS F110W        -2.516   -2.516    -1.05  27  64       NIC3 O - NSAMP=25
276:18:21:00  276:18:42:00     1264 BRIGHT_SAA   STIS DARK         -2.516   -2.516    -1.05  27  70      50CCD O S                      PAR 72 with 70
276:18:25:00  276:18:42:00     1000 BRIGHT_SAA   WFPC F300W        -2.516   -2.516    -1.05  27  72  WFALL-FIX O S CR-SPLIT=NO

Jul 16, 98 16:03 Page 9/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 9/18 draft5b.oh

276:18:55:00  276:19:07:00      709 ACQ-PEAK    ACQPK CCD           0.000    0.000    -0.70  28  10    0.2X0.2 - -
276:19:07:00  276:19:50:00     2580 DARK         STIS E230M         0.620    0.000    -0.70  28  14 0.2X0.2FPE - -             FULL-ACQ PAR 16-22 with 14
276:19:10:00  276:19:50:00     2400 DARK         WFPC F814W         0.620    0.000    -0.70  28  16  WFALL-FIX - - CR-SPLIT=NO
276:19:07:00  276:19:21:00      832 DARK       NICMOS F110W         0.620    0.000    -0.70  28  17       NIC3 - - NSAMP=15
276:19:22:00  276:19:46:00     1471 DARK       NICMOS F110W         0.620    0.000    -0.70  28  18       NIC3 - - NSAMP=25
276:19:59:00  276:20:38:00     2340 BRIGHT       STIS E230M         0.620    0.000    -0.70  28  30 0.2X0.2FPE O S                      PAR 32-38 with 30
276:20:03:00  276:20:38:00     2100 BRIGHT       WFPC F300W         0.620    0.000    -0.70  28  32  WFALL-FIX O S CR-SPLIT=NO
276:19:59:00  276:20:13:00      832 BRIGHT     NICMOS F222M         0.620    0.000    -0.70  28  33       NIC3 O S NSAMP=15
276:20:14:00  276:20:38:00     1471 BRIGHT     NICMOS F222M         0.620    0.000    -0.70  28  34       NIC3 O S NSAMP=25
276:20:47:00  276:21:27:00     2400 DARK         STIS E230M         0.620    0.000    -0.70  28  40 0.2X0.2FPE O S                      PAR 42-48 with 40
276:20:50:00  276:21:27:00     2200 DARK         WFPC F450W         0.620    0.000    -0.70  28  42  WFALL-FIX O S CR-SPLIT=NO
276:20:47:00  276:21:01:00      832 DARK       NICMOS F160W         0.620    0.000    -0.70  28  43       NIC3 O S NSAMP=15
276:21:02:00  276:21:26:00     1471 DARK       NICMOS F160W         0.620    0.000    -0.70  28  44       NIC3 O S NSAMP=25
276:21:37:00  276:22:15:00     2310 BRIGHT       STIS E230M         0.000    0.000    -0.70  28  50 0.2X0.2FPA O S                      PAR 52-58 with 50
276:21:40:00  276:22:15:00     2100 BRIGHT       WFPC F300W         0.000    0.000    -0.70  28  52  WFALL-FIX O S CR-SPLIT=NO
276:21:37:00  276:21:50:00      832 BRIGHT     NICMOS F222M         0.000    0.000    -0.70  28  53       NIC3 O S NSAMP=15
276:21:51:00  276:22:16:00     1471 BRIGHT     NICMOS F222M         0.000    0.000    -0.70  28  54       NIC3 O S NSAMP=25
276:22:24:00  276:23:04:00     2400 DARK         STIS E230M         0.000    0.000    -0.70  28  60 0.2X0.2FPA O S                      PAR 62-68 with 60
276:22:27:00  276:23:04:00     2200 DARK         WFPC F450W         0.000    0.000    -0.70  28  62  WFALL-FIX O S CR-SPLIT=NO
276:22:24:00  276:22:38:00      832 DARK       NICMOS F160W         0.000    0.000    -0.70  28  63       NIC3 O S NSAMP=15
276:22:39:00  276:23:03:00     1471 DARK       NICMOS F160W         0.000    0.000    -0.70  28  64       NIC3 O S NSAMP=25
276:23:04:00  276:23:16:00      720 ACQ-PEAK    ACQPK CCD           0.000    0.000     0.00  29  10    0.2X0.2 - -
276:23:19:00  276:23:52:00     1980 BRIGHT       STIS E230M         0.000    0.000     0.00  29  14 0.2X0.2FPA - -             FULL-ACQ PAR 16-22 with 14
276:23:22:00  276:23:52:00     1800 BRIGHT       WFPC F300W         0.000    0.000     0.00  29  16  WFALL-FIX - - CR-SPLIT=NO
276:23:19:00  276:23:22:00      192 BRIGHT     NICMOS DARK          0.000    0.000     0.00  29  17       NIC3 - - NSAMP=5
276:23:23:00  276:23:48:00     1471 BRIGHT     NICMOS DARK          0.000    0.000     0.00  29  18       NIC3 - - NSAMP=25
277:00:02:00  277:00:40:00     2310 DARK         STIS E230M         0.190    0.000     0.00  29  30 0.2X0.2FPB O S                      PAR 32-38 with 30
277:00:05:00  277:00:40:00     2100 DARK         WFPC F450W         0.190    0.000     0.00  29  32  WFALL-FIX O S CR-SPLIT=NO
277:00:02:00  277:00:15:00      832 DARK       NICMOS F160W         0.190    0.000     0.00  29  33       NIC3 O S NSAMP=15
277:00:16:00  277:00:41:00     1471 DARK       NICMOS F160W         0.190    0.000     0.00  29  34       NIC3 O S NSAMP=25
277:00:49:00  277:01:29:00     2400 BRIGHT       STIS E230M         0.190    0.000     0.00  29  40 0.2X0.2FPB O S                      PAR 42 with 40
277:00:52:00  277:01:29:00     2200 BRIGHT       WFPC F300W         0.190    0.000     0.00  29  42  WFALL-FIX O S CR-SPLIT=NO
277:01:38:00  277:02:17:00     2340 DARK         STIS E230M         0.190    0.000     0.00  29  40 0.2X0.2FPB O S                      PAR 42-48 with 40
277:01:42:00  277:02:17:00     2100 DARK         WFPC F450W         0.190    0.000     0.00  29  42  WFALL-FIX O S CR-SPLIT=NO
277:01:38:00  277:01:52:00      832 DARK       NICMOS F160W         0.190    0.000     0.00  29  43       NIC3 O S NSAMP=15
277:01:53:00  277:02:17:00     1471 DARK       NICMOS F160W         0.190    0.000     0.00  29  44       NIC3 O S NSAMP=25
277:02:27:00  277:03:05:00     2310 BRIGHT       STIS E230M         0.240    0.000     0.00  29  50 0.2X0.2FPC O S                      PAR 52-58 with 50
277:02:30:00  277:03:05:00     2100 BRIGHT       WFPC F300W         0.240    0.000     0.00  29  52  WFALL-FIX O S CR-SPLIT=NO
277:02:27:00  277:02:40:00      832 BRIGHT     NICMOS F222M         0.240    0.000     0.00  29  53       NIC3 O S NSAMP=15
277:02:41:00  277:03:06:00     1471 BRIGHT     NICMOS F222M         0.240    0.000     0.00  29  54       NIC3 O S NSAMP=25
277:03:14:00  277:03:54:00     2400 DARK         STIS E230M         0.240    0.000     0.00  29  60 0.2X0.2FPC O S                      PAR 62-68 with 60
277:03:17:00  277:03:54:00     2200 DARK         WFPC F606W         0.240    0.000     0.00  29  62  WFALL-FIX O S CR-SPLIT=NO
277:03:14:00  277:03:28:00      832 DARK       NICMOS F110W         0.240    0.000     0.00  29  63       NIC3 O S NSAMP=15
277:03:29:00  277:03:53:00     1471 DARK       NICMOS F110W         0.240    0.000     0.00  29  64       NIC3 O S NSAMP=25
277:04:03:00  277:04:42:00     2340 BRIGHT       STIS E230M         0.240    0.000     0.00  29  70 0.2X0.2FPC O S                      PAR 72-78 with 70
277:04:07:00  277:04:42:00     2100 BRIGHT       WFPC F300W         0.240    0.000     0.00  29  72  WFALL-FIX O S CR-SPLIT=NO
277:04:03:00  277:04:17:00      832 BRIGHT     NICMOS F222M         0.240    0.000     0.00  29  73       NIC3 O S NSAMP=15
277:04:18:00  277:04:42:00     1471 BRIGHT     NICMOS F222M         0.240    0.000     0.00  29  74       NIC3 O S NSAMP=25
277:04:52:00  277:05:14:00     1344 DARK         STIS E230M         0.360    0.000     0.00  29  80 0.2X0.2FPD O S                      PAR 82-85 with 80
277:04:56:00  277:05:14:00     1100 DARK         WFPC F606W         0.360    0.000     0.00  29  82  WFALL-FIX O S CR-SPLIT=NO
277:04:52:00  277:05:11:00     1152 DARK       NICMOS F110W         0.360    0.000     0.00  29  83       NIC3 O S NSAMP=20
277:05:19:00  277:05:24:00      300 STIS_STOP    WFPC F606W         0.000    0.000     0.00  29  90  WFALL-FIX O S CR-SPLIT=NO          PAR 91-93 with 90
277:05:19:00  277:05:22:00      192 STIS_STOP  NICMOS F110W         0.000    0.000     0.00  29  91       NIC3 O S NSAMP=5
277:05:56:00  277:06:19:00     1380 BRIGHT_SAA   STIS G430M-3423    0.000   -2.516    -0.70  30  12     52X0.2 - -             FULL-ACQ PAR 14-17 with 12
277:05:59:00  277:06:19:00     1200 BRIGHT_SAA   WFPC F300W         0.000   -2.516    -0.70  30  14  WFALL-FIX - - CR-SPLIT=NO
277:05:56:00  277:06:15:00     1152 BRIGHT_SAA NICMOS F222M         0.000   -2.516    -0.70  30  15       NIC3 - - NSAMP=20
277:06:24:00  277:07:00:00     2176 DARK_SAA     STIS CCD-CLEAR     0.000   -2.516    -0.70  30  20      50CCD O S CR-SPLIT=3           PAR 22-28 with 20
277:06:29:00  277:07:00:00     1900 DARK_SAA     WFPC F606W         0.000   -2.516    -0.70  30  22  WFALL-FIX O S CR-SPLIT=NO
277:06:24:00  277:06:38:00      832 DARK_SAA   NICMOS F110W         0.000   -2.516    -0.70  30  23       NIC3 O S NSAMP=15
277:06:39:00  277:06:58:00     1152 DARK_SAA   NICMOS F110W         0.000   -2.516    -0.70  30  24       NIC3 O S NSAMP=20
277:07:33:00  277:07:56:00     1380 BRIGHT_SAA   STIS G430M-3165    0.000   -2.516    -0.70  30  30     52X0.2 O -             RE-ACQ   PAR 32-35 with 30
277:07:36:00  277:07:56:00     1200 BRIGHT_SAA   WFPC F300W         0.000   -2.516    -0.70  30  32  WFALL-FIX O - CR-SPLIT=NO
277:07:33:00  277:07:52:00     1152 BRIGHT_SAA NICMOS F222M         0.000   -2.516    -0.70  30  33       NIC3 O - NSAMP=20
277:08:01:00  277:08:39:00     2307 DARK_SAA     STIS CCD-CLEAR     0.000   -2.516    -0.70  30  40      50CCD O S CR-SPLIT=3           PAR 42-48 with 40
277:08:04:00  277:08:39:00     2100 DARK_SAA     WFPC F606W         0.000   -2.516    -0.70  30  42  WFALL-FIX O S CR-SPLIT=NO
277:08:01:00  277:08:15:00      832 DARK_SAA   NICMOS F110W         0.000   -2.516    -0.70  30  43       NIC3 O S NSAMP=15

