0 0.0005 0.001 0.0015 0.002 0 2 4 6 8 F300W

Sky (ADU/sec)

0 0.002 0.004 0.006 0.008 0 5 10 15 20 F450W

0 0.02 0.04 0.06 0 20 40 60 F606W

0 0.002 0.004 0.006 0.008 0.01 0 2 4 6 8 F814W