\begin{deluxetable}{l|rr|r|cr|l}
\tablewidth{0pt}
\tabletypesize{\scriptsize}
\tablenum{4}
\tablecaption{Galaxy Redshifts}
\tablehead{
\multicolumn{1}{c|}{~} & 
\multicolumn{2}{c|}{~} & 
\multicolumn{1}{c|}{~} & 
\multicolumn{1}{c}{~} & 
\multicolumn{1}{c|}{$z$ Error} & 
\multicolumn{1}{c}{~} \\
\multicolumn{1}{c|}{ID} & 
\multicolumn{2}{c|}{R.A. (J2000) Dec.} & 
\multicolumn{1}{c|}{I mag} & 
\multicolumn{1}{c}{$z$} & 
\multicolumn{1}{c|}{(km/s)} & 
\multicolumn{1}{c}{Comments} }
\startdata
CL005 & & & & & & \\
1 & 10 10 45.21&+54 34 45.2&19.73&\nodata &\nodata & Low S/N \\
2 & 10 10 51.25&+54 35 09.6&20.23&0.3987 &153 & \\
3* & 10 10 50.83&+54 34 24.8&19.03&0.3629 &138 & \\
4 & 10 10 46.94&+54 33 12.9&19.78&\nodata &\nodata & Low S/N\\
5* & 10 11 01.52&+54 35 19.0&20.45&0.3654 &174 & \\
6 & 10 10 57.68&+54 34 05.7&18.34&0.2543 & 140& Emission\\
7* & 10 11 01.00&+54 33 33.5&19.10&0.3650 &120 & \\
8 & 10 11 01.32&+54 33 03.2&17.69&0.5941 &146 & \\
9 & 10 10 55.27&+54 31 36.8&20.78&\nodata &\nodata & Low S/N\\
10& 10 11 00.85&+54 32 09.8&19.51&\nodata &\nodata & Low S/N\\
11& 10 11 07.15&+54 32 29.2&19.01&\nodata &\nodata & Low S/N\\
12& 10 11 12.04&+54 32 48.5&18.16&0.0470 & 140& Emission\\
  & & & & & & \\
CL009 & & & & & & \\
1 & 10 20 27.89&+54 30 27.7&19.80&\nodata &\nodata & Low S/N\\
2 & 10 20 22.00&+54 31 05.8&18.06&0.2998 & 81 & \\
3 & 10 20 18.31&+54 31 09.9&19.78&\nodata &\nodata & Modest S/N, weak features\\
4 & 10 20 16.20&+54 30 56.0&19.76&\nodata &\nodata & Low S/N\\
5 & 10 20 16.20&+54 30 56.0&19.76&0.1441 &    & \\
6 & 10 20 11.28&+54 30 55.3&20.16&\nodata &\nodata & Low S/N\\
7* & 10 20 13.75&+54 29 34.0&18.82&0.5507 & 73 & \\
8 & 10 20 09.17&+54 30 21.0&19.08&0.7679 &221 & \\
9 & 10 20 08.28&+54 29 20.5&19.06&0.3376 & 83 & \\
10*& 10 20 08.83&+54 28 24.2&19.47&0.5591 &134 & \\
11*& 10 20 11.08&+54 27 02.7&18.54&0.5532 & 82 & \\
12& 10 20 01.22&+54 28 44.0&19.73&\nodata &\nodata & Low S/N\\
13& 10 19 57.74&+54 28 30.1&20.33&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL011 & & & & & & \\
1 & 10 22 15.47&+54 31 14.6&18.69&0.4313 & 140& Emission\\
2 & 10 22 18.06&+54 31 46.6&20.50&0.4307 & 85 & Low S/N\\
3 & 10 22 23.85&+54 29 55.5&20.22&0.4720 & 87 & \\
4 & 10 22 26.00&+54 30 37.4&19.61&0.7694 &104 & Low S/N\\
5* & 10 22 27.87&+54 29 54.9&18.52&0.3032 & 68 & \\
6* & 10 22 31.23&+54 30 21.8&18.56&0.3028 & 140& Emission\\
7* & 10 22 32.93&+54 30 18.4&19.83&0.3019 &108 & \\
8 & 10 22 37.25&+54 29 51.3&20.68&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL026 & & & & & & \\
1* & 10 07 08.44&+54 18 29.6&17.73&0.5814 & 96 & \\
2 & 10 07 04.47&+54 18 44.5&19.65&0.4095 & 67 & Low S/N\\
3 & 10 07 00.39&+54 19 00.7&18.31&0.1302 & 140& Emission\\
4 & 10 07 01.51&+54 17 15.5&20.29&\nodata &\nodata & Low S/N\\