Jul 16, 98 16:03 Page 10/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 10/18 draft5b.oh

277:08:16:00  277:08:40:00     1471 DARK_SAA   NICMOS F110W         0.000   -2.516    -0.70  30  44       NIC3 O S NSAMP=25
277:09:15:00  277:09:33:00     1080 BRIGHT_SAA   STIS G430M-3165    0.000   -2.516    -0.70  30  50     52X0.2 O -             RE-ACQ   PAR 52-55 with 50
277:09:18:00  277:09:33:00      900 BRIGHT_SAA   WFPC F300W         0.000   -2.516    -0.70  30  52  WFALL-FIX O - CR-SPLIT=NO
277:09:15:00  277:09:29:00      832 BRIGHT_SAA NICMOS F222M         0.000   -2.516    -0.70  30  53       NIC3 O - NSAMP=15
277:09:39:00  277:10:20:00     2485 DARK_SAA     STIS CCD-CLEAR     2.516   -2.516    -0.70  30  60      50CCD O S CR-SPLIT=3           PAR 62-68 with 60
277:09:42:00  277:10:20:00     2300 DARK_SAA     WFPC F814W         2.516   -2.516    -0.70  30  62  WFALL-FIX O S CR-SPLIT=NO
277:09:39:00  277:09:52:00      832 DARK_SAA   NICMOS F160W         2.516   -2.516    -0.70  30  63       NIC3 O S NSAMP=15
277:09:53:00  277:10:18:00     1471 DARK_SAA   NICMOS F160W         2.516   -2.516    -0.70  30  64       NIC3 O S NSAMP=25
277:10:55:00  277:11:09:00      840 BRIGHT_SAA   STIS G430M-3165    0.000   -2.516    -0.70  30  70     52X0.2 O -             RE-ACQ   PAR 72-75 with 70
277:10:59:00  277:11:09:00      600 BRIGHT_SAA   WFPC F300W         0.000   -2.516    -0.70  30  72  WFALL-FIX O - CR-SPLIT=NO
277:10:55:00  277:11:09:00      832 BRIGHT_SAA NICMOS F222M         0.000   -2.516    -0.70  30  73       NIC3 O - NSAMP=15
277:11:15:00  277:11:58:00     2610 DARK_SAA     STIS CCD-CLEAR     2.516   -2.516    -0.70  30  80      50CCD O S CR-SPLIT=3           PAR 82-88 with 80
277:11:18:00  277:11:58:00     2400 DARK_SAA     WFPC F814W         2.516   -2.516    -0.70  30  82  WFALL-FIX O S CR-SPLIT=NO
277:11:15:00  277:11:28:00      832 DARK_SAA   NICMOS F160W         2.516   -2.516    -0.70  30  83       NIC3 O S NSAMP=15
277:11:29:00  277:11:54:00     1471 DARK_SAA   NICMOS F160W         2.516   -2.516    -0.70  30  84       NIC3 O S NSAMP=25
277:12:46:00  277:13:35:00     2940 DARK_SAA     STIS CCD-CLEAR    -2.516    0.000     0.00  31  12      50CCD - - CR-SPLIT=3  FULL-ACQ PAR 14-20 with 12
277:12:50:00  277:13:35:00     2700 DARK_SAA     WFPC F814W        -2.516    0.000     0.00  31  14  WFALL-FIX - - CR-SPLIT=NO
277:12:46:00  277:13:05:00     1152 DARK_SAA   NICMOS F160W        -2.516    0.000     0.00  31  15       NIC3 - - NSAMP=20
277:13:06:00  277:13:31:00     1471 DARK_SAA   NICMOS F160W        -2.516    0.000     0.00  31  16       NIC3 - - NSAMP=25
277:14:23:00  277:15:12:00     2940 DARK_SAA     STIS CCD-CLEAR    -2.516    0.000     0.00  31  30      50CCD O - CR-SPLIT=3  RE-ACQ   PAR 32-38 with 30
277:14:27:00  277:15:12:00     2700 DARK_SAA     WFPC F814W        -2.516    0.000     0.00  31  32  WFALL-FIX O - CR-SPLIT=NO
277:14:23:00  277:14:42:00     1152 DARK_SAA   NICMOS F160W        -2.516    0.000     0.00  31  33       NIC3 O - NSAMP=20
277:14:43:00  277:15:08:00     1471 DARK_SAA   NICMOS F160W        -2.516    0.000     0.00  31  34       NIC3 O - NSAMP=25
277:16:00:00  277:16:48:00     2880 DARK_SAA     STIS CCD-CLEAR     0.000    0.000     0.00  31  40      50CCD O - CR-SPLIT=3  RE-ACQ   PAR 42-48 with 40
277:16:03:00  277:16:48:00     2700 DARK_SAA     WFPC F450W         0.000    0.000     0.00  31  42  WFALL-FIX O - CR-SPLIT=NO
277:16:00:00  277:16:19:00     1152 DARK_SAA   NICMOS F110W         0.000    0.000     0.00  31  43       NIC3 O - NSAMP=20
277:16:20:00  277:16:45:00     1471 DARK_SAA   NICMOS F110W         0.000    0.000     0.00  31  44       NIC3 O - NSAMP=25
277:16:58:00  277:17:12:00      847 BRIGHT_SAA   STIS G430M-3165    0.000    0.000     0.00  31  50     52X0.2 O S                      PAR 52-55 with 50
277:17:02:00  277:17:12:00      600 BRIGHT_SAA   WFPC F300W         0.000    0.000     0.00  31  52  WFALL-FIX O S CR-SPLIT=NO
277:16:58:00  277:17:11:00      832 BRIGHT_SAA NICMOS F222M         0.000    0.000     0.00  31  53       NIC3 O S NSAMP=15
277:17:37:00  277:18:25:00     2880 DARK_SAA     STIS CCD-CLEAR     0.000    0.000     0.00  31  60      50CCD O - CR-SPLIT=3  RE-ACQ   PAR 62-68 with 60
277:17:40:00  277:18:25:00     2700 DARK_SAA     WFPC F450W         0.000    0.000     0.00  31  62  WFALL-FIX O - CR-SPLIT=NO
277:17:37:00  277:17:56:00     1152 DARK_SAA   NICMOS F110W         0.000    0.000     0.00  31  63       NIC3 O - NSAMP=20
277:17:57:00  277:18:22:00     1471 DARK_SAA   NICMOS F110W         0.000    0.000     0.00  31  64       NIC3 O - NSAMP=25
277:18:35:00  277:18:57:00     1326 BRIGHT_SAA   STIS G430M-3165    0.000    0.000     0.00  31  70     52X0.2 O S                      PAR 72 with 70
277:18:38:00  277:18:57:00     1100 BRIGHT_SAA   WFPC F300W         0.000    0.000     0.00  31  72  WFALL-FIX O S CR-SPLIT=NO
277:19:03:00  277:19:15:00      698 ACQ-PEAK    ACQPK CCD           0.000    0.000     0.70  32  10    0.2X0.2 - -
277:19:15:00  277:20:02:00     2820 DARK         STIS E230M         0.360    0.000     0.70  32  14 0.2X0.2FPD - -             FULL-ACQ PAR 16-22 with 14
277:19:19:00  277:20:02:00     2600 DARK         WFPC F450W         0.360    0.000     0.70  32  16  WFALL-FIX - - CR-SPLIT=NO
277:19:15:00  277:19:34:00     1152 DARK       NICMOS F110W         0.360    0.000     0.70  32  17       NIC3 - - NSAMP=20
277:19:35:00  277:20:00:00     1471 DARK       NICMOS F110W         0.360    0.000     0.70  32  18       NIC3 - - NSAMP=25
277:20:11:00  277:20:50:00     2340 BRIGHT       STIS E230M         0.360    0.000     0.70  32  30 0.2X0.2FPD O S                      PAR 32-38 with 30
277:20:15:00  277:20:50:00     2100 BRIGHT       WFPC F300W         0.360    0.000     0.70  32  32  WFALL-FIX O S CR-SPLIT=NO
277:20:11:00  277:20:25:00      832 BRIGHT     NICMOS F222M         0.360    0.000     0.70  32  33       NIC3 O S NSAMP=15
277:20:26:00  277:20:50:00     1471 BRIGHT     NICMOS F222M         0.360    0.000     0.70  32  34       NIC3 O S NSAMP=25
277:21:00:00  277:21:39:00     2370 DARK         STIS E230M         0.620    0.000     0.70  32  40 0.2X0.2FPE O S                      PAR 42-48 with 40
277:21:04:00  277:21:39:00     2100 DARK         WFPC F450W         0.620    0.000     0.70  32  42  WFALL-FIX O S CR-SPLIT=NO
277:21:00:00  277:21:13:00      832 DARK       NICMOS F110W         0.620    0.000     0.70  32  43       NIC3 O S NSAMP=15
277:21:14:00  277:21:39:00     1471 DARK       NICMOS F110W         0.620    0.000     0.70  32  44       NIC3 O S NSAMP=25
277:21:48:00  277:22:27:00     2340 BRIGHT       STIS E230M         0.620    0.000     0.70  32  50 0.2X0.2FPE O S                      PAR 52-58 with 50
277:21:52:00  277:22:27:00     2100 BRIGHT       WFPC F300W         0.620    0.000     0.70  32  52  WFALL-FIX O S CR-SPLIT=NO
277:21:48:00  277:22:02:00      832 BRIGHT     NICMOS DARK          0.620    0.000     0.70  32  53       NIC3 O S NSAMP=15
277:22:03:00  277:22:27:00     1471 BRIGHT     NICMOS DARK          0.620    0.000     0.70  32  54       NIC3 O S NSAMP=25
277:22:36:00  277:23:16:00     2400 DARK         STIS E230M         0.620    0.000     0.70  32  60 0.2X0.2FPE O S                      PAR 62-68 with 60
277:22:39:00  277:23:16:00     2200 DARK         WFPC F606W         0.620    0.000     0.70  32  62  WFALL-FIX O S CR-SPLIT=NO
277:22:36:00  277:22:50:00      832 DARK       NICMOS F160W         0.620    0.000     0.70  32  63       NIC3 O S NSAMP=15
277:22:51:00  277:23:15:00     1471 DARK       NICMOS F160W         0.620    0.000     0.70  32  64       NIC3 O S NSAMP=25
277:23:16:00  277:23:28:00      720 ACQ-PEAK    ACQPK CCD           0.000    0.000     1.05  33  10    0.2X0.2 - -
277:23:31:00  278:00:04:00     1980 BRIGHT       STIS E230M         0.000    0.000     1.05  33  14 0.2X0.2FPA - -             FULL-ACQ PAR 16-22 with 14
277:23:34:00  278:00:04:00     1800 BRIGHT       WFPC F300W         0.000    0.000     1.05  33  16  WFALL-FIX - - CR-SPLIT=NO
277:23:31:00  277:23:40:00      511 BRIGHT     NICMOS F222M         0.000    0.000     1.05  33  17       NIC3 - - NSAMP=10
277:23:41:00  278:00:00:00     1152 BRIGHT     NICMOS F222M         0.000    0.000     1.05  33  18       NIC3 - - NSAMP=20
278:00:13:00  278:00:52:00     2340 DARK         STIS E230M         0.000    0.000     1.05  33  30 0.2X0.2FPA O S                      PAR 32-38 with 30
278:00:17:00  278:00:52:00     2100 DARK         WFPC F606W         0.000    0.000     1.05  33  32  WFALL-FIX O S CR-SPLIT=NO
278:00:13:00  278:00:27:00      832 DARK       NICMOS F160W         0.000    0.000     1.05  33  33       NIC3 O S NSAMP=15
278:00:28:00  278:00:52:00     1471 DARK       NICMOS F160W         0.000    0.000     1.05  33  34       NIC3 O S NSAMP=25

Jul 16, 98 16:03 Page 11/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 11/18 draft5b.oh

