201

APPENDIXA:

Passband Plots

In This Appendix...

Passbands for each Filter in Isolation / 201 Passbands including the System Response / 211 Normalized Passbands including the System Response / 221

A.1 Passbands f or eac h Filter in Isolation

F122M, F130LP, F160AW, F160BW, F165LP, F170W

F185W, F218W, F255W, F300W, F336W, F343N

F375N, F380W, F390N, F410M, F437N, F439W

F450W, F467M, F469N, F487N, F502N, F547M

F555W, F569W, F588N, F606W, F622W, F631N

F656N, F658N, F673N, F675W, F702W, F785LP

F791W, F814W, F850LP, F953N, F1042M, FQUVN-A

FQUVN-B, C and D, FQCH4N-A, B and C

FQCH4N-D, Parallel and P erpendicular P olarizers

A.2 Passbands inc luding the System Response

F122M, F130LP, F160AW, F160BW, F165LP, F170W

F185W, F218W, F255W, F300W, F336W, F343N

F375N, F380W, F390N, F410M, F437N, F439W

F450W, F467M, F469N, F487N, F502N, F547M

F555W, F569W, F588N, F606W, F622W, F631N

F656N, F658N, F673N, F675W, F702W, F785LP

F791W, F814W, F850LP, F953N, F1042M, FQUVN-A

FQUVN-B, C and D, FQCH4N-A, B and C

FQCH4N-D, Parallel and P erpendicular P olarizers

Normalized Passbands including theSystem Response 221

A.3 Normalized Passbands inc luding the System Response

222 AppendixA: Passband Plots