5* & 10 06 55.43&+54 18 27.3&19.08&0.5775 & 97 & \\
6 & 10 06 51.42&+54 18 38.8&20.09&\nodata &\nodata & Low S/N\\
7 & 10 06 47.46&+54 17 54.1&20.22&\nodata &\nodata & Low S/N\\
8 & 10 06 43.77&+54 18 19.1&20.13&\nodata &\nodata & Low S/N\\
9 & 10 06 43.32&+54 17 40.9&20.23&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL052 & & & & & & \\
1 & 10 18 42.78&+53 58 46.3&19.63&\nodata &\nodata & Low S/N\\
2 & 10 18 36.43&+53 59 46.2&19.44&0.6360 &120 & \\
3* & 10 18 34.06&+54 00 18.7&19.50&0.5434 &114 & Low S/N\\
4* & 10 18 43.76&+54 00 21.2&20.05&0.5445 &123 & \\
5* & 10 18 44.64&+54 00 44.8&19.71&0.5449 & 93 & \\
6 & 10 18 43.01&+54 01 20.0&20.02&\nodata &\nodata & Low S/N\\
7* & 10 18 46.02&+54 01 23.0&18.88&0.5423 &105 & \\
8 & 10 18 36.01&+54 02 40.8&18.60&0.5163 &162 & \\
9* & 10 18 48.90&+54 01 48.7&18.81&0.5471 &168 & \\
10& 10 18 44.77&+54 03 25.6&20.54&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL062 & & & & & & \\
1 & 10 20 52.27&+53 55 48.5&18.77&0.3730 & 83 & \\
2* & 10 20 49.19&+53 55 45.9&20.39&0.4683 &210 & Low S/N\\
3 & 10 20 44.38&+53 55 20.0&19.66&\nodata &\nodata & Modest S/N, weak features\\
4 & 10 20 46.44&+53 56 08.7&19.60&\nodata &\nodata & Modest S/N, weak features\\
5 & 10 20 45.96&+53 56 39.4&20.20&\nodata &\nodata & Low S/N\\
6 & 10 20 40.09&+53 56 32.8&20.34&\nodata &\nodata & Low S/N\\
7* & 10 20 40.80&+53 57 12.7&18.73&0.4546 &113 & \\
8 & 10 20 39.17&+53 57 33.4&19.46&\nodata &\nodata & Modest S/N, weak features\\
9 & 10 20 37.79&+53 58 07.6&20.09&\nodata &\nodata & Low S/N\\
10& 10 20 34.69&+53 58 11.0&19.64&0.5690 &114 & Low S/N\\
11& 10 20 32.29&+53 58 15.3&19.50&0.4882 &127 & Modest S/N\\
  & & & & & & \\
CL063 & & & & & & \\
1* & 10 12 25.48&+53 52 08.8&18.34&0.3271 & 96 & \\
2 & 10 12 20.11&+53 54 24.1&17.54&0.3749 & 66 & \\
3 & 10 12 37.45&+53 51 26.2&20.68&\nodata &\nodata & Low S/N\\
4* & 10 12 35.67&+53 52 42.8&19.12&0.3360 &171 & \\
5* & 10 12 36.13&+53 53 04.7&17.43&0.3297 & 78 & \\
6 & 10 12 39.61&+53 53 10.0&18.25&0.1792 & 140& Emission\\
7* & 10 12 38.11&+53 54 03.0&19.61&0.3275 & 93 & \\
8 & 10 12 40.60&+53 55 02.1&18.98&0.3917 & 96 & \\
9* & 10 12 43.24&+53 54 55.0&18.46&0.3272 & 93 & \\
10& 10 12 46.65&+53 54 37.4&18.76&0.3907 &162 & \\
11*& 10 12 49.25&+53 54 35.6&18.37&0.3278 &189 & \\
  & & & & & & \\
CL065 & & & & & & \\
1 & 10 19 01.40&+53 52 19.5&17.83&0.3287 &129 & \\
2 & 10 19 02.18&+53 50 54.4&19.63&\nodata &\nodata & Low S/N\\
3* & 10 19 06.04&+53 49 07.3&20.11&0.4975 &153 & \\
4 & 10 19 12.04&+53 50 41.6&20.22&0.4585 &141 & \\
5 & 10 19 13.93&+53 50 33.9&19.03&0.4557 & 93 & \\
6* & 10 19 16.55&+53 51 16.9&19.29&0.5016 & 96 & \\
7 & 10 19 19.19&+53 51 17.6&19.67&\nodata &\nodata & Low S/N\\
8 & 10 19 21.90&+53 52 25.0&20.01&0.5409 &132 & \\