278:01:01:00  278:01:41:00     2400 BRIGHT       STIS E230M         0.000    0.000     1.05  33  40 0.2X0.2FPA O S                      PAR 42-48 with 40
278:01:04:00  278:01:41:00     2200 BRIGHT       WFPC F300W         0.000    0.000     1.05  33  42  WFALL-FIX O S CR-SPLIT=NO
278:01:01:00  278:01:15:00      832 BRIGHT     NICMOS F222M         0.000    0.000     1.05  33  43       NIC3 O S NSAMP=15
278:01:16:00  278:01:40:00     1471 BRIGHT     NICMOS F222M         0.000    0.000     1.05  33  44       NIC3 O S NSAMP=25
278:01:51:00  278:02:29:00     2310 DARK         STIS E230M         0.190    0.000     1.05  33  50 0.2X0.2FPB O S                      PAR 52-58 with 50
278:01:54:00  278:02:29:00     2100 DARK         WFPC F606W         0.190    0.000     1.05  33  52  WFALL-FIX O S CR-SPLIT=NO
278:01:51:00  278:02:04:00      832 DARK       NICMOS F160W         0.190    0.000     1.05  33  53       NIC3 O S NSAMP=15
278:02:05:00  278:02:30:00     1471 DARK       NICMOS F160W         0.190    0.000     1.05  33  54       NIC3 O S NSAMP=25
278:02:38:00  278:03:18:00     2400 BRIGHT       STIS E230M         0.190    0.000     1.05  33  60 0.2X0.2FPB O S                      PAR 62-68 with 60
278:02:41:00  278:03:18:00     2200 BRIGHT       WFPC F300W         0.190    0.000     1.05  33  62  WFALL-FIX O S CR-SPLIT=NO
278:02:38:00  278:02:52:00      832 BRIGHT     NICMOS F222M         0.190    0.000     1.05  33  63       NIC3 O S NSAMP=15
278:02:53:00  278:03:17:00     1471 BRIGHT     NICMOS F222M         0.190    0.000     1.05  33  64       NIC3 O S NSAMP=25
278:03:27:00  278:03:56:00     1740 DARK         STIS E230M         0.190    0.000     1.05  33  70 0.2X0.2FPB O S                      PAR 72-78 with 70
278:03:31:00  278:03:56:00     1500 DARK         WFPC F606W         0.190    0.000     1.05  33  72  WFALL-FIX O S CR-SPLIT=NO
278:03:27:00  278:03:36:00      511 DARK       NICMOS F160W         0.190    0.000     1.05  33  73       NIC3 O S NSAMP=10
278:03:37:00  278:03:56:00     1152 DARK       NICMOS F160W         0.190    0.000     1.05  33  74       NIC3 O S NSAMP=20
278:04:01:00  278:04:06:00      300 STIS_STOP    WFPC F814W         0.000    0.000     1.05  33  80  WFALL-FIX O S CR-SPLIT=NO          PAR 81-83 with 80
278:04:01:00  278:04:04:00      192 STIS_STOP  NICMOS F110W         0.000    0.000     1.05  33  81       NIC3 O S NSAMP=5
278:04:22:00  278:04:54:00     1920 BRIGHT_SAA   STIS G430M-3165    0.000    0.000     0.70  34  12     52X0.2 - -             FULL-ACQ PAR 14 with 12
278:04:26:00  278:04:54:00     1700 BRIGHT_SAA   WFPC F300W         0.000    0.000     0.70  34  14  WFALL-FIX - - CR-SPLIT=NO
278:05:00:00  278:05:33:00     2010 DARK_SAA     STIS CCD-CLEAR     2.516    0.000     0.70  34  90      50CCD O S CR-SPLIT=3           PAR 92-98 with 90
278:05:03:00  278:05:33:00     1800 DARK_SAA     WFPC F814W         2.516    0.000     0.70  34  92  WFALL-FIX O S CR-SPLIT=NO
278:05:00:00  278:05:13:00      832 DARK_SAA   NICMOS F110W         2.516    0.000     0.70  34  93       NIC3 O S NSAMP=15
278:05:14:00  278:05:34:00     1152 DARK_SAA   NICMOS F110W         2.516    0.000     0.70  34  94       NIC3 O S NSAMP=20
278:06:02:00  278:06:31:00     1740 BRIGHT_SAA   STIS G430M-3165    0.000    2.516     0.70  34 100     52X0.2 O -             RE-ACQ   PAR 102-108 with 100
278:06:06:00  278:06:31:00     1500 BRIGHT_SAA   WFPC F300W         0.000    2.516     0.70  34 102  WFALL-FIX O - CR-SPLIT=NO
278:06:02:00  278:06:11:00      511 BRIGHT_SAA NICMOS F222M         0.000    2.516     0.70  34 103       NIC3 O - NSAMP=10
278:06:12:00  278:06:31:00     1152 BRIGHT_SAA NICMOS F222M         0.000    2.516     0.70  34 104       NIC3 O - NSAMP=20
278:06:37:00  278:07:11:00     2084 DARK_SAA     STIS CCD-LP       -2.516  -14.500     0.70  34 110   F28X50LP O S CR-SPLIT=3           PAR 112-118 with 110
278:06:40:00  278:07:11:00     1900 DARK_SAA     WFPC F450W        -2.516  -14.500     0.70  34 112  WFALL-FIX O S CR-SPLIT=NO
278:06:37:00  278:06:50:00      832 DARK_SAA   NICMOS F110W        -2.516  -14.500     0.70  34 113       NIC3 O S NSAMP=15
278:06:51:00  278:07:11:00     1152 DARK_SAA   NICMOS F110W        -2.516  -14.500     0.70  34 114       NIC3 O S NSAMP=20
278:07:45:00  278:08:08:00     1380 BRIGHT_SAA   STIS G430M-3423    0.000   -2.516     0.70  34 120     52X0.2 O -             RE-ACQ   PAR 122-125 with 120
278:07:48:00  278:08:08:00     1200 BRIGHT_SAA   WFPC F300W         0.000   -2.516     0.70  34 122  WFALL-FIX O - CR-SPLIT=NO
278:07:45:00  278:08:04:00     1152 BRIGHT_SAA NICMOS F222M         0.000   -2.516     0.70  34 123       NIC3 O - NSAMP=20
278:08:14:00  278:08:51:00     2227 DARK_SAA     STIS CCD-LP        0.000  -14.500     0.70  34 130   F28X50LP O S CR-SPLIT=3           PAR 132-138 with 130
278:08:17:00  278:08:51:00     2000 DARK_SAA     WFPC F606W         0.000  -14.500     0.70  34 132  WFALL-FIX O S CR-SPLIT=NO
278:08:14:00  278:08:27:00      832 DARK_SAA   NICMOS F110W         0.000  -14.500     0.70  34 133       NIC3 O S NSAMP=15
278:08:28:00  278:08:48:00     1152 DARK_SAA   NICMOS F110W         0.000  -14.500     0.70  34 134       NIC3 O S NSAMP=20
278:09:26:00  278:09:45:00     1140 BRIGHT_SAA   STIS G430M-3423    0.000    0.000     0.70  34 140     52X0.2 O -             RE-ACQ   PAR 142-145 with 140
278:09:30:00  278:09:45:00      900 BRIGHT_SAA   WFPC F300W         0.000    0.000     0.70  34 142  WFALL-FIX O - CR-SPLIT=NO
278:09:26:00  278:09:40:00      832 BRIGHT_SAA NICMOS F222M         0.000    0.000     0.70  34 143       NIC3 O - NSAMP=15
278:09:51:00  278:10:32:00     2503 DARK_SAA     STIS CCD-LP        0.000  -14.500     0.70  34 150   F28X50LP O S CR-SPLIT=3           PAR 152-158 with 150
278:09:54:00  278:10:32:00     2300 DARK_SAA     WFPC F606W         0.000  -14.500     0.70  34 152  WFALL-FIX O S CR-SPLIT=NO
278:09:51:00  278:10:04:00      832 DARK_SAA   NICMOS F110W         0.000  -14.500     0.70  34 153       NIC3 O S NSAMP=15
278:10:05:00  278:10:30:00     1471 DARK_SAA   NICMOS F110W         0.000  -14.500     0.70  34 154       NIC3 O S NSAMP=25
278:11:12:00  278:11:22:00      600 BRIGHT_SAA   STIS G430M-3423    0.000    0.000     1.05  35  12     52X0.2 - -             FULL-ACQ PAR 14-17 with 12
278:11:15:00  278:11:22:00      400 BRIGHT_SAA   WFPC F300W         0.000    0.000     1.05  35  14  WFALL-FIX - - CR-SPLIT=NO
278:11:12:00  278:11:21:00      511 BRIGHT_SAA NICMOS F222M         0.000    0.000     1.05  35  15       NIC3 - - NSAMP=10
278:11:28:00  278:12:10:00     2550 DARK_SAA     STIS CCD-LP        2.516  -14.500     1.05  35  20   F28X50LP O S CR-SPLIT=3           PAR 22-28 with 20
278:11:32:00  278:12:10:00     2300 DARK_SAA     WFPC F450W         2.516  -14.500     1.05  35  22  WFALL-FIX O S CR-SPLIT=NO
278:11:28:00  278:11:41:00      832 DARK_SAA   NICMOS F160W         2.516  -14.500     1.05  35  23       NIC3 O S NSAMP=15
278:11:42:00  278:12:07:00     1471 DARK_SAA   NICMOS F160W         2.516  -14.500     1.05  35  24       NIC3 O S NSAMP=25
278:12:46:00  278:12:58:00      720 BRIGHT_SAA   STIS G430M-3423    0.000    0.000     1.05  35  30     52X0.2 O -             RE-ACQ   PAR 32-35 with 30
278:12:50:00  278:12:58:00      500 BRIGHT_SAA   WFPC F300W         0.000    0.000     1.05  35  32  WFALL-FIX O - CR-SPLIT=NO
278:12:46:00  278:12:55:00      511 BRIGHT_SAA NICMOS F222M         0.000    0.000     1.05  35  33       NIC3 O - NSAMP=10
278:13:04:00  278:13:47:00     2610 DARK_SAA     STIS CCD-CLEAR     2.516    0.000     1.05  35  40      50CCD O S CR-SPLIT=3           PAR 42-48 with 40
278:13:07:00  278:13:47:00     2400 DARK_SAA     WFPC F450W         2.516    0.000     1.05  35  42  WFALL-FIX O S CR-SPLIT=NO
278:13:04:00  278:13:17:00      832 DARK_SAA   NICMOS F160W         2.516    0.000     1.05  35  43       NIC3 O S NSAMP=15
278:13:18:00  278:13:43:00     1471 DARK_SAA   NICMOS F160W         2.516    0.000     1.05  35  44       NIC3 O S NSAMP=25
278:14:26:00  278:14:35:00      540 BRIGHT_SAA   STIS G430M-3423    0.000    0.000     1.05  35  50     52X0.2 O -             RE-ACQ   PAR 52-55 with 50
278:14:30:00  278:14:35:00      300 BRIGHT_SAA   WFPC F300W         0.000    0.000     1.05  35  52  WFALL-FIX O - CR-SPLIT=NO
278:14:26:00  278:14:35:00      511 BRIGHT_SAA NICMOS F222M         0.000    0.000     1.05  35  53       NIC3 O - NSAMP=10
278:14:41:00  278:15:24:00     2610 DARK_SAA     STIS CCD-CLEAR    -2.516    2.516     1.05  35  60      50CCD O S CR-SPLIT=3           PAR 62-68 with 60
278:14:44:00  278:15:24:00     2400 DARK_SAA     WFPC F450W        -2.516    2.516     1.05  35  62  WFALL-FIX O S CR-SPLIT=NO
278:14:41:00  278:14:54:00      832 DARK_SAA   NICMOS F160W        -2.516    2.516     1.05  35  63       NIC3 O S NSAMP=15

