\documentstyle[pub]{preprint}
\begin{document}
\title{CALIBRATION OF NEBULAR EMISSION-LINE DIAGNOSTICS:\\
 I. STELLAR EFFECTIVE TEMPERATURES}
\author{M.~S.\ Oey\\
Space Telescope Science Institute\\
3700 San Martin Drive\\
Baltimore, MD 21218\\
oey@stsci.edu\\
\and
M.~A.\ Dopita\\
Research School of Astronomy and Astrophysics\\
Institute of Advanced Study\\
The Australian National University\\
Private Bag\\
Weston Creek P.O., ACT 2611, Australia\\
mad@mso.anu.edu.au\\
\and
J.~C.\ Shields\\
Ohio University\\
Dept.\ of Physics and Astronomy\\
Clippinger Research Labs. 251B\\
Athens, OH 45701-2979\\
shields@helios.phy.ouiou.edu\\
\and
R.~C.\ Smith\\
Cerro Tololo Inter-American Observatory\/\thanks{National Optical Astronomy Observatories, operated by the Association of Universities for Research in Astronomy, Inc., under cooperative agreement with the National Science Foundation.}\\
Casilla 603\\
La Serena, Chile\\
csmith@noao.edu\\
\\}

\tobe{June, 2000}{The ApJ Supplement Series}
\recacc{5 November 1999}{14 December 1999}
\maketitle
\end{document}