9* & 10 19 23.19&+53 49 27.2&19.16&0.4996 &129 & \\
10*& 10 19 26.01&+53 49 28.8&19.25&0.5006 &129 & \\
11*& 10 19 29.38&+53 50 06.0&19.88&0.5017 &135 & \\
  & & & & & & \\
CL084 & & & & & & \\
1 & 10 04 53.84&+53 45 21.0&20.67&\nodata &\nodata & Low S/N\\
2 & 10 04 56.56&+53 45 29.4&19.00&\nodata &\nodata & Low S/N\\
3 & 10 04 56.49&+53 43 40.5&19.16&0.3426 & 140& Emission\\
4 & 10 05 01.70&+53 46 15.1&18.74&0.4217 & 97 & \\
5* & 10 05 03.63&+53 45 54.6&19.08&0.4497 &114 & \\
6 & 10 05 03.85&+53 44 46.4&20.52&\nodata &\nodata & Low S/N\\
7* & 10 05 07.72&+53 45 42.4&19.14&0.4465 &150 & \\
8* & 10 05 10.40&+53 46 01.4&18.25&0.4463 & 78 & \\
9* & 10 05 13.81&+53 46 00.2&19.19&0.4462 &114 & \\
10& 10 05 16.82&+53 45 41.9&19.91&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL112 & & & & & & \\
1 & 10 11 13.20&+53 32 24.6&19.36&\nodata &\nodata & Low S/N\\
2 & 10 11 04.86&+53 33 15.9&19.43&0.4883 & 93 & \\
3* & 10 11 15.11&+53 33 19.3&19.30&0.3894 &135 & \\
4 & 10 11 21.56&+53 33 21.0&18.58&0.5987 &111 & \\
5* & 10 11 12.19&+53 34 30.6&17.81&0.3894 & 51 & \\
6* & 10 11 19.32&+53 34 30.3&17.55&0.3896 & 48 & \\
7* & 10 11 15.67&+53 35 01.3&18.61&0.3996 &132 & \\
8* & 10 11 22.13&+53 35 09.2&19.48&0.3875 & 87 & \\
  & & & & & & \\
CL115 & & & & & & \\
1 & 10 00 58.06&+53 30 52.0&19.02&\nodata &\nodata & Low S/N\\
2 & 10 00 42.04&+53 32 15.3&19.75&0.5639 &120 & Marginal S/N\\
3 & 10 00 50.60&+53 31 59.7&18.91&\nodata &\nodata & Low S/N\\
4 & 10 00 53.17&+53 32 05.6&19.30&\nodata &\nodata & Low S/N\\
5 & 10 00 50.30&+53 32 52.4&19.46&0.4202 & 96 & Marginal S/N\\
6 & 10 00 57.44&+53 32 55.5&16.88&0.1458 & 60 & \\
7 & 10 01 00.91&+53 33 18.1&18.00&\nodata &\nodata & S/N ok, weak features\\
8 & 10 01 00.91&+53 33 18.1&18.00&0.0389 & 140& Emission\\
9 & 10 01 01.62&+53 33 33.3&17.99&0.4198 & 51 & \\
10& 10 00 57.55&+53 34 25.7&19.70&\nodata &\nodata & Low S/N\\
11& 10 01 03.80&+53 34 19.0&19.01&0.2246 &126 & \\
12& 10 00 53.26&+53 35 30.4&20.54&0.3342 & 140& Emission\\
13& 10 00 55.90&+53 35 37.3&20.04&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL157 & & & & & & \\
1 & 10 07 14.77&+53 18 32.7&19.95&\nodata &\nodata & Low S/N\\
2* & 10 07 10.41&+53 17 37.6&19.35&0.2431 &162 & \\
3* & 10 07 11.62&+53 17 01.2&18.47&0.2417 &145 & \\
4 & 10 07 28.60&+53 17 38.8&19.99&\nodata &\nodata & Low S/N\\
5* & 10 07 16.05&+53 16 44.0&16.74&0.2433 &102 & \\
6* & 10 07 14.87&+53 16 23.9&18.08&0.2432 & 93 & \\
7 & 10 07 15.93&+53 16 01.4&19.84&\nodata &\nodata & Low S/N\\
8 & 10 07 23.35&+53 15 41.3&19.73&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL188 & & & & & & \\
1 & 10 24 15.05&+53 05 27.7&19.39&\nodata &\nodata & Low S/N\\
2 & 10 24 14.20&+53 05 11.1&18.76&0.1640 & 140& Emission\\
3 & 10 24 08.07&+53 04 55.1&20.26&\nodata &\nodata & Low S/N\\