Jul 16, 98 16:03 Page 12/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 12/18 draft5b.oh

278:14:55:00  278:15:20:00     1471 DARK_SAA   NICMOS F160W        -2.516    2.516     1.05  35  64       NIC3 O S NSAMP=25
278:15:34:00  278:15:41:00      439 BRIGHT_SAA   STIS G430M-3423    0.000    0.000     1.05  35  70     52X0.2 O S                      PAR 72-75 with 70
278:15:38:00  278:15:41:00      200 BRIGHT_SAA   WFPC F300W         0.000    0.000     1.05  35  72  WFALL-FIX O S CR-SPLIT=NO
278:15:34:00  278:15:37:00      192 BRIGHT_SAA NICMOS F222M         0.000    0.000     1.05  35  73       NIC3 O S NSAMP=5
278:16:12:00  278:17:01:00     2940 DARK_SAA     STIS CCD-CLEAR    -2.516    2.516     1.05  35  80      50CCD O - CR-SPLIT=3  RE-ACQ   PAR 82-88 with 80
278:16:16:00  278:17:01:00     2700 DARK_SAA     WFPC F450W        -2.516    2.516     1.05  35  82  WFALL-FIX O - CR-SPLIT=NO
278:16:12:00  278:16:31:00     1152 DARK_SAA   NICMOS F160W        -2.516    2.516     1.05  35  83       NIC3 O - NSAMP=20
278:16:32:00  278:16:57:00     1471 DARK_SAA   NICMOS F160W        -2.516    2.516     1.05  35  84       NIC3 O - NSAMP=25
278:17:11:00  278:17:24:00      795 BRIGHT_SAA   STIS G430M-3423    0.000    2.516     1.05  35  90     52X0.2 O S                      PAR 92-95 with 90
278:17:14:00  278:17:24:00      600 BRIGHT_SAA   WFPC F300W         0.000    2.516     1.05  35  92  WFALL-FIX O S CR-SPLIT=NO
278:17:11:00  278:17:20:00      511 BRIGHT_SAA NICMOS F222M         0.000    2.516     1.05  35  93       NIC3 O S NSAMP=10
278:17:51:00  278:18:37:00     2760 DARK         STIS E230M         0.240    0.000    -1.05  36  12 0.2X0.2FPC - -             FULL-ACQ PAR 14-20 with 12
278:17:55:00  278:18:37:00     2500 DARK         WFPC F606W         0.240    0.000    -1.05  36  14  WFALL-FIX - - CR-SPLIT=NO
278:17:51:00  278:18:10:00     1152 DARK       NICMOS F110W         0.240    0.000    -1.05  36  15       NIC3 - - NSAMP=20
278:18:11:00  278:18:36:00     1471 DARK       NICMOS F110W         0.240    0.000    -1.05  36  16       NIC3 - - NSAMP=25
278:18:46:00  278:19:26:00     2400 BRIGHT       STIS E230M         0.240    0.000    -1.05  36  30 0.2X0.2FPC O S                      PAR 32 with 30
278:18:49:00  278:19:26:00     2200 BRIGHT       WFPC F300W         0.240    0.000    -1.05  36  32  WFALL-FIX O S CR-SPLIT=NO
278:19:35:00  278:20:14:00     2340 DARK         STIS E230M         0.240    0.000    -1.05  36  30 0.2X0.2FPC O S                      PAR 32-38 with 30
278:19:39:00  278:20:14:00     2100 DARK         WFPC F606W         0.240    0.000    -1.05  36  32  WFALL-FIX O S CR-SPLIT=NO
278:19:35:00  278:19:49:00      832 DARK       NICMOS F110W         0.240    0.000    -1.05  36  33       NIC3 O S NSAMP=15
278:19:50:00  278:20:14:00     1471 DARK       NICMOS F110W         0.240    0.000    -1.05  36  34       NIC3 O S NSAMP=25
278:20:24:00  278:21:03:00     2370 BRIGHT       STIS E230M         0.360    0.000    -1.05  36  40 0.2X0.2FPD O S                      PAR 42-48 with 40
278:20:28:00  278:21:03:00     2100 BRIGHT       WFPC F300W         0.360    0.000    -1.05  36  42  WFALL-FIX O S CR-SPLIT=NO
278:20:24:00  278:20:37:00      832 BRIGHT     NICMOS F222M         0.360    0.000    -1.05  36  43       NIC3 O S NSAMP=15
278:20:38:00  278:21:03:00     1471 BRIGHT     NICMOS F222M         0.360    0.000    -1.05  36  44       NIC3 O S NSAMP=25
278:21:12:00  278:21:51:00     2340 DARK         STIS E230M         0.360    0.000    -1.05  36  50 0.2X0.2FPD O S                      PAR 52-58 with 50
278:21:16:00  278:21:51:00     2100 DARK         WFPC F606W         0.360    0.000    -1.05  36  52  WFALL-FIX O S CR-SPLIT=NO
278:21:12:00  278:21:26:00      832 DARK       NICMOS F110W         0.360    0.000    -1.05  36  53       NIC3 O S NSAMP=15
278:21:27:00  278:21:51:00     1471 DARK       NICMOS F110W         0.360    0.000    -1.05  36  54       NIC3 O S NSAMP=25
278:22:00:00  278:22:39:00     2340 BRIGHT       STIS E230M         0.360    0.000    -1.05  36  60 0.2X0.2FPD O S                      PAR 62-68 with 60
278:22:04:00  278:22:39:00     2100 BRIGHT       WFPC F300W         0.360    0.000    -1.05  36  62  WFALL-FIX O S CR-SPLIT=NO
278:22:00:00  278:22:14:00      832 BRIGHT     NICMOS F222M         0.360    0.000    -1.05  36  63       NIC3 O S NSAMP=15
278:22:15:00  278:22:39:00     1471 BRIGHT     NICMOS F222M         0.360    0.000    -1.05  36  64       NIC3 O S NSAMP=25
278:22:49:00  278:23:28:00     2370 DARK         STIS E230M         0.620    0.000    -1.05  36  70 0.2X0.2FPE O S                      PAR 72-78 with 70
278:22:53:00  278:23:28:00     2100 DARK         WFPC F606W         0.620    0.000    -1.05  36  72  WFALL-FIX O S CR-SPLIT=NO
278:22:49:00  278:23:02:00      832 DARK       NICMOS F110W         0.620    0.000    -1.05  36  73       NIC3 O S NSAMP=15
278:23:03:00  278:23:28:00     1471 DARK       NICMOS F110W         0.620    0.000    -1.05  36  74       NIC3 O S NSAMP=25
278:23:43:00  279:00:16:00     1980 BRIGHT       STIS E230M         0.620    0.000    -0.70  37  12 0.2X0.2FPE - -             FULL-ACQ PAR 14-20 with 12
278:23:46:00  279:00:16:00     1800 BRIGHT       WFPC F300W         0.620    0.000    -0.70  37  14  WFALL-FIX - - CR-SPLIT=NO
278:23:43:00  278:23:46:00      192 BRIGHT     NICMOS DARK          0.620    0.000    -0.70  37  15       NIC3 - - NSAMP=5
278:23:47:00  279:00:12:00     1471 BRIGHT     NICMOS DARK          0.620    0.000    -0.70  37  16       NIC3 - - NSAMP=25
279:00:25:00  279:01:05:00     2400 DARK         STIS E230M         0.620    0.000    -0.70  37  30 0.2X0.2FPE O S                      PAR 32-38 with 30
279:00:28:00  279:01:05:00     2200 DARK         WFPC F814W         0.620    0.000    -0.70  37  32  WFALL-FIX O S CR-SPLIT=NO
279:00:25:00  279:00:39:00      832 DARK       NICMOS F160W         0.620    0.000    -0.70  37  33       NIC3 O S NSAMP=15
279:00:40:00  279:01:04:00     1471 DARK       NICMOS F160W         0.620    0.000    -0.70  37  34       NIC3 O S NSAMP=25
279:01:15:00  279:01:53:00     2310 BRIGHT       STIS E230M         0.000    0.000    -0.70  37  40 0.2X0.2FPA O S                      PAR 42-48 with 40
279:01:18:00  279:01:53:00     2100 BRIGHT       WFPC F300W         0.000    0.000    -0.70  37  42  WFALL-FIX O S CR-SPLIT=NO
279:01:15:00  279:01:28:00      832 BRIGHT     NICMOS F222M         0.000    0.000    -0.70  37  43       NIC3 O S NSAMP=15
279:01:29:00  279:01:54:00     1471 BRIGHT     NICMOS F222M         0.000    0.000    -0.70  37  44       NIC3 O S NSAMP=25
279:02:02:00  279:02:41:00     2340 DARK         STIS E230M         0.000    0.000    -0.70  37  50 0.2X0.2FPA O S                      PAR 52-58 with 50
279:02:06:00  279:02:41:00     2100 DARK         WFPC F814W         0.000    0.000    -0.70  37  52  WFALL-FIX O S CR-SPLIT=NO
279:02:02:00  279:02:16:00      832 DARK       NICMOS F160W         0.000    0.000    -0.70  37  53       NIC3 O S NSAMP=15
279:02:17:00  279:02:41:00     1471 DARK       NICMOS F160W         0.000    0.000    -0.70  37  54       NIC3 O S NSAMP=25
279:02:51:00  279:03:30:00     2370 BRIGHT       STIS E230M         0.190    0.000    -0.70  37  60 0.2X0.2FPB O S                      PAR 62-68 with 60
279:02:55:00  279:03:30:00     2100 BRIGHT       WFPC F300W         0.190    0.000    -0.70  37  62  WFALL-FIX O S CR-SPLIT=NO
279:02:51:00  279:03:04:00      832 BRIGHT     NICMOS F222M         0.190    0.000    -0.70  37  63       NIC3 O S NSAMP=15
279:03:05:00  279:03:30:00     1471 BRIGHT     NICMOS F222M         0.190    0.000    -0.70  37  64       NIC3 O S NSAMP=25
279:03:39:00  279:03:58:00     1155 DARK         STIS E230M         0.190    0.000    -0.70  37  70 0.2X0.2FPB O S                      PAR 72-75 with 70
279:03:43:00  279:03:58:00      900 DARK         WFPC F814W         0.190    0.000    -0.70  37  72  WFALL-FIX O S CR-SPLIT=NO
279:03:39:00  279:03:58:00     1152 DARK       NICMOS F160W         0.190    0.000    -0.70  37  73       NIC3 O S NSAMP=20
279:04:03:00  279:04:08:00      300 STIS_STOP    WFPC F814W         0.000    0.000    -0.70  37  80  WFALL-FIX O S CR-SPLIT=NO          PAR 81-83 with 80
279:04:03:00  279:04:06:00      192 STIS_STOP  NICMOS F160W         0.000    0.000    -0.70  37  81       NIC3 O S NSAMP=5
279:04:38:00  279:05:07:00     1740 BRIGHT_SAA   STIS G430M-3423    0.000    2.516    -1.05  38  12     52X0.2 - -             FULL-ACQ PAR 14 with 12
279:04:42:00  279:05:07:00     1500 BRIGHT_SAA   WFPC F300W         0.000    2.516    -1.05  38  14  WFALL-FIX - - CR-SPLIT=NO
279:05:12:00  279:05:43:00     1877 DARK_SAA     STIS CCD-CLEAR     0.000    2.516    -1.05  38  90      50CCD O S CR-SPLIT=2           PAR 92-98 with 90
279:05:17:00  279:05:43:00     1600 DARK_SAA     WFPC F814W         0.000    2.516    -1.05  38  92  WFALL-FIX O S CR-SPLIT=NO

Jul 16, 98 16:03 Page 13/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 13/18 draft5b.oh

