Year 2000 Focus Measurements-8-7-6-5-4-3-2-101234-100102030405060708090100110120130140150160170180190200210220230240250DOY 2000 focus in mic @ secondary

(breathing-corrected unless otherwise noted) wfpc2 decon monitor

8829 focus monitor

8829 STIS

+ 0 . 8 + 0 . 8

+ 4 . 2

+ 3 . 5