4* & 10 24 09.30&+53 04 25.0&17.90&0.3674 & 75 & \\
5* & 10 24 13.62&+53 04 02.0&18.55&0.3657 & 45 & \\
6* & 10 24 19.16&+53 03 34.7&17.55&0.3687 & 75 & \\
7* & 10 24 04.12&+53 03 18.2&18.81&0.3696 &160 & \\
8* & 10 24 13.49&+53 02 56.5&18.61&0.3694 & 72 & \\
9* & 10 24 10.61&+53 02 34.1&18.19&0.3715 & 84 & \\
  & & & & & & \\
CL189 & & & & & & \\
1 & 10 04 06.37&+53 03 01.0&21.00&\nodata &\nodata & Low S/N\\
2* & 10 04 04.84&+53 03 23.7&20.37&0.3779 &131 & Low S/N\\
3 & 10 04 06.02&+53 03 59.1&19.01&0.0461 & 140& Emission\\
4 & 10 03 56.67&+53 02 42.7&20.42&0.5872 &113 & \\
5 & 10 04 01.08&+53 03 53.4&19.08&0.6878 & 99 & \\
6* & 10 03 58.34&+53 04 22.9&19.20&0.3898 & 90 & \\
7* & 10 03 58.52&+53 04 57.2&18.02&0.3894 & 36 & \\
8 & 10 03 54.93&+53 04 43.6&20.24&0.6886 &124 & \\
9 & 10 03 59.02&+53 05 52.2&20.40&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL207 & & & & & & \\
1 & 10 04 17.76&+52 54 14.5&19.97&\nodata &\nodata & Low S/N\\
2 & 10 04 15.77&+52 53 59.2&18.99&\nodata &\nodata & Low S/N\\
3* & 10 04 11.61&+52 53 55.3&20.19&0.4452 &115 & Low S/N\\
4* & 10 04 09.31&+52 53 17.5&18.11&0.4449 &127 & \\
5 & 10 04 10.87&+52 52 34.8&19.15&0.4680 &149 & \\
6 & 10 04 12.58&+52 52 03.3&18.50&0.3187 &125 & \\
7* & 10 04 05.46&+52 52 04.0&18.75&0.4453 & 90 & \\
8 & 10 04 04.04&+52 51 35.0&18.71&0.4261 &107 & \\
9 & 10 04 05.01&+52 51 09.1&19.34&0.2985 & 140& Emission\\
  & & & & & & \\
CL212 & & & & & & \\
1 & 10 25 49.52&+52 48 33.2&20.14&\nodata &\nodata & Low S/N\\
2* & 10 25 49.37&+52 49 02.2&17.92&0.5323 & 74 & \\
3* & 10 25 46.69&+52 49 16.3&19.48&0.5284 &108 & \\
4* & 10 25 45.94&+52 49 30.6&19.25&0.5220 &124 & \\
5 & 10 25 42.89&+52 49 34.3&19.68&\nodata &\nodata & Low S/N\\
6 & 10 25 42.89&+52 49 34.3&19.68&\nodata &\nodata & Low S/N\\
7* & 10 25 46.33&+52 50 25.2&19.91&0.5340 &103 & \\
8* & 10 25 44.61&+52 50 40.6&19.82&0.5277 & 95 & \\
9 & 10 25 46.73&+52 51 16.2&20.17&\nodata &\nodata & Low S/N\\
10*& 10 25 37.84&+52 50 49.1&20.09&0.5325 &104 & \\
11& 10 25 35.49&+52 50 52.4&20.20&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL258 & & & & & & \\
1 & 10 20 44.79&+52 26 27.2&18.33&0.2471 &141 & \\
2 & 10 20 48.10&+52 27 01.6&19.66&\nodata &\nodata & weak features\\
3* & 10 20 32.88&+52 27 49.4&18.82&0.4009 & 87 & \\
4* & 10 20 41.53&+52 27 52.0&18.26&0.3992 & 78 & \\
5 & 10 20 45.46&+52 27 58.8&20.28&0.5162 &150 & Marginal S/N\\
6* & 10 20 42.26&+52 28 39.9&19.18&0.3959 &120 & \\
7 & 10 20 46.79&+52 28 50.3&17.37&0.1486 & 75 & \\
8 & 10 20 39.99&+52 29 21.1&19.40&\nodata &\nodata & Low S/N\\
9 & 10 20 43.31&+52 29 29.3&18.69&\nodata &\nodata & weak features\\
  & & & & & & \\
CL263 & & & & & & \\
1 & 10 00 47.41&+52 22 02.7&20.36&\nodata &\nodata & Low S/N\\
2 & 10 00 44.16&+52 22 24.8&20.76&0.5085 & 140& Emission\\