279:05:12:00  279:05:21:00      511 DARK_SAA   NICMOS F160W         0.000    2.516    -1.05  38  93       NIC3 O S NSAMP=10
279:05:22:00  279:05:41:00     1152 DARK_SAA   NICMOS F160W         0.000    2.516    -1.05  38  94       NIC3 O S NSAMP=20
279:06:15:00  279:06:43:00     1680 BRIGHT_SAA   STIS G430M-3165    0.000    2.516    -1.05  38 100     52X0.2 O -             RE-ACQ   PAR 102-108 with 100
279:06:18:00  279:06:43:00     1500 BRIGHT_SAA   WFPC F300W         0.000    2.516    -1.05  38 102  WFALL-FIX O - CR-SPLIT=NO
279:06:15:00  279:06:24:00      511 BRIGHT_SAA NICMOS F222M         0.000    2.516    -1.05  38 103       NIC3 O - NSAMP=10
279:06:25:00  279:06:44:00     1152 BRIGHT_SAA NICMOS F222M         0.000    2.516    -1.05  38 104       NIC3 O - NSAMP=20
279:06:48:00  279:07:22:00     2060 DARK_SAA     STIS CCD-CLEAR     0.000    2.516    -1.05  38 110      50CCD O S CR-SPLIT=3           PAR 112-118 with 110
279:06:52:00  279:07:22:00     1800 DARK_SAA     WFPC F450W         0.000    2.516    -1.05  38 112  WFALL-FIX O S CR-SPLIT=NO
279:06:48:00  279:07:02:00      832 DARK_SAA   NICMOS F110W         0.000    2.516    -1.05  38 113       NIC3 O S NSAMP=15
279:07:03:00  279:07:22:00     1152 DARK_SAA   NICMOS F110W         0.000    2.516    -1.05  38 114       NIC3 O S NSAMP=20
279:07:57:00  279:08:20:00     1380 BRIGHT_SAA   STIS G430M-3165    0.000    2.516    -1.05  38 120     52X0.2 O -             RE-ACQ   PAR 122-125 with 120
279:08:00:00  279:08:20:00     1200 BRIGHT_SAA   WFPC F300W         0.000    2.516    -1.05  38 122  WFALL-FIX O - CR-SPLIT=NO
279:07:57:00  279:08:16:00     1152 BRIGHT_SAA NICMOS F222M         0.000    2.516    -1.05  38 123       NIC3 O - NSAMP=20
279:08:26:00  279:09:02:00     2207 DARK_SAA     STIS CCD-CLEAR     2.516    2.516    -1.05  38 130      50CCD O S CR-SPLIT=3           PAR 132-138 with 130
279:08:29:00  279:09:02:00     2000 DARK_SAA     WFPC F450W         2.516    2.516    -1.05  38 132  WFALL-FIX O S CR-SPLIT=NO
279:08:26:00  279:08:39:00      832 DARK_SAA   NICMOS F110W         2.516    2.516    -1.05  38 133       NIC3 O S NSAMP=15
279:08:40:00  279:09:00:00     1152 DARK_SAA   NICMOS F110W         2.516    2.516    -1.05  38 134       NIC3 O S NSAMP=20
279:09:38:00  279:09:57:00     1140 BRIGHT_SAA   STIS G430M-3165    0.000    2.516    -1.05  38 140     52X0.2 O -             RE-ACQ   PAR 142-145 with 140
279:09:42:00  279:09:57:00      900 BRIGHT_SAA   WFPC F300W         0.000    2.516    -1.05  38 142  WFALL-FIX O - CR-SPLIT=NO
279:09:38:00  279:09:52:00      832 BRIGHT_SAA NICMOS F222M         0.000    2.516    -1.05  38 143       NIC3 O - NSAMP=15
279:10:03:00  279:10:44:00     2514 DARK_SAA     STIS CCD-CLEAR     2.516    2.516    -1.05  38 150      50CCD O S CR-SPLIT=3           PAR 152-158 with 150
279:10:06:00  279:10:44:00     2300 DARK_SAA     WFPC F450W         2.516    2.516    -1.05  38 152  WFALL-FIX O S CR-SPLIT=NO
279:10:03:00  279:10:16:00      832 DARK_SAA   NICMOS F110W         2.516    2.516    -1.05  38 153       NIC3 O S NSAMP=15
279:10:17:00  279:10:42:00     1471 DARK_SAA   NICMOS F110W         2.516    2.516    -1.05  38 154       NIC3 O S NSAMP=25
279:11:24:00  279:11:34:00      600 BRIGHT_SAA   STIS G430M-3165    0.000   -2.516    -0.70  39  12     52X0.2 - -             FULL-ACQ PAR 14-17 with 12
279:11:27:00  279:11:34:00      400 BRIGHT_SAA   WFPC F300W         0.000   -2.516    -0.70  39  14  WFALL-FIX - - CR-SPLIT=NO
279:11:24:00  279:11:33:00      511 BRIGHT_SAA NICMOS F222M         0.000   -2.516    -0.70  39  15       NIC3 - - NSAMP=10
279:11:40:00  279:12:22:00     2550 DARK_SAA     STIS CCD-CLEAR    -2.516   -2.516    -0.70  39  20      50CCD O S CR-SPLIT=3           PAR 22-28 with 20
279:11:44:00  279:12:22:00     2300 DARK_SAA     WFPC F450W        -2.516   -2.516    -0.70  39  22  WFALL-FIX O S CR-SPLIT=NO
279:11:40:00  279:11:53:00      832 DARK_SAA   NICMOS F110W        -2.516   -2.516    -0.70  39  23       NIC3 O S NSAMP=15
279:11:54:00  279:12:19:00     1471 DARK_SAA   NICMOS F110W        -2.516   -2.516    -0.70  39  24       NIC3 O S NSAMP=25
279:12:58:00  279:13:11:00      780 BRIGHT_SAA   STIS G430M-3165    0.000   -2.516    -0.70  39  30     52X0.2 O -             RE-ACQ   PAR 32-35 with 30
279:13:01:00  279:13:11:00      600 BRIGHT_SAA   WFPC F300W         0.000   -2.516    -0.70  39  32  WFALL-FIX O - CR-SPLIT=NO
279:12:58:00  279:13:07:00      511 BRIGHT_SAA NICMOS F222M         0.000   -2.516    -0.70  39  33       NIC3 O - NSAMP=10
279:13:17:00  279:13:59:00     2550 DARK_SAA     STIS CCD-CLEAR    -2.516   -2.516    -0.70  39  40      50CCD O S CR-SPLIT=3           PAR 42-48 with 40
279:13:21:00  279:13:59:00     2300 DARK_SAA     WFPC F606W        -2.516   -2.516    -0.70  39  42  WFALL-FIX O S CR-SPLIT=NO
279:13:17:00  279:13:30:00      832 DARK_SAA   NICMOS F160W        -2.516   -2.516    -0.70  39  43       NIC3 O S NSAMP=15
279:13:31:00  279:13:56:00     1471 DARK_SAA   NICMOS F160W        -2.516   -2.516    -0.70  39  44       NIC3 O S NSAMP=25
279:14:38:00  279:14:47:00      540 BRIGHT_SAA   STIS G430M-3165    0.000   -2.516    -0.70  39  50     52X0.2 O -             RE-ACQ   PAR 52-55 with 50
279:14:42:00  279:14:47:00      300 BRIGHT_SAA   WFPC F300W         0.000   -2.516    -0.70  39  52  WFALL-FIX O - CR-SPLIT=NO
279:14:38:00  279:14:47:00      511 BRIGHT_SAA NICMOS F222M         0.000   -2.516    -0.70  39  53       NIC3 O - NSAMP=10
279:14:52:00  279:15:36:00     2640 DARK_SAA     STIS CCD-CLEAR     0.000   -2.516    -0.70  39  60      50CCD O S CR-SPLIT=3           PAR 62-68 with 60
279:14:56:00  279:15:36:00     2400 DARK_SAA     WFPC F606W         0.000   -2.516    -0.70  39  62  WFALL-FIX O S CR-SPLIT=NO
279:14:52:00  279:15:11:00     1152 DARK_SAA   NICMOS F160W         0.000   -2.516    -0.70  39  63       NIC3 O S NSAMP=20
279:15:12:00  279:15:37:00     1471 DARK_SAA   NICMOS F160W         0.000   -2.516    -0.70  39  64       NIC3 O S NSAMP=25
279:15:46:00  279:15:54:00      501 BRIGHT_SAA   STIS G430M-3165    0.000   -2.516    -0.70  39  70     52X0.2 O S                      PAR 72-75 with 70
279:15:49:00  279:15:54:00      300 BRIGHT_SAA   WFPC F300W         0.000   -2.516    -0.70  39  72  WFALL-FIX O S CR-SPLIT=NO
279:15:46:00  279:15:49:00      192 BRIGHT_SAA NICMOS F222M         0.000   -2.516    -0.70  39  73       NIC3 O S NSAMP=5
279:16:24:00  279:17:12:00     2880 DARK_SAA     STIS CCD-CLEAR     0.000   -2.516    -0.70  39  80      50CCD O - CR-SPLIT=3  RE-ACQ   PAR 82-88 with 80
279:16:27:00  279:17:12:00     2700 DARK_SAA     WFPC F606W         0.000   -2.516    -0.70  39  82  WFALL-FIX O - CR-SPLIT=NO
279:16:24:00  279:16:43:00     1152 DARK_SAA   NICMOS F160W         0.000   -2.516    -0.70  39  83       NIC3 O - NSAMP=20
279:16:44:00  279:17:09:00     1471 DARK_SAA   NICMOS F160W         0.000   -2.516    -0.70  39  84       NIC3 O - NSAMP=25
279:17:20:00  279:17:38:00     1056 BRIGHT_SAA   STIS DARK          0.000   -2.516    -0.70  39  90      50CCD O S                      PAR 92 with 90
279:17:24:00  279:17:38:00      800 BRIGHT_SAA   WFPC DARK          0.000   -2.516    -0.70  39  92  WFALL-FIX O S CR-SPLIT=NO
279:18:01:00  279:18:49:00     2880 DARK         STIS FUV-QTZ      -2.516    0.000     0.00  40  12     F25QTZ - -             FULL-ACQ PAR 14-20 with 12
279:18:04:00  279:18:49:00     2700 DARK         WFPC F814W        -2.516    0.000     0.00  40  14  WFALL-FIX - - CR-SPLIT=NO
279:18:01:00  279:18:20:00     1152 DARK       NICMOS F160W        -2.516    0.000     0.00  40  15       NIC3 - - NSAMP=20
279:18:21:00  279:18:46:00     1471 DARK       NICMOS F160W        -2.516    0.000     0.00  40  16       NIC3 - - NSAMP=25
279:18:54:00  279:19:38:00     2640 BRIGHT       STIS FUV-QTZ      -2.516    0.000     0.00  40  30     F25QTZ O S                      PAR 32-38 with 30
279:18:58:00  279:19:38:00     2400 BRIGHT       WFPC F300W        -2.516    0.000     0.00  40  32  WFALL-FIX O S CR-SPLIT=NO
279:18:54:00  279:19:13:00     1152 BRIGHT     NICMOS F222M        -2.516    0.000     0.00  40  33       NIC3 O S NSAMP=20
279:19:14:00  279:19:39:00     1471 BRIGHT     NICMOS F222M        -2.516    0.000     0.00  40  34       NIC3 O S NSAMP=25
279:19:43:00  279:20:26:00     2580 DARK         STIS FUV-QTZ      -2.516    0.000     0.00  40  40     F25QTZ O S                      PAR 42-48 with 40
279:19:46:00  279:20:26:00     2400 DARK         WFPC F450W        -2.516    0.000     0.00  40  42  WFALL-FIX O S CR-SPLIT=NO
279:19:43:00  279:19:57:00      832 DARK       NICMOS F110W        -2.516    0.000     0.00  40  43       NIC3 O S NSAMP=15
279:19:58:00  279:20:22:00     1471 DARK       NICMOS F110W        -2.516    0.000     0.00  40  44       NIC3 O S NSAMP=25

Jul 16, 98 16:03 Page 14/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 14/18 draft5b.oh