3 & 10 00 52.20&+52 22 26.2&18.88&0.2370 & 140& Emission\\
4 & 10 00 45.00&+52 23 01.7&20.05&\nodata &\nodata & Low S/N\\
5 & 10 00 54.90&+52 23 00.1&20.10&\nodata &\nodata & Low S/N\\
6 & 10 00 48.59&+52 23 38.8&19.48&0.4297 &126 & \\
7* & 10 00 45.06&+52 24 00.9&19.09&0.5468 & 84 & \\
8* & 10 00 45.47&+52 24 25.7&19.69&0.5468 & 99 & \\
9 & 10 00 43.13&+52 25 18.1&19.43&\nodata &\nodata & Good S/N, weak features\\
10& 10 00 50.54&+52 25 22.5&20.49&0.4018 &165 & \\
  & & & & & & \\
CL268 & & & & & & \\
1* & 10 18 05.85&+52 22 07.0&17.85&0.4637 & 94 & \\
2 & 10 17 59.78&+52 24 09.3&20.20&\nodata &\nodata & Low S/N\\
3 & 10 17 56.56&+52 22 34.9&19.24&0.4167 &181  & \\
4* & 10 17 53.22&+52 23 03.0&17.92&0.4631 & 70 & \\
5 & 10 17 51.93&+52 22 05.0&19.19&0.4186 & 80 & \\
6 & 10 17 48.85&+52 23 39.0&19.70&\nodata &\nodata & Low S/N\\
7 & 10 17 48.03&+52 22 31.8&19.60&\nodata &\nodata & Low S/N\\
8 & 10 17 42.26&+52 23 11.1&20.51&\nodata &\nodata & Low S/N\\
9 & 10 17 41.05&+52 22 26.7&19.64&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL310 & & & & & & \\
1 & 10 25 46.07&+52 01 40.8&17.62&0.1718 & 140& Emission \\
2 & 10 25 40.59&+52 01 01.8&20.70&\nodata &\nodata & Low S/N\\
3 & 10 25 45.53&+52 03 24.3&18.36&0.4220 & 60 & \\
4 & 10 25 37.08&+52 02 09.1&18.58&0.2513 & 140& Emission\\
5 & 10 25 37.54&+52 02 44.7&18.51&0.4373 & 79 & \\
6 & 10 25 34.86&+52 02 41.3&17.75&0.2516 & 140& Emission \\
7 & 10 25 39.92&+52 04 18.2&19.51&\nodata &\nodata & Low S/N\\
8* & 10 25 36.97&+52 04 12.1&20.07&0.5084 &159 & \\
9 & 10 25 29.22&+52 03 26.5&20.58&\nodata &\nodata & Low S/N\\
10*& 10 25 32.00&+52 04 35.2&19.52&0.4873 &101 & Low S/N\\
11*& 10 25 25.74&+52 04 10.0&18.71&0.5059 & 88 & \\
  & & & & & & \\
CL335 & & & & & & \\
1* & 10 14 08.80&+51 48 45.3&19.06&0.6128 & 140& Emission \\
2 & 10 14 10.65&+51 47 47.5&20.43&\nodata &\nodata & Low S/N\\
3 & 10 14 10.14&+51 47 27.2&19.18&\nodata &\nodata & Good S/N, weak features\\
4 & 10 14 03.65&+51 47 45.1&19.71&0.4871 & 140& Emission \\
5 & 10 14 03.05&+51 47 21.7&20.30&0.6575 &137 & Low S/N\\
6* & 10 13 57.20&+51 47 54.9&20.64&0.6109 &122 & Low S/N\\
7 & 10 13 57.78&+51 47 27.6&19.30&0.6666 &119 & \\
8 & 10 13 55.74&+51 47 09.5&19.66&0.3875 & 81 & \\
9 & 10 14 00.93&+51 45 53.9&19.93&\nodata &\nodata & Modest S/N, weak features\\
10& 10 13 51.18&+51 46 42.0&20.72&\nodata &\nodata & Low S/N\\
11*& 10 13 52.43&+51 45 48.8&19.28&0.6095 &131 & \\
12& 10 13 49.90&+51 45 49.6&20.92&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL338 & & & & & & \\
1 & 10 16 08.96&+51 46 34.0&20.56&\nodata &\nodata & Low S/N\\
2* & 10 16 11.00&+51 47 10.9&16.41&0.2577 & 54 & \\
3 & 10 16 11.85&+51 47 34.5&20.36&\nodata &\nodata & Low S/N\\
4* & 10 16 15.36&+51 47 43.1&18.98&0.2593 & 87 & \\
5* & 10 16 14.77&+51 48 03.1&19.01&0.2590 & 72 & \\
6* & 10 16 17.02&+51 48 13.3&17.93&0.2416 &120 & \\
7 & 10 16 16.87&+51 48 33.1&19.53&\nodata &\nodata & Low S/N\\
8 & 10 16 22.31&+51 48 46.6&19.24&\nodata &\nodata & Low S/N\\
9 & 10 16 26.33&+51 49 06.0&19.79&\nodata &\nodata & Low S/N\\
10& 10 16 13.20&+51 49 55.7&19.26&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL350 & & & & & & \\
1 & 10 07 20.81&+51 39 46.7&19.60&0.5833 &163 & \\
2 & 10 07 18.67&+51 38 45.9&19.71&0.4248 & 88 & \\
3* & 10 07 20.60&+51 37 57.7&19.96&0.4024 &127 & \\
4* & 10 07 24.20&+51 37 45.6&18.75&0.3898 & 64 & \\
5 & 10 07 22.06&+51 36 46.0&18.94&0.6229 & 89 & \\
6 & 10 07 23.63&+51 36 40.7&20.05&\nodata &\nodata & Low S/N\\
7 & 10 07 28.98&+51 36 54.6&20.29&\nodata &\nodata & Low S/N \\
8* & 10 07 29.70&+51 36 29.8&18.80&0.3854 &226 & \\
  & & & & & & \\
CL378 & & & & & & \\
1 & 10 25 10.78&+51 26 37.3&19.46&\nodata &\nodata & weak features\\
2 & 10 25 16.65&+51 27 04.3&18.37&\nodata &\nodata & Good S/N, weak features\\
3* & 10 25 17.67&+51 27 40.4&18.96&0.5169 & 93 & \\
4* & 10 25 19.92&+51 27 23.5&18.88&0.5157 & 81 & \\
5* & 10 25 21.57&+51 27 30.5&20.01&0.5165 & 96 & \\
6* & 10 25 29.47&+51 26 48.4&19.69&0.5095 &126 & \\
7 & 10 25 31.53&+51 27 32.5&19.83&\nodata &\nodata & Low S/N\\
8 & 10 25 33.49&+51 27 35.7&18.95&0.4660 &129 & \\
  & & & & & & \\
CL384 & & & & & & \\
1* & 10 24 09.65&+51 22 42.0&19.35&0.5071 &126 & Low S/N\\
2* & 10 24 09.32&+51 22 18.5&19.66&0.4944 &119 & Low S/N\\
3* & 10 24 00.94&+51 23 15.0&18.96&0.4837 &143 & \\
4 & 10 24 07.61&+51 20 57.3&20.34&0.3355 &171 & Low S/N\\
5* & 10 23 58.49&+51 22 20.6&19.67&0.5139 &123 & \\
6 & 10 23 58.49&+51 22 20.6&19.67&\nodata &\nodata & Low S/N \\
7* & 10 23 56.64&+51 21 57.5&19.58&0.5116 & 96 & \\
8 & 10 23 53.76&+51 22 08.5&19.53&\nodata &\nodata & Low S/N\\
9 & 10 23 56.31&+51 21 11.9&19.34&0.4161 &126 & \\
10& 10 23 57.03&+51 20 35.3&19.48&0.3779 & 94 & \\
  & & & & & & \\
CL385 & & & & & & \\
1 & 10 02 52.86&+51 20 16.1&19.85&\nodata &\nodata & Low S/N\\
2 & 10 03 00.02&+51 21 14.4&19.78&\nodata &\nodata & Low S/N\\
3 & 10 03 02.15&+51 21 37.5&19.17&0.4308 &140 & \\
4* & 10 03 01.07&+51 22 12.9&18.59&0.2534 & 140& Emission\\
5* & 10 03 04.57&+51 22 16.1&19.13&0.2518 & 51 & \\
6 & 10 03 05.37&+51 22 41.0&18.27&0.1402 & 140& Emission\\
7 & 10 03 06.89&+51 23 04.6&19.81&\nodata &\nodata & Low S/N\\
8 & 10 03 01.81&+51 23 46.5&19.27&\nodata &\nodata & Low S/N\\
9 & 10 03 11.44&+51 23 48.4&18.67&0.2170 & 140& Emission\\
  & & & & & & \\
CL397 & & & & & & \\
1 & 10 21 20.73&+51 14 26.3&18.64&\nodata &\nodata & Low S/N\\
2 & 10 21 18.45&+51 13 57.7&19.83&\nodata &\nodata & Low S/N\\
3 & 10 21 16.99&+51 14 55.5&19.50&\nodata &\nodata & Low S/N\\
4 & 10 21 13.92&+51 15 58.9&19.02&\nodata &\nodata & Low S/N\\