279:20:32:00  279:21:15:00     2610 BRIGHT       STIS FUV-QTZ       0.000   -2.516     0.00  40  50     F25QTZ O S                      PAR 52-58 with 50
279:20:35:00  279:21:15:00     2400 BRIGHT       WFPC F300W         0.000   -2.516     0.00  40  52  WFALL-FIX O S CR-SPLIT=NO
279:20:32:00  279:20:45:00      832 BRIGHT     NICMOS F222M         0.000   -2.516     0.00  40  53       NIC3 O S NSAMP=15
279:20:46:00  279:21:11:00     1471 BRIGHT     NICMOS F222M         0.000   -2.516     0.00  40  54       NIC3 O S NSAMP=25
279:21:20:00  279:22:03:00     2580 DARK         STIS FUV-QTZ       0.000   -2.516     0.00  40  60     F25QTZ O S                      PAR 62-68 with 60
279:21:23:00  279:22:03:00     2400 DARK         WFPC F450W         0.000   -2.516     0.00  40  62  WFALL-FIX O S CR-SPLIT=NO
279:21:20:00  279:21:34:00      832 DARK       NICMOS F110W         0.000   -2.516     0.00  40  63       NIC3 O S NSAMP=15
279:21:35:00  279:21:59:00     1471 DARK       NICMOS F110W         0.000   -2.516     0.00  40  64       NIC3 O S NSAMP=25
279:22:03:00  279:22:15:00      720 ACQ-PEAK    ACQPK CCD           0.000    0.000     0.70  41  10    0.2X0.2 - -
279:22:18:00  279:22:51:00     1980 BRIGHT       STIS G140L         0.000    2.516     0.70  41  14     52X0.2 - -             FULL-ACQ PAR 16-22 with 14
279:22:21:00  279:22:51:00     1800 BRIGHT       WFPC F300W         0.000    2.516     0.70  41  16  WFALL-FIX - - CR-SPLIT=NO
279:22:18:00  279:22:27:00      511 BRIGHT     NICMOS F222M         0.000    2.516     0.70  41  17       NIC3 - - NSAMP=10
279:22:28:00  279:22:47:00     1152 BRIGHT     NICMOS F222M         0.000    2.516     0.70  41  18       NIC3 - - NSAMP=20
279:23:01:00  279:23:40:00     2370 DARK         STIS G140L         0.000   -2.516     0.70  41  30     52X0.2 O S                      PAR 32-38 with 30
279:23:05:00  279:23:40:00     2100 DARK         WFPC F814W         0.000   -2.516     0.70  41  32  WFALL-FIX O S CR-SPLIT=NO
279:23:01:00  279:23:14:00      832 DARK       NICMOS F110W         0.000   -2.516     0.70  41  33       NIC3 O S NSAMP=15
279:23:15:00  279:23:40:00     1471 DARK       NICMOS F110W         0.000   -2.516     0.70  41  34       NIC3 O S NSAMP=25
279:23:49:00  280:00:28:00     2340 BRIGHT       STIS G140L         0.000   -2.516     0.70  41  40     52X0.2 O S                      PAR 42-48 with 40
279:23:53:00  280:00:28:00     2100 BRIGHT       WFPC F300W         0.000   -2.516     0.70  41  42  WFALL-FIX O S CR-SPLIT=NO
279:23:49:00  280:00:03:00      832 BRIGHT     NICMOS F222M         0.000   -2.516     0.70  41  43       NIC3 O S NSAMP=15
280:00:04:00  280:00:28:00     1471 BRIGHT     NICMOS F222M         0.000   -2.516     0.70  41  44       NIC3 O S NSAMP=25
280:00:38:00  280:01:16:00     2310 DARK         STIS G140L         0.000    0.000     0.70  41  50     52X0.2 O S                      PAR 52-58 with 50
280:00:41:00  280:01:16:00     2100 DARK         WFPC F606W         0.000    0.000     0.70  41  52  WFALL-FIX O S CR-SPLIT=NO
280:00:38:00  280:00:51:00      832 DARK       NICMOS F110W         0.000    0.000     0.70  41  53       NIC3 O S NSAMP=15
280:00:52:00  280:01:17:00     1471 DARK       NICMOS F110W         0.000    0.000     0.70  41  54       NIC3 O S NSAMP=25
280:01:25:00  280:02:05:00     2400 BRIGHT       STIS G140L         0.000    0.000     0.70  41  60     52X0.2 O S                      PAR 62-68 with 60
280:01:28:00  280:02:05:00     2200 BRIGHT       WFPC F300W         0.000    0.000     0.70  41  62  WFALL-FIX O S CR-SPLIT=NO
280:01:25:00  280:01:39:00      832 BRIGHT     NICMOS F222M         0.000    0.000     0.70  41  63       NIC3 O S NSAMP=15
280:01:40:00  280:02:04:00     1471 BRIGHT     NICMOS F222M         0.000    0.000     0.70  41  64       NIC3 O S NSAMP=25
280:02:14:00  280:02:53:00     2340 DARK         STIS G140L         0.000    0.000     0.70  41  70     52X0.2 O S                      PAR 72-78 with 70
280:02:18:00  280:02:53:00     2100 DARK         WFPC F814W         0.000    0.000     0.70  41  72  WFALL-FIX O S CR-SPLIT=NO
280:02:14:00  280:02:28:00      832 DARK       NICMOS F160W         0.000    0.000     0.70  41  73       NIC3 O S NSAMP=15
280:02:29:00  280:02:53:00     1471 DARK       NICMOS F160W         0.000    0.000     0.70  41  74       NIC3 O S NSAMP=25
280:03:03:00  280:03:42:00     2370 BRIGHT       STIS G140L         0.000    2.516     0.70  41  80     52X0.2 O S                      PAR 82-88 with 80
280:03:07:00  280:03:42:00     2100 BRIGHT       WFPC F300W         0.000    2.516     0.70  41  82  WFALL-FIX O S CR-SPLIT=NO
280:03:03:00  280:03:16:00      832 BRIGHT     NICMOS F222M         0.000    2.516     0.70  41  83       NIC3 O S NSAMP=15
280:03:17:00  280:03:42:00     1471 BRIGHT     NICMOS F222M         0.000    2.516     0.70  41  84       NIC3 O S NSAMP=25
280:03:51:00  280:04:07:00      953 DARK         STIS G140L         0.000    2.516     0.70  41  90     52X0.2 O S                      PAR 92-95 with 90
280:03:55:00  280:04:07:00      700 DARK         WFPC F814W         0.000    2.516     0.70  41  92  WFALL-FIX O S CR-SPLIT=NO
280:03:51:00  280:04:05:00      832 DARK       NICMOS F160W         0.000    2.516     0.70  41  93       NIC3 O S NSAMP=15
280:04:12:00  280:04:17:00      300 STIS_STOP    WFPC F814W         0.000    0.000     0.70  41 100  WFALL-FIX O S CR-SPLIT=NO          PAR 101-103 with 100
280:04:12:00  280:04:15:00      192 STIS_STOP  NICMOS F160W         0.000    0.000     0.70  41 101       NIC3 O S NSAMP=5
280:04:51:00  280:05:19:00     1680 BRIGHT_SAA   STIS G430M-3165    0.000    0.000     0.00  42  12     52X0.2 - -             FULL-ACQ PAR 14 with 12
280:04:54:00  280:05:19:00     1500 BRIGHT_SAA   WFPC F300W         0.000    0.000     0.00  42  14  WFALL-FIX - - CR-SPLIT=NO
280:05:25:00  280:05:54:00     1786 DARK_SAA     STIS CCD-LP        2.516  -14.500     0.00  42 110   F28X50LP O S                      PAR 112-118 with 110
280:05:28:00  280:05:54:00     1600 DARK_SAA     WFPC F450W         2.516  -14.500     0.00  42 112  WFALL-FIX O S CR-SPLIT=NO
280:05:25:00  280:05:33:00      511 DARK_SAA   NICMOS F160W         2.516  -14.500     0.00  42 113       NIC3 O S NSAMP=10
280:05:34:00  280:05:53:00     1152 DARK_SAA   NICMOS F160W         2.516  -14.500     0.00  42 114       NIC3 O S NSAMP=20
280:06:27:00  280:06:55:00     1680 BRIGHT_SAA   STIS G430M-3423    0.000    2.516     0.00  42 120     52X0.2 O -             RE-ACQ   PAR 122-128 with 120
280:06:30:00  280:06:55:00     1500 BRIGHT_SAA   WFPC F300W         0.000    2.516     0.00  42 122  WFALL-FIX O - CR-SPLIT=NO
280:06:27:00  280:06:36:00      511 BRIGHT_SAA NICMOS F222M         0.000    2.516     0.00  42 123       NIC3 O - NSAMP=10
280:06:37:00  280:06:56:00     1152 BRIGHT_SAA NICMOS F222M         0.000    2.516     0.00  42 124       NIC3 O - NSAMP=20
280:07:01:00  280:07:34:00     1980 DARK_SAA     STIS CCD-LP       -2.516   14.500     0.00  42 130   F28X50LP O S CR-SPLIT=2           PAR 132-138 with 130
280:07:04:00  280:07:34:00     1800 DARK_SAA     WFPC F606W        -2.516   14.500     0.00  42 132  WFALL-FIX O S CR-SPLIT=NO
280:07:01:00  280:07:09:00      511 DARK_SAA   NICMOS F160W        -2.516   14.500     0.00  42 133       NIC3 O S NSAMP=10
280:07:10:00  280:07:29:00     1152 DARK_SAA   NICMOS F160W        -2.516   14.500     0.00  42 134       NIC3 O S NSAMP=20
280:08:09:00  280:08:32:00     1380 BRIGHT_SAA   STIS G430M-3423    0.000    2.516     0.00  42 140     52X0.2 O -             RE-ACQ   PAR 142-145 with 140
280:08:12:00  280:08:32:00     1200 BRIGHT_SAA   WFPC F300W         0.000    2.516     0.00  42 142  WFALL-FIX O - CR-SPLIT=NO
280:08:09:00  280:08:28:00     1152 BRIGHT_SAA NICMOS F222M         0.000    2.516     0.00  42 143       NIC3 O - NSAMP=20
280:08:38:00  280:09:15:00     2224 DARK_SAA     STIS CCD-LP       -2.516   14.500     0.00  42 150   F28X50LP O S CR-SPLIT=3           PAR 152-158 with 150
280:08:41:00  280:09:15:00     2000 DARK_SAA     WFPC F300W        -2.516   14.500     0.00  42 152  WFALL-FIX O S CR-SPLIT=NO
280:08:38:00  280:08:51:00      832 DARK_SAA   NICMOS F160W        -2.516   14.500     0.00  42 153       NIC3 O S NSAMP=15
280:08:52:00  280:09:12:00     1152 DARK_SAA   NICMOS F160W        -2.516   14.500     0.00  42 154       NIC3 O S NSAMP=20
280:09:49:00  280:10:09:00     1200 BRIGHT_SAA   STIS G430M-3423    0.000   -2.516     0.00  42 160     52X0.2 O -             RE-ACQ   PAR 162-165 with 160
280:09:52:00  280:10:09:00     1000 BRIGHT_SAA   WFPC F300W         0.000   -2.516     0.00  42 162  WFALL-FIX O - CR-SPLIT=NO
280:09:49:00  280:10:08:00     1152 BRIGHT_SAA NICMOS F222M         0.000   -2.516     0.00  42 163       NIC3 O - NSAMP=20

Jul 16, 98 16:03 Page 15/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 15/18 draft5b.oh