5* & 10 21 07.26&+51 13 55.8&19.34&0.4831 &140 & Emission\\
6* & 10 21 05.89&+51 14 36.8&19.58&0.4960 & 88 & \\
7* & 10 21 04.09&+51 15 00.1&19.72&0.4980 & 89 & \\
8* & 10 21 00.99&+51 14 51.8&19.12&0.4883 &161 & \\
9 & 10 20 57.41&+51 14 14.9&20.42&\nodata &\nodata & Low S/N\\
10& 10 20 54.97&+51 14 21.4&19.06&0.4706 & 82 & Low S/N\\
11& 10 20 52.45&+51 14 15.0&20.27&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL406 & & & & & & \\
1* & 10 12 32.77&+51 08 13.2&18.76&0.3206 & 140& Emission\\
2 & 10 12 32.84&+51 10 13.3&19.87&\nodata &\nodata & Low S/N\\
3* & 10 12 21.30&+51 08 56.6&18.64&0.3153 &138 & \\
4 & 10 12 21.57&+51 09 20.5&19.18&0.3635 &117 & \\
5 & 10 12 19.55&+51 09 40.8&20.26&\nodata &\nodata & Low S/N\\
6 & 10 12 20.79&+51 10 22.1&19.93&\nodata &\nodata & Low S/N\\
7 & 10 12 14.51&+51 10 21.9&19.95&\nodata &\nodata & Low S/N\\
8* & 10 12 16.60&+51 11 02.0&18.75&0.3382 & 84 & \\
9 & 10 12 12.10&+51 10 51.1&20.08&\nodata &\nodata & Low S/N\\
10& 10 12 09.21&+51 11 03.7&20.07&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL413 & & & & & & \\
1 & 10 17 28.80&+51 04 11.5&20.08&\nodata &\nodata & Low S/N\\
2 & 10 17 35.10&+51 04 02.3&19.83&\nodata &\nodata & Low S/N\\
3* & 10 17 41.53&+51 02 57.1&19.06&0.3669 &132 & \\
4* & 10 17 40.30&+51 03 50.9&18.79&0.3699 & 140& Emission\\
5* & 10 17 40.26&+51 04 25.5&18.61&0.3681 & 75 & \\
6* & 10 17 43.83&+51 03 58.8&19.17&0.3704 & 81 & \\
7* & 10 17 41.56&+51 05 26.9&19.48&0.3650 &141 & \\
8 & 10 17 47.05&+51 04 48.1&19.39&0.5186 &143 & \\
9 & 10 17 49.50&+51 04 50.0&19.43&\nodata &\nodata & weak features\\
  & & & & & & \\
CL415 & & & & & & \\
1 & 10 21 21.63&+51 02 45.3&19.78&0.4088 &121 & Low S/N\\
2 & 10 21 15.71&+51 02 36.4&21.02&0.3226 & 99 & Low S/N\\
3 & 10 21 18.88&+51 03 30.2&18.78&0.1658 & 84 & \\
4 & 10 21 19.48&+51 04 03.6&18.72&0.4369 & 45 & \\
5* & 10 21 12.13&+51 03 56.6&20.20&0.3535 &125 & \\
6* & 10 21 14.02&+51 04 34.5&18.85&0.3644 & 140& Emission\\
7 & 10 21 05.96&+51 03 58.1&18.75&0.3894 & 41 & \\
8 & 10 21 09.36&+51 04 51.8&18.66&0.3867 &135 & \\
9* & 10 21 05.40&+51 04 43.5&19.08&0.3654 & 89 & \\
10*& 10 21 11.82&+51 06 00.5&18.43&0.3516 & 50 & \\
11*& 10 21 09.19&+51 06 08.0&19.62&0.3528 &115 & \\
  & & & & & & \\
CL416 & & & & & & \\
1* & 10 22 30.49&+51 04 30.8&20.61&0.4798 &132 & \\
2 & 10 22 37.67&+51 04 56.6&19.76&\nodata &\nodata & Low S/N\\
3* & 10 22 39.63&+51 03 35.7&19.86&0.4791 & 84 & \\
4 & 10 22 41.61&+51 03 33.6&19.68&\nodata &\nodata & Low S/N\\
5* & 10 22 43.39&+51 03 13.3&18.83&0.4834 &174 & \\
6* & 10 22 45.02&+51 03 08.7&18.62&0.4713 & 69 & \\
7* & 10 22 49.14&+51 02 17.7&19.37&0.4839 & 81 & \\
8* & 10 22 53.81&+51 03 49.1&19.53&0.4857 &108 & \\
  & & & & & & \\
CL426 & & & & & & \\
1 & 10 06 17.17&+50 55 07.1&19.93&0.1480 & 140& Emission\\
2* & 10 06 22.06&+50 54 56.7&18.64&0.2232 & 70 & \\
3 & 10 06 25.61&+50 54 49.3&18.83&0.3833 &100 & \\
4 & 10 06 27.87&+50 55 09.3&18.11&0.3821 & 70 & \\
5* & 10 06 32.31&+50 54 29.1&18.56&0.2247 & 96 & \\
6* & 10 06 32.99&+50 54 49.9&16.66&0.2273 & 69 & \\
7 & 10 06 32.05&+50 55 55.1&18.86&0.3788 & 140& Emission\\
8* & 10 06 35.71&+50 55 24.6&19.24&0.2254 &132 & \\
9* & 10 06 38.66&+50 55 08.7&18.16&0.2263 &117 & \\
10& 10 06 34.86&+50 56 48.7&18.93&\nodata &\nodata & Low S/N\\
  & & & & & & \\
CL433 & & & & & & \\
1 & 10 08 00.85&+50 47 15.7&18.74&\nodata &\nodata & Low S/N\\
2* & 10 08 06.15&+50 47 46.9&18.15&0.2255 & 81 & \\
3* & 10 08 07.85&+50 47 50.3&18.41&0.2265 & 87 & \\
4* & 10 08 06.65&+50 48 44.8&18.28&0.2295 & 140& Emission\\
5* & 10 08 13.61&+50 47 55.5&17.85&0.2279 & 72 & \\
6 & 10 08 16.22&+50 47 51.6&19.59&\nodata &\nodata & Low S/N\\
7* & 10 08 16.71&+50 48 32.5&19.06&0.2273 & 96 & \\
8* & 10 08 15.08&+50 49 30.1&18.92&0.2274 & 140& Emission\\
  & & & & & & \\
CL439 & & & & & & \\
1* & 10 24 38.09&+50 47 45.2&18.73&0.3551 &117 & \\
2* & 10 24 38.23&+50 47 04.3&19.20&0.3567 & 90 & \\
3* & 10 24 47.43&+50 46 33.7&19.19&0.3539 &120 & \\
4 & 10 24 29.95&+50 45 47.3&16.37&0.1366 & 57 & \\
5* & 10 24 41.98&+50 45 44.4&17.58&0.3548 & 78 & \\
6* & 10 24 44.29&+50 45 30.5&20.16&0.3542 &230 & \\
7* & 10 24 41.36&+50 45 08.0&18.64&0.3584 & 63 & \\
  & & & & & & \\
CL440 & & & & & & \\
1 & 10 19 42.71&+50 49 30.3&19.45&0.3499 &120 & \\
2 & 10 19 57.39&+50 48 19.1&19.72&\nodata &\nodata & Low S/N\\
3 & 10 19 57.83&+50 47 53.4&19.91&\nodata &\nodata & Low S/N\\
4* & 10 19 47.57&+50 48 00.9&19.00&0.4830 &110 & \\
5* & 10 19 42.27&+50 47 56.3&19.55&0.4851 &167 & \\
6* & 10 19 46.59&+50 47 30.0&18.65&0.4839 & 66 & \\
7 & 10 19 48.33&+50 46 58.9&19.22&\nodata &\nodata & Low S/N\\
8 & 10 19 49.08&+50 46 41.8&19.81&\nodata &\nodata & Low S/N\\
9 & 10 19 47.37&+50 45 58.9&19.99&\nodata &\nodata & Low S/N\\
10*& 10 19 43.13&+50 45 52.5&19.82&0.4796 &134 & \\
  & & & & & & \\
CL441 & & & & & & \\
1 & 10 21 36.72&+50 44 03.0&19.62&0.3529 & 140& Emission\\
2* & 10 21 33.49&+50 44 33.2&19.58&0.4869 &142 & \\
3* & 10 21 31.84&+50 45 25.5&19.10&0.4816 & 140& Emission\\
4 & 10 21 27.41&+50 44 54.4&20.67&\nodata &\nodata & Low S/N\\
5 & 10 21 25.66&+50 45 02.2&18.58&0.0788 & 140& Emission\\
6* & 10 21 23.46&+50 45 17.9&20.63&0.4767 &156 & Low S/N\\
7* & 10 21 20.92&+50 45 16.2&20.12&0.4831 &114 & \\
8 & 10 21 18.30&+50 45 28.3&19.60&\nodata &\nodata & Modest S/N, weak features\\
9 & 10 21 16.50&+50 45 27.1&19.84&\nodata &\nodata & Low S/N\\
\enddata
\tablecomments{Galaxies with an asterisk after their ID number are
used in the computation of the mean cluster redshift. See Table 5
for results.}
\end{deluxetable}