280:10:15:00  280:10:57:00     2550 DARK_SAA     STIS CCD-LP        0.000   14.500     0.00  42 170   F28X50LP O S CR-SPLIT=3           PAR 172-178 with 170
280:10:19:00  280:10:57:00     2300 DARK_SAA     WFPC F606W         0.000   14.500     0.00  42 172  WFALL-FIX O S CR-SPLIT=NO
280:10:15:00  280:10:28:00      832 DARK_SAA   NICMOS F110W         0.000   14.500     0.00  42 173       NIC3 O S NSAMP=15
280:10:29:00  280:10:54:00     1471 DARK_SAA   NICMOS F110W         0.000   14.500     0.00  42 174       NIC3 O S NSAMP=25
280:11:29:00  280:11:46:00     1020 BRIGHT_SAA   STIS G430M-3423    0.000   -2.516     0.00  42 180     52X0.2 O -             RE-ACQ   PAR 182-185 with 180
280:11:33:00  280:11:46:00      800 BRIGHT_SAA   WFPC F300W         0.000   -2.516     0.00  42 182  WFALL-FIX O - CR-SPLIT=NO
280:11:29:00  280:11:43:00      832 BRIGHT_SAA NICMOS F222M         0.000   -2.516     0.00  42 183       NIC3 O - NSAMP=15
280:11:52:00  280:12:34:00     2550 DARK_SAA     STIS CCD-LP        0.000   14.500     0.00  42 190   F28X50LP O S CR-SPLIT=3           PAR 192-198 with 190
280:11:56:00  280:12:34:00     2300 DARK_SAA     WFPC F450W         0.000   14.500     0.00  42 192  WFALL-FIX O S CR-SPLIT=NO
280:11:52:00  280:12:05:00      832 DARK_SAA   NICMOS F110W         0.000   14.500     0.00  42 193       NIC3 O S NSAMP=15
280:12:06:00  280:12:31:00     1471 DARK_SAA   NICMOS F110W         0.000   14.500     0.00  42 194       NIC3 O S NSAMP=25
280:13:06:00  280:13:11:00      300 OCC          WFPC BIAS          0.000    0.000     0.70  43  10  WFALL-FIX O S CR-SPLIT=NO          PAR 11-13 with 10
280:13:06:00  280:13:10:00      192 OCC        NICMOS DARK          0.000    0.000     0.70  43  11       NIC3 O S NSAMP=5
280:13:23:00  280:14:11:00     2880 DARK_SAA     STIS CCD-CLEAR     2.516   -2.516     0.70  43  20      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 22-28 with 20
280:13:26:00  280:14:11:00     2700 DARK_SAA     WFPC F606W         2.516   -2.516     0.70  43  22  WFALL-FIX - - CR-SPLIT=NO
280:13:23:00  280:13:42:00     1152 DARK_SAA   NICMOS F110W         2.516   -2.516     0.70  43  23       NIC3 - - NSAMP=20
280:13:43:00  280:14:08:00     1471 DARK_SAA   NICMOS F110W         2.516   -2.516     0.70  43  24       NIC3 - - NSAMP=25
280:14:21:00  280:14:24:00      152 BRIGHT_SAA   STIS G430M-3165    0.000    0.000     0.70  43  30     52X0.2 O S
280:14:43:00  280:14:50:00      400 OCC          WFPC BIAS          0.000    0.000     0.70  43  40  WFALL-FIX O S CR-SPLIT=NO          PAR 41-43 with 40
280:14:43:00  280:14:46:00      192 OCC        NICMOS DARK          0.000    0.000     0.70  43  41       NIC3 O S NSAMP=5
280:14:59:00  280:15:48:00     2940 DARK_SAA     STIS CCD-CLEAR     2.516   -2.516     0.70  43  50      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 52-58 with 50
280:15:03:00  280:15:48:00     2700 DARK_SAA     WFPC F606W         2.516   -2.516     0.70  43  52  WFALL-FIX - - CR-SPLIT=NO
280:14:59:00  280:15:18:00     1152 DARK_SAA   NICMOS F110W         2.516   -2.516     0.70  43  53       NIC3 - - NSAMP=20
280:15:19:00  280:15:44:00     1471 DARK_SAA   NICMOS F110W         2.516   -2.516     0.70  43  54       NIC3 - - NSAMP=25
280:15:58:00  280:16:06:00      507 BRIGHT_SAA   STIS G430M-3165    0.000    0.000     0.70  43  60     52X0.2 O S                      PAR 62-65 with 60
280:16:01:00  280:16:06:00      300 BRIGHT_SAA   WFPC F300W         0.000    0.000     0.70  43  62  WFALL-FIX O S CR-SPLIT=NO
280:15:58:00  280:16:01:00      192 BRIGHT_SAA NICMOS F222M         0.000    0.000     0.70  43  63       NIC3 O S NSAMP=5
280:16:19:00  280:16:28:00      500 OCC          WFPC BIAS          0.000    0.000     0.70  43  70  WFALL-FIX O S CR-SPLIT=NO          PAR 71-73 with 70
280:16:19:00  280:16:22:00      192 OCC        NICMOS DARK          0.000    0.000     0.70  43  71       NIC3 O S NSAMP=5
280:16:36:00  280:17:24:00     2880 DARK_SAA     STIS CCD-CLEAR    -2.516    0.000     0.70  43  80      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 82-88 with 80
280:16:39:00  280:17:24:00     2700 DARK_SAA     WFPC F814W        -2.516    0.000     0.70  43  82  WFALL-FIX - - CR-SPLIT=NO
280:16:36:00  280:16:55:00     1152 DARK_SAA   NICMOS F160W        -2.516    0.000     0.70  43  83       NIC3 - - NSAMP=20
280:16:56:00  280:17:21:00     1471 DARK_SAA   NICMOS F160W        -2.516    0.000     0.70  43  84       NIC3 - - NSAMP=25
280:17:34:00  280:17:53:00     1132 BRIGHT_SAA   STIS G430M-3165    0.000    2.516     0.70  43  90     52X0.2 O S                      PAR 92-95 with 90
280:17:38:00  280:17:53:00      900 BRIGHT_SAA   WFPC F300W         0.000    2.516     0.70  43  92  WFALL-FIX O S CR-SPLIT=NO
280:17:34:00  280:17:48:00      832 BRIGHT_SAA NICMOS F222M         0.000    2.516     0.70  43  93       NIC3 O S NSAMP=15
280:18:06:00  280:18:13:00      420 BRIGHT       STIS FUV-QTZ       0.000   -2.516     1.05  44  12     F25QTZ - -             FULL-ACQ PAR 14-17 with 12
280:18:10:00  280:18:13:00      200 BRIGHT       WFPC F300W         0.000   -2.516     1.05  44  14  WFALL-FIX - - CR-SPLIT=NO
280:18:06:00  280:18:09:00      192 BRIGHT     NICMOS F222M         0.000   -2.516     1.05  44  15       NIC3 - - NSAMP=5
280:18:19:00  280:19:01:00     2550 DARK         STIS FUV-QTZ       2.516   -2.516     1.05  44  20     F25QTZ O S                      PAR 22-28 with 20
280:18:23:00  280:19:01:00     2300 DARK         WFPC F814W         2.516   -2.516     1.05  44  22  WFALL-FIX O S CR-SPLIT=NO
280:18:19:00  280:18:32:00      832 DARK       NICMOS F160W         2.516   -2.516     1.05  44  23       NIC3 O S NSAMP=15
280:18:33:00  280:18:58:00     1471 DARK       NICMOS F160W         2.516   -2.516     1.05  44  24       NIC3 O S NSAMP=25
280:19:06:00  280:19:29:00     1409 BRIGHT       STIS FUV-QTZ       2.516   -2.516     1.05  44  30     F25QTZ O S                      PAR 32 with 30
280:19:09:00  280:19:29:00     1200 BRIGHT       WFPC F300W         2.516   -2.516     1.05  44  32  WFALL-FIX O S CR-SPLIT=NO
280:19:37:00  280:19:43:00      341 OCC          STIS DARK          0.000    0.000     1.05  44  30     F25QTZ - S             RE-ACQ   PAR 32-34 with 30
280:19:37:00  280:19:40:00      192 OCC        NICMOS DARK          0.000    0.000     1.05  44  32       NIC3 - S NSAMP=5
280:19:50:00  280:20:38:00     2880 DARK         STIS FUV-QTZ      -2.516    0.000     1.05  44  40     F25QTZ - S                      PAR 42-48 with 40
280:19:53:00  280:20:38:00     2700 DARK         WFPC F814W        -2.516    0.000     1.05  44  42  WFALL-FIX - S CR-SPLIT=NO
280:19:50:00  280:20:09:00     1152 DARK       NICMOS F160W        -2.516    0.000     1.05  44  43       NIC3 - S NSAMP=20
280:20:10:00  280:20:35:00     1471 DARK       NICMOS F160W        -2.516    0.000     1.05  44  44       NIC3 - S NSAMP=25
280:20:43:00  280:21:06:00     1350 BRIGHT       STIS FUV-QTZ      -2.516    0.000     1.05  44  50     F25QTZ O S                      PAR 52-55 with 50
280:20:47:00  280:21:06:00     1100 BRIGHT       WFPC F300W        -2.516    0.000     1.05  44  52  WFALL-FIX O S CR-SPLIT=NO
280:20:43:00  280:21:02:00     1152 BRIGHT     NICMOS F222M        -2.516    0.000     1.05  44  53       NIC3 O S NSAMP=20
280:21:13:00  280:21:20:00      424 OCC          STIS DARK          0.000    0.000     1.05  44  60     F25QTZ - S             RE-ACQ   PAR 62-65 with 60
280:21:17:00  280:21:20:00      200 OCC          WFPC DARK          0.000    0.000     1.05  44  62  WFALL-FIX - S CR-SPLIT=NO
280:21:13:00  280:21:16:00      192 OCC        NICMOS DARK          0.000    0.000     1.05  44  63       NIC3 - S NSAMP=5
280:21:27:00  280:22:15:00     2880 DARK         STIS FUV-QTZ       0.000    0.000     1.05  44  70     F25QTZ - S                      PAR 72-78 with 70
280:21:30:00  280:22:15:00     2700 DARK         WFPC F814W         0.000    0.000     1.05  44  72  WFALL-FIX - S CR-SPLIT=NO
280:21:27:00  280:21:46:00     1152 DARK       NICMOS F160W         0.000    0.000     1.05  44  73       NIC3 - S NSAMP=20
280:21:47:00  280:22:12:00     1471 DARK       NICMOS F160W         0.000    0.000     1.05  44  74       NIC3 - S NSAMP=25
280:22:20:00  280:22:42:00     1297 BRIGHT       STIS FUV-QTZ       0.000    0.000     1.05  44  80     F25QTZ O S                      PAR 82-85 with 80
280:22:23:00  280:22:42:00     1100 BRIGHT       WFPC F300W         0.000    0.000     1.05  44  82  WFALL-FIX O S CR-SPLIT=NO
280:22:20:00  280:22:39:00     1152 BRIGHT     NICMOS F222M         0.000    0.000     1.05  44  83       NIC3 O S NSAMP=20
280:22:49:00  280:22:57:00      525 OCC          STIS DARK          0.000    0.000     1.05  44  90     F25QTZ - S             RE-ACQ   PAR 92-95 with 90
280:22:52:00  280:22:57:00      300 OCC          WFPC DARK          0.000    0.000     1.05  44  92  WFALL-FIX - S CR-SPLIT=NO

Jul 16, 98 16:03 Page 16/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 16/18 draft5b.oh

280:22:49:00  280:22:57:00      511 OCC        NICMOS DARK          0.000    0.000     1.05  44  93       NIC3 - S NSAMP=10
280:23:03:00  280:23:52:00     2940 DARK         STIS FUV-QTZ       0.000    0.000     1.05  44 100     F25QTZ - S                      PAR 102-108 with 100
280:23:07:00  280:23:52:00     2700 DARK         WFPC F450W         0.000    0.000     1.05  44 102  WFALL-FIX - S CR-SPLIT=NO
280:23:03:00  280:23:22:00     1152 DARK       NICMOS F110W         0.000    0.000     1.05  44 103       NIC3 - S NSAMP=20
280:23:23:00  280:23:48:00     1471 DARK       NICMOS F110W         0.000    0.000     1.05  44 104       NIC3 - S NSAMP=25
280:23:58:00  281:00:18:00     1219 BRIGHT       STIS FUV-QTZ       2.516    0.000     1.05  44 110     F25QTZ O S                      PAR 112-115 with 110
281:00:01:00  281:00:18:00     1000 BRIGHT       WFPC F300W         2.516    0.000     1.05  44 112  WFALL-FIX O S CR-SPLIT=NO
280:23:58:00  281:00:17:00     1152 BRIGHT     NICMOS F222M         2.516    0.000     1.05  44 113       NIC3 O S NSAMP=20
281:00:25:00  281:00:35:00      560 OCC          STIS DARK          0.000    0.000     1.05  44 120     F25QTZ - S             RE-ACQ   PAR 122-125 with 120
281:00:30:00  281:00:35:00      300 OCC          WFPC DARK          0.000    0.000     1.05  44 122  WFALL-FIX - S CR-SPLIT=NO
281:00:25:00  281:00:34:00      511 OCC        NICMOS DARK          0.000    0.000     1.05  44 123       NIC3 - S NSAMP=10
281:00:41:00  281:01:28:00     2820 DARK         STIS FUV-QTZ       2.516    0.000     1.05  44 130     F25QTZ - S                      PAR 132-138 with 130
281:00:45:00  281:01:28:00     2600 DARK         WFPC F450W         2.516    0.000     1.05  44 132  WFALL-FIX - S CR-SPLIT=NO
281:00:41:00  281:01:00:00     1152 DARK       NICMOS F110W         2.516    0.000     1.05  44 133       NIC3 - S NSAMP=20
281:01:01:00  281:01:26:00     1471 DARK       NICMOS F110W         2.516    0.000     1.05  44 134       NIC3 - S NSAMP=25
281:01:33:00  281:01:54:00     1264 BRIGHT       STIS FUV-QTZ       2.516    0.000     1.05  44 140     F25QTZ O S                      PAR 142-145 with 140
281:01:37:00  281:01:54:00     1000 BRIGHT       WFPC F300W         2.516    0.000     1.05  44 142  WFALL-FIX O S CR-SPLIT=NO
281:01:33:00  281:01:52:00     1152 BRIGHT     NICMOS F222M         2.516    0.000     1.05  44 143       NIC3 O S NSAMP=20
281:02:06:00  281:02:12:00      348 OCC          STIS DARK          0.000    0.000     1.05  45  12     F25QTZ - -             FULL-ACQ PAR 14-16 with 12
281:02:06:00  281:02:09:00      192 OCC        NICMOS DARK          0.000    0.000     1.05  45  14       NIC3 - - NSAMP=5
281:02:24:00  281:02:57:00     1966 DARK_SAA     STIS CCD-CLEAR    -2.516    0.000     1.05  45  20      50CCD - S CR-SPLIT=2           PAR 22-28 with 20
281:02:28:00  281:02:57:00     1700 DARK_SAA     WFPC F450W        -2.516    0.000     1.05  45  22  WFALL-FIX - S CR-SPLIT=NO
281:02:24:00  281:02:33:00      511 DARK_SAA   NICMOS F110W        -2.516    0.000     1.05  45  23       NIC3 - S NSAMP=10
281:02:34:00  281:02:53:00     1152 DARK_SAA   NICMOS F110W        -2.516    0.000     1.05  45  24       NIC3 - S NSAMP=20
281:03:14:00  281:03:30:00      981 BRIGHT_SAA   STIS G430M-3165    0.000    2.516     1.05  45  30     52X0.2 O -             RE-ACQ   PAR 32-35 with 30
281:03:17:00  281:03:30:00      800 BRIGHT_SAA   WFPC F300W         0.000    2.516     1.05  45  32  WFALL-FIX O - CR-SPLIT=NO
281:03:14:00  281:03:28:00      832 BRIGHT_SAA NICMOS F222M         0.000    2.516     1.05  45  33       NIC3 O - NSAMP=15
281:03:38:00  281:03:49:00      671 OCC          STIS DARK          0.000    0.000     1.05  45  40      50CCD - S             RE-ACQ   PAR 42-45 with 40
281:03:42:00  281:03:49:00      400 OCC          WFPC DARK          0.000    0.000     1.05  45  42  WFALL-FIX - S CR-SPLIT=NO
281:03:38:00  281:03:46:00      511 OCC        NICMOS DARK          0.000    0.000     1.05  45  43       NIC3 - S NSAMP=10
281:03:55:00  281:04:26:00     1877 DARK_SAA     STIS CCD-CLEAR     0.000    0.000     1.05  45  50      50CCD - S CR-SPLIT=2           PAR 52-58 with 50
281:04:00:00  281:04:26:00     1600 DARK_SAA     WFPC F450W         0.000    0.000     1.05  45  52  WFALL-FIX - S CR-SPLIT=NO
281:03:55:00  281:04:04:00      511 DARK_SAA   NICMOS F110W         0.000    0.000     1.05  45  53       NIC3 - S NSAMP=10
281:04:05:00  281:04:24:00     1152 DARK_SAA   NICMOS F110W         0.000    0.000     1.05  45  54       NIC3 - S NSAMP=20
281:04:57:00  281:05:07:00      579 BRIGHT_SAA   STIS G430M-3165    0.000    2.516     1.05  45  60     52X0.2 O -             RE-ACQ   PAR 62-65 with 60
281:05:02:00  281:05:07:00      300 BRIGHT_SAA   WFPC F300W         0.000    2.516     1.05  45  62  WFALL-FIX O - CR-SPLIT=NO
281:04:57:00  281:05:06:00      511 BRIGHT_SAA NICMOS F222M         0.000    2.516     1.05  45  63       NIC3 O - NSAMP=10
281:05:14:00  281:05:26:00      723 OCC          STIS DARK          0.000    0.000     1.05  45  70      50CCD - S             RE-ACQ   PAR 72-75 with 70
281:05:18:00  281:05:26:00      500 OCC          WFPC DARK          0.000    0.000     1.05  45  72  WFALL-FIX - S CR-SPLIT=NO
281:05:14:00  281:05:23:00      511 OCC        NICMOS DARK          0.000    0.000     1.05  45  73       NIC3 - S NSAMP=10
281:05:32:00  281:06:05:00     1993 DARK_SAA     STIS CCD-CLEAR     0.000    0.000     1.05  45  80      50CCD - S CR-SPLIT=2           PAR 82-88 with 80
281:05:35:00  281:06:05:00     1800 DARK_SAA     WFPC F450W         0.000    0.000     1.05  45  82  WFALL-FIX - S CR-SPLIT=NO
281:05:32:00  281:05:46:00      832 DARK_SAA   NICMOS F110W         0.000    0.000     1.05  45  83       NIC3 - S NSAMP=15
281:05:47:00  281:06:06:00     1152 DARK_SAA   NICMOS F110W         0.000    0.000     1.05  45  84       NIC3 - S NSAMP=20
281:06:35:00  281:07:03:00     1700 OCC          WFPC DARK          0.000    0.000     1.05  45  90  WFALL-FIX - S CR-SPLIT=NO          PAR 91-96 with 90
281:06:35:00  281:06:38:00      192 OCC        NICMOS DARK          0.000    0.000     1.05  45  91       NIC3 - S NSAMP=5
281:06:39:00  281:07:04:00     1471 OCC        NICMOS DARK          0.000    0.000     1.05  45  92       NIC3 - S NSAMP=25
281:07:09:00  281:07:45:00     2139 DARK_SAA     STIS CCD-CLEAR     2.516    0.000     1.05  45 100      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 102-108 with 100
281:07:13:00  281:07:45:00     1900 DARK_SAA     WFPC F606W         2.516    0.000     1.05  45 102  WFALL-FIX - - CR-SPLIT=NO
281:07:09:00  281:07:23:00      832 DARK_SAA   NICMOS F160W         2.516    0.000     1.05  45 103       NIC3 - - NSAMP=15
281:07:24:00  281:07:43:00     1152 DARK_SAA   NICMOS F160W         2.516    0.000     1.05  45 104       NIC3 - - NSAMP=20
281:08:15:00  281:08:40:00     1500 OCC          WFPC DARK          0.000    0.000    -1.05  46  10  WFALL-FIX - - CR-SPLIT=NO          PAR 11-13 with 10
281:08:15:00  281:08:40:00     1471 OCC        NICMOS DARK          0.000    0.000    -1.05  46  11       NIC3 - - NSAMP=25
281:08:52:00  281:09:27:00     2088 DARK_SAA     STIS CCD-CLEAR     2.516    0.000    -1.05  46  20      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 22-28 with 20
281:08:55:00  281:09:27:00     1900 DARK_SAA     WFPC F606W         2.516    0.000    -1.05  46  22  WFALL-FIX - - CR-SPLIT=NO
281:08:52:00  281:09:06:00      831 DARK_SAA   NICMOS F160W         2.516    0.000    -1.05  46  23       NIC3 - - NSAMP=15
281:09:07:00  281:09:26:00     1152 DARK_SAA   NICMOS F160W         2.516    0.000    -1.05  46  24       NIC3 - - NSAMP=20
281:09:56:00  281:10:18:00     1300 OCC          WFPC DARK          0.000    0.000    -1.05  46  30  WFALL-FIX - - CR-SPLIT=NO          PAR 31-33 with 30
281:09:56:00  281:10:15:00     1152 OCC        NICMOS DARK          0.000    0.000    -1.05  46  31       NIC3 - - NSAMP=20
281:10:24:00  281:11:09:00     2700 DARK_SAA     STIS CCD-CLEAR    -2.516    2.516    -1.05  46  40      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 42-48 with 40
281:10:27:00  281:11:09:00     2500 DARK_SAA     WFPC F606W        -2.516    2.516    -1.05  46  42  WFALL-FIX - - CR-SPLIT=NO
281:10:24:00  281:10:43:00     1152 DARK_SAA   NICMOS F160W        -2.516    2.516    -1.05  46  43       NIC3 - - NSAMP=20
281:10:44:00  281:11:09:00     1471 DARK_SAA   NICMOS F160W        -2.516    2.516    -1.05  46  44       NIC3 - - NSAMP=25
281:11:33:00  281:11:55:00     1300 OCC          WFPC DARK          0.000    0.000    -1.05  46  50  WFALL-FIX - - CR-SPLIT=NO          PAR 51-53 with 50
281:11:33:00  281:11:52:00     1152 OCC        NICMOS DARK          0.000    0.000    -1.05  46  51       NIC3 - - NSAMP=20
281:12:01:00  281:12:46:00     2700 DARK_SAA     STIS CCD-CLEAR    -2.516    2.516    -1.05  46  60      50CCD - - CR-SPLIT=3  RE-ACQ   PAR 62-68 with 60

Jul 16, 98 16:03 Page 17/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 17/18 draft5b.oh

281:12:04:00  281:12:46:00     2500 DARK_SAA     WFPC F606W        -2.516    2.516    -1.05  46  62  WFALL-FIX - - CR-SPLIT=NO
281:12:01:00  281:12:20:00     1152 DARK_SAA   NICMOS F160W        -2.516    2.516    -1.05  46  63       NIC3 - - NSAMP=20
281:12:21:00  281:12:46:00     1471 DARK_SAA   NICMOS F160W        -2.516    2.516    -1.05  46  64       NIC3 - - NSAMP=25
281:13:10:00  281:13:32:00     1300 OCC          WFPC DARK          0.000    0.000    -1.05  46  70  WFALL-FIX - - CR-SPLIT=NO          PAR 71-73 with 70
281:13:10:00  281:13:29:00     1152 OCC        NICMOS DARK          0.000    0.000    -1.05  46  71       NIC3 - - NSAMP=20

Jul 16, 98 16:03 Page 18/18

draft5b.oh

Printed by David Zurek

Thursday July 16, 1998 18/18 draft5b